966 Elektrotechnische Fabriken, Elektricitätswerke und Hilfsgeschäfte.

Kapital: M. 10 000 000 in 10 000 Aktien à M. 1000. Urspr. M. 2 500 000, erhöht lt. G.-V. Y. 23./6. 1900 um M. 1 250 000 in 1250 ab 1./7. 1900 div.-ber. Aktien, übernommen von der Deutschen Ges. für elektr. Unternehm. in Frankf. a. M. zu 105 %. Die erhebliche Ausdehnun des Werkes erforderte die Flüssigmachung weiterer Mittel, dieselben wurden zunächst durch Inanspruchnahme eines Bankkredits gewonnen. Zur Abstossung von durch Vergrösserung des Werkes entstandenen Bankschulden u. Verstärk. der Betriebsmittel lt. G.-V. v. 28./12. 1901 weitere Erhöhung um M. 250 000 in 250 ab 1./1. 1902 div.-ber. Aktien à M. 1000, übernommen zu pari zuzügl. Stempelkosten von der Deutschen Ges. f. elektr. Unternehm. in Frankf. a. M. Die G.-V. v. 22./12. 1903 erhöhte das A.-K. endlich um M. 6 000 000 (auf M. 10 000 000) in 6000 ab 1./1. 1904 pro rata der Einzahl. div.-ber. Aktien, angeboten den Aktionären 23./12.1903 bis 5./1. 1904 zu 103 %, anderweitig begeben zu 130 %; seit 1905 voll eingezahlt.

Hypotheken: M. 111 400 auf Grundstücke.

Geschäftsjahr: 1./7.–30./6. Gen.-Vers.: Im I. Geschäftshalbj. 1 Aktie = 1 St.

Gewinn-Verteilung: 5 % 3. R.-F., vom verbleib. Betrage vertragsm. Tant. an Vorst. u. Beamte, bis 4 % Div., vom Ubrigen 10 % Tant. an A.-R., Überrest zur Verf. der G.-V. Die Abschreib. werden auf ein gemeinsames Konto gebracht, dem jährl. 4 % Zs. zugeführt werden, sodass das urspr. Anlagekapital in ca. 28 Jahren getilgt sein wird.

Bilanz am 30. Juni 1904: Aktiva: Grundstücke 483 169, Gebäude 620 902, Dampfmasch. 592 070, Turbinen 2789, Dynamomasch. 565 006, Krane 65 987, Kondensationsanlagen 443 274, Rohrleitung 103 040, Accumulatoren 3772, Schaltanlagen 85 306, Kabelnetz 3 269 292, Transf. Stat. 904 978, Umformer 78 742, Zähler 155 821, Lokomobile 12 500, Heizungsanlage 14 135, Beleucht.-Anlage 31 885, Inventar 48 279, Werkzeuge 20 665, Fuhrwerk 18 827, Kassa 22 380, Versich. 21 000, Kaut. 18 914, Lager 191 000, Betriebsmaterial. 6394, Effekten 1 256 310, Debit. 1 322 138, Zs. 21 500. – Passiva: A.-K. 7000 000, Hypoth. 111 400, Kredit. 2 180 981, Abschreib.-F. 786 968, R.-F. 97 781, Agio 183 835, Rabatt 19 110. Sa. M. 10 380 075.

Gewinn- u. Verlust-Konto: Debet: Betriebs. u. allg. Unk., Verluste bei Konsumenten 536 109, Abschreib. 399013. Sa. M. 935 122. –— Kredit: Einnahmen: Stromlieferung, Zähler- miete, Prov. u. abgeschrieb. Eingänge 935 122.

Dividenden: 1898/99–1899/1900: 0, 0 % (Baujahre); 1900/1901–1903/1904: 6, 6, 0 0 95 (Für die Aktien Nr. 3751–4000 für 1901/1903 nur 6 % p. r. t. = M. 19.90 pro Stück.) Coup.- Ver .tk.)

Direktion: Techn. Dir. Bernh. Goldenberg, kaufm. Dir. Alfr. Thiel.

Prokurist: Ing. Ferd. Simonsen.

Aufsichtsrat: (Mind. 3) Vors. Hugo Stinnes, Aug. Thyssen, Mülheim a. d. R.; Ober- bürgermeister Erich Zweigert, Komm.-Rat Carl Funke, Essen a. d. R.; Bank-Dir. Komm.-Rat Klönne, Berlin; Seehandlungs-Rat a. D. Schoeller, Geh. Ober-Finanzrat Bank-Dir. W. Müller, Berlin; Geh.-Rat Kirdorf, Rheinelbe. Zahlstelle: Essen: Gesellschaftskasse.

Württembergische Gesellschaft für Elektrizitätswerke in Esslingen.

Gegründet: 23./1. 1884 in Cannstatt unter der Firma Electrotechnische Fabrik Cannstatt. Lt. G.-V. v. 29./6. 1904 nach Esslingen verlegt u. Firma wie gegenwärtig geänd.; eingetr. 23./9. 1904.

Zweck: Früher Herstellung von Dynamomaschinen, elektr. Bogen- u. Glühlampen, sowie überhaupt aller in die Elektrotechnik gehörigen Gegenstände. Die Ges. hatte 1887 ihren Fabrikationsbetrieb an die Maschinenfabrik Esslingen abgegeben, welche für die Fortführung desselben in Cannstatt eine Abteilung für Elektrotechnik errichtete, und welche nach wie vor unverändert fortbesteht. Dagegen hat die Württ. Ges. für Elektrizitätswerke 1904 die der Maschinenfabrik Esslingen gehörenden Elektrizitätswerke in Urach, Tuttlingen, Metzingen u. Böblingen, sowie das Gaswerk Metzingen, ferner den Betrieb des von der Maschinenfabrik Esslingen gepachteten Elektrizitätswerkes Gmünd und den Bau u. Betrieb des Elektrizitäts- werkes Ravensburg übernommen. Nach den neuen Statuten ist jetzt Gegenstand des Unter- nehmens der Ges.: Herstellung von beliebigen in das Gebiet der Elektrotechnik gehörigen Gegenständen; Einrichtung elektr. Anlagen jeglicher Art u. deren Betrieb. Die Ges. darf sich auch bei anderen Unternehm. in jeder Form beteiligen. Ferner ist die Ges. zum Handel in allen Rohstoffen, Halb- u. Ganzfabrikaten, welche mit dem Gegenstand ihres Geschäfts- betriebs im Zus. hang stehen, berechtigt.

Kapital: M. 500 000 in 500 Aktien à M. 1000. Hauptaktionär ist die Maschinenfabrik Esslingen, die bei der Rekonstruktion im Jahre 1904 auch die Unterbilanz deckte.

Geschäftsjahr: 1./4.–31./3.; früher bis 1904: Kalenderj.

Gen.-Vers.: Im I. Sem. Stimmrecht: 1 Aktie = 1 St.

Bilanz am 31. Dez. 1903: Aktiva: Debit. 173 373, Verlust 326 626. Sa. M. 500 000. – Passiva: A.-K. M. 500 000.

Gewinn-u. Verlust-Konto: Debet: Verlustvortr. 326 626, Unk. 42. – Kredit: Kredit. 42, Saldo 326 626. Sa. M. 326 699. Dividenden 1881–1903: 0 %.

Direktion: Ludwig Kessler. Aufsichtsrat: Vors. Geh. Komm.-Rat von Pflaum, Stellv. Dr. H. Steiner, Dir. A. von Kaulla, Stuttgart.

―

wßr-a =