996 Elektrotechnische Fabriken, Elektricitätswerke und Hilfsgeschäfte.

Kapital: M. 1 500 000 in 1500 Aktien à M. 1000. Die Aktien Nr. 1–820 sind seit Ende 1900 voll eingezahlt, wogegen auf Aktien Nr. 821–1500 über 25 % eine weitere Einzahlung nicht er folgte, sodass dieselben lt. Anzeige v. 18./10. 1900 ihrer Anteilsrechte an den Aktien verlustis erklärt wurden; in der Bilanz ausgedrückt durch das Aktien-Einzahl.-Kto von M. 510 000 bezw. M. 170 000, letztere zu gunsten der Ges. verfallen (s. Bilanz).

Bilanz am 31. Dez. 1903: Geheimverfahren 500 000, Aktien-Einzahl.-Kto: nicht geleistete Einzahl. 510 000, Verlustigkeits-Erklär. zu gunsten der Ges. 170 000; Kassa 894, Masch. u. Utensil. 18 833, Gebäude u. Grundstücke 196 180, Waren 1870, Wasserbaukto 1, Debit. 3715, Verlust 146 163. – Passiva: A.-K. 1 500 000, Kredit. 8657, Rücklage 4000, Hypoth. 35 000. Sa. M. 1 547 657.

Gewinn- u. Verlust-Konto: Verlustvortrag 174 364, Waren 1721, Gen.-Unk. 10 101, Reparat. 496, Masch. u. Utensil. 30 464, Wasserbau 58 599, Hypoth. 35 000. Abschreib. auf Debit. 1046, do. auf Grundstücke u. Gebäude 43 524, Kückl. 4000, Brennmaterial. 19. – Kredit: Miete u. Pacht 871, Zs. 21, Kredit.-Abschreib. 37 779, Aktien-Einzahl.-Kto 170 000, Vergleichskto 4500, Verlust 146 163. Sa. M. 359 339.

Direktion: A. Ebeling. Aufsichtsrat: Vors. Hauptmann a. D. Jul. Hofmann, Jena: Rentner Stromeyer, a. D. Paul Kabis, Weimar.

Lenne-Klectricitäts- und Induss Werke in Werdohl.

Geschäftsbureau in Plettenberg II.

Gegründet: 14./1. 1896. Letzte Statutänd. 30./9. 1899.

Zweck: Errichtung und Betrieb eines Elektricitäts- und Industriewerkes unter Benutzung der Lenne-Wasserkraft mit Übertragung der elektrischen Leitung nach Plettenberg, Werdohl und anderen Orten, sowie jede Herstellung und Verwertung elektrischer Energie und der damit zus.hängenden Gebrauchsgegenstände. 1900/1901 Vergrösserung der Centrale, 1903/1904 Erweiterung des Leitungsnetzes von Werdohl durch das Versethal nach Klein- hammer, wo eine seit Ende Nov. 1903 im Betrieb befindliche Unterstation errichtet ist. Zahl der Anschlüsse am 1./4. 1903: 77 6921 Glüh- und 34 Bogenlampen.

Kapital: M. 1 650 000 in 450 St.-Aktien Lit. A (Nr. 1–450) à M. 2000 und 750 Vorz.-Aktien Lit. B (Nr. 451–150) à M. 1000. Von IStleben wurden lt. G.-V.-B. vom 2. Dez. 1898 300 Stück neu ausgegeben. Die Vorz.-Aktien berechtigen zu 6 % Vorz.-Div. mit event. Nachzahlungsverpflichtung und werden im Falle Liquid. der Ges. vorab befriedigt.

Anleihen: I. M. 500 000 in 4½ % Oblig. von 1900, rückzahlbar zu 103 %, Stücke à M. 1000, Zs. 1./4. u. 1./10. Tilg. ab 1902 durch jährl. Ausl. im März auf 1./4. Zahlstellen: Pletten- berg: Gesellschaftskasse; Essen: Essener Credit-Anstalt; Frankf. a. M.: Grunelius & Co. Noch in Umlauf Ende März 1904 M. 490 000.

II. Die G.-V. v. 27./9. 1902 beschloss Aufnahme einer neuen 5 % Anleihe für Er- weiterung des Werkes und Verstärkung der Betriebsmittel von M. 200 000. Geschäftsjahr: 1./4.–31./3. Gen.-Vers : Im I. Geschäftshalbj. Stimmrecht: 1 Aktie 1 St.

Gewinn-Verteilung: 5 % zum R.-F., 6 % Div. an Vorz.-Aktien (die event. nachzuzahlen iIst%

6 % vertragsm. Tant. an Vorst., Dotierung von Sonderrücklagen, bis 4 % Div.

an St.-Aktien, vom verbleib. Betrage 10 % Tant. an A.-R. (wobei der Vors. den 400

Anteil wie die anderen Mitglieder kalés jedoch höchstens M. 500 mehr als diese), hier-

nach bis 2 % weitere Div. an St.-Aktien, vom Rest zunächst wieder 1 % Super-Div. an

Vorz.-Aktien und hierauf 1 % an St.-Aktien, bis jede Aktiengattung 10 % erhalten hat,

am ferneren Gewinn nimmt das ganze A.-K. gleichmässig teil.

Bilanz am 31. März 1901: Akfiva: Grundbesitz 85 318, Gebäude 112 600, Gefälle- gerechtsame 900 000, Wasseranlagen 343 500, elektr. Anlagen 806 900, Mobil. 5930, Werkzeuge 1770, Effekten 23 000. Waren 20 599, Debit. 32 269, Bankguth. 68 062, Kassa 6201. – Passiva: St. -Aktien 900 000, Prior.-Aktien 750 000, Oblig. I 490 000, do. II 200 000, R.-F. 8615 (Rückl.

2363), Delkr.-Kto 3842, Kredit. 3079, Div. an Prior.-Aktien 45 000, Vortrag 5612. Sa. M. 2 406 749.

Gewinn- u. Verlust-Konto: Debet: Öblig.-Zs. 30 900, Handl. Unk. 9770, Betriebs- do. 11 029, Gehälter 16 270, Löhne 18 571, Miete 338. Kohlen 7263, Delkr.-Kto 793, Abschreib. 40 568, Gewinn 52 976. . Kredit: Vortrag 5708, Installation 5470, Licht u. Kraft 175 441, Zs. 1859. Sa. M. 188 478.

Dividenden: 1896/9 : 0, 0, 0 % (Baujahre); 1899/1900: 6 % auf die Aktien Lit. B p. r. t.: 1900/1901: 6 %; 1901/1902–1903/1904: 0, 6, 6 %. Aktien A 1899/1900–1903/1904: 0 %. Goup.-Verj.: 4 J. GK.

Direktion: Ernst Brüninghaus jr., Ingenieur Gustav Brüninghaus, Ing. Hugo Kötter.

Aufsichtsrat: (66) Vors. Paul Noelle, Lüdenscheid: Stellv. Herm. Heymann, Berlin; Wilh. Brüninghaus. Heh. Thomeé jun., Dr. A. Contze, Werdohl; Herm. Thielen, Mülheim (Ruhr).

Zahlstellen: Plettenberg: Gesellschaftskasse; Essen: Essener Credit-Anstalt.

G Elektrizitätswerke Act.-Ges. in Wiesloch. Baden.

Gegründet: 9./7. 1898 mit Sitz in Karlsruhe; eingetr. 26./7. 1898. Letzte Statutänd. v. 27./9. 1900, 18. 3 1902, 26./9. 1903 u. 29./9. 1904. Die G.-V. v. 28./9. 1901 beschloss Verlegung

des Sitzes der Ges. von Karlsruhe nach Wiesloch. Gründer s. Jahrg. 1899/1900.