Bäder, Quellen-Produkte, Wasch-Anstalten etc. 1517

Oberhausener Wasserwerk in Oberhausen, Rheinland.

Letzte Statutänd. 27./4. 1901.

Zweck: Versorgung der Werke der Aktionäre sowie der Stadt Oberhausen und anderen benachbarten Gemeinden mit Wasser.

Kapital: M. 300 000 in 500 Aktien à M. 600. Darlehen: M. 600 000.

Geschäftsjahr: Kalenderj. Gen.-Vers.: Bis April. Stimmrecht: 1 Aktie = 1 St.

Bilanz am 31. Dez. 1907: Aktiva: Grundbesitz 170 000, Masch. u. Kessel 84 000, bauliche Anlagen 160 000, Rohrleit. 472 000, Werkzeuge 1, Wassermesser 58 000, Vorräte 29 474, Schuldner 50 991, Kassa 26 852, vorausbez Versich. 2626, Bürgschaften 3673, Wertp. 52 969. – Passiva: A.-K. 300 000, Rücklage 30 000, Sonderrücklage 30 000, Ern.-F. 40 000, Schuld- verschreib. 600 000, fällige do. 6390, Gläubiger 73 334, Gewinn 30 863. Sa. M. 1 110 587.

Gewinn- u. Verlust-Konto: Debet: Betriebskosten 218 524, Zs. 24 228, Kursverlust 1956, Abschreib. 95 107, Gewinn 30 863. – Kredit: Vortrag 1320, Einnahmen 369 360. Sa. M. 370 680.

Dividenden 1888–1907: 8, 9, 7, 7, 7, 8, 10, 10½, 12½, 2, 5, 8, 10, 15, 17, 20, 10, 10, 10, 10 %.

Direktion: W. Liebrich. Aufsichtsrat: Vors. Dir. Dr. Ross, Amtsger.-Rat a. D. Ed. Carst.

Zahlstellen: Eigene Kasse; Duisburg: Mittelrhein. Bank.

Wasserwerk OÖppenheim in Oppenheim a. Rhein.

Kapital: M. 180 000 in 180 Aktien à M. 1000, von denen die Continentale Wasserwerks- Ges. in Berlin 108 Stück besitzt. Geschäftsjahr: Kalenderj. Gen.-Vers.: Im I. Sem. Bilanz am 31. Dez. 1907: Aktiva: Immobil. 62 019, Masch. 25 815, Rohrleitung 100 661, Hauszuleitung 17 470, Wassermesser 23 693, Utensil. 504, Vorräte 268, Hypoth. 17 000, Spar- kasse 4061, vorausbez. Steuern etc. 489, Kassa 3335. – Passiva: A.-K. 180 000, R.-F. 15 942, Abschreib.-Kto 35 000, Extra- do. 8300, Gewinn 16 076. Sa. M. 255 319.

Gewinn-u. Verlust-Konto: Debet: Betriebs-Unk. 11 926, Abschreib. 2000, Gewinn 16 076. – Kredit: Vortrag 426, Betriebseinnahmen 29 229, Zs. 346. Sa. M. 30 003.

Dividenden 1895–1907: 6, 6, 6, 6½, 6½, 7, 7½, 7½, 7½, 7½, 7½, 7½, 7½ %.

Direktion: E. Fröhlich. Prokurist: Otto Liebmann.

Aufsichtsrat: (3–5) Vors. O. Smreker, Obering. Curths.

Stuttgarter Eisfabrik in Liqu. in Stuttgart.

Gegründet: 16./6. 1886. Die a. o. G.-V. v. 20./4. 1907 beschloss die Auflös. der Ges.

Zweck: Eisfabrikation, Errichtung oder Erwerbung von Eisfabriken, Kälteerzeugungs- anlagen, Eismagazinen und Handel mit Eis.

Kapital: M. 120 000 in 120 Nam.-Aktien à M. 1000. Hypotheken: M. 241 000.

Geschäftsjahr: Kalenderj. Gen.-Vers.: Bis Juni. Stimmrecht: 1 Aktie = 1 St. Zilanz am 31. Dez. 1906: Aktiva: Immobil. 233 003, Masch. 105 082, Utensil. 2501, Brunnen- tiefbohrkto 4000, Fischzucht 260, Kassa 1492, Fuhrrequisiten 15 561, Debit. 53 775. – Passiva: A.-K. 120 000, Hypoth. 198 000, R.-F. 6332, Kredit. 88 493, Gewinn (Vortrag) 2852. Sa. M. 415 678.

Gewinn- u. Verlust-Konto: Debet: Verlustvortrag 9045, Betriebs-Unk. 97 845, Gewinn (Vortrag) 2852. Sa. M. 109 743. – Kredit: Eiskto M. 109 743.

Liquidationseröffnungs-Bilanz am 20. April 1907: Aktiva: Immobil. 313 800, Masch. 22 600, Utensil. 100, Fuhrrequisiten 5465, Debit. 2487, Vorräte 1146, Eduard Kober 40 138, Kassa 465, Verlust 15 436. – Passiva: A.-K. 120 000, Hypoth. 241 000, Kredit. 40 639. Sa. M. 401639.

Dividenden 1892–1906: 3½, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0, 0 %

Cewinn 1896–1906: M. 7666, 1787, 340, 3513, 4134, 0, 3367, 591, 0, 0, 2852.

Lidquidator: Theod. Haas. Aufsichtsrat: Vors. Wilh. Kaiser, Otto Bock, Eb. Kober, Carl Bock, Stuttgart; H. Vosseler, Ludwigsburg.

Bäder, 0uellen-Produkte, Wasch-Anstalten ete.

7* 0 7 Aachener Thermal-Wasser (Kaiserbrunnen) Akt-Ges. Sitz in Aachen. it Gegründet: 18./6. 1884, besteht seit April 1818. Statutänd. 17./7. 1900, 3./2. 1902 u. 11./5. 1907. 3 8 der Ges. bis 17./7. 1900 Hamburg. Zweck: Gewinnung u. Vertrieb des Aachener Thermal- assers auf Grund eines mit der Stadt Aachen bestehenden Vertrages. „Rapital: M. 240 000 in 240 Aktien à M. 1000 nach Erhöhung von urspr. M. 100 000 um 20 000 1891 u. um M. 120 000 1892. Hypotheken: M. 65 626.