22

Elektrotechnische Fabriken, Elektricitätswerke und Hilfsgeschäfte.

Stadt bereits ab 1919 die Anlagen unter gewissen Bedingungen übernehmen. Anlagewert 1./10. 1908 M. 2 036 837. Bruttogewinn 1905/1906 M. 129 336. Leistungsfähigkeit 1700 Hb.

Die Ges. erwarb 1899/1900 von der Firma Siemens & Halske die derselben auf 50 Jahre erteilte Koncession zum Betriebe eines Elektricitätswerkes und einer elektrischen Strassenbahn in Hof. Der Bau kostete etwa M. 1 600 000. Betriebseröffnung 1./7. 1901. Anlagewert 30./9. 1908 M. 1 708 288. Leistungsfähigkeit 1580 HP.

Ferner erwarb die Akt.-Ges. mit Genehmigung der ausserord. G.-V. vom 27./4. 1901 von der Firma Siemens & Halske A.-G. das Elektricitätswerk des Ostens von München, u. zwar zum Anlagewerte per 1./7. 1901 von M. 1 745 286. Ausserdem übernahm die A.-G. zum Nennwert die gesamten nom. Lire 800 000 der jetzt voll eingezahlten Aktien der Elettricitä Toscana in Pisa, ferner die gesamten Lire 1 200 000 der ebenfalls jetzt voll eingezahlten Aktien der Elettricitä Umbra in Perugia u. die gesamten Lire 800 000 Aktien der Elettricita Alessandrina in Alessandria. Italien.

Das Elektricitätswerk des Ostens von München in Riem wurde erbaut auf Grund im Jahre 1898 zwischen der Firma Siemens & Halske A.-G. und 46 Gemeinden bezw. Ortschaften abgeschlossenen Verträge. Koncessionsdauer für die Gemeinden Berg am Laim und Taufkirchen 30 Jahre, für alle übrigen Gemeinden 40 Jahre. Die Inbetrieb- setzung der Centrale, welche mit 1250 HP. arbeitet, erfolgte am 24./1. 1900, die Koncession läuft bis 31./12. 1930 bezw. 31./12. 1940, sie ist eine ausschliessliche und unbeschränkte. Anlagewert jetzt M. 1 834 497. Für die Erteil. der Konc. werden die Gemeinden an dem über 7 % des Herstellungspreises der Anlage hinausgehenden Reingewinn beteiligt.

Die Unternehmungen der drei vorerwähnten italienischen Elektricitätsgesellschaften, deren Aktien erworben wurden, sind folgende:

Das Elektr.-Werk Pisa A.-G. Elettricità Toscana. A.-K. Lire 800 000. Betrieb begonnen 1./12. 1899. Centrale mit 570 HP. Die Konc.-Dauer läuft bis 17./8. 1926. Anlagewert 1./7. 1908 M. 1 701 286. Leistungsfähigkeit 930 HP.

Das Elektricitätswerk und die Strassenbahn in Perugia, welche von der A.-G. Elettricita Umbra betrieben werden. A.-K. Lire 1 200 000. Die Inbetriebsetzung der mit 850 HP. ausgerüsteten Centrale und der ca. 4 km langen Bahn erfolgte am 1./1. 1900. Konc. bis 31./12. 1929. Anlagewert am 1./7. 1908 M. 1 734 228. Leistungsfähigkeit 950 HP.

Die A.-G. Elettricita Alessandrina betreibt das Elektricitätswerk Alessandria in Italien. A.-K. Lire 800 000. Centrale mit 700 HP. Inbetriebsetzung am 1./1. 1900. Koncession bis 31./12. 1929. Anlagewert 1./7. 1908 M. 843 714. Leistungsfähigkeit 700 HP. — Die Anlagewerte bei den 3 italien. Gesellschaften setzen sich aus dem A.-K. und den Buch.- forderungen zusammen.

Nach einem von der ,Siemens“ Elektrische Betriebe A.-G. mit der Firma Siemens & Halske A.-G. getroffenen Abkommen pachtete letztere Ges. den Betrieb der Centralen in Hof, München-Ost, Perugia, Alessandria, Malaga und Pisa unter folgenden Be- dingungen: Siemens & Halske A.-G. führen den Betrieb selbständig, bestreiten alle Ausgaben einschl. Steuern, Versicherungen etc. und vereinnahmen alle Einnahmen und garantieren einen an die Verpächterin Ende des Jahres abzuliefernden Betriebs- überschuss von 7½ % des Anlagekapitals. Beträgt der Betriebsüberschuss mehr als 7½ %, so erhalten von dem Mehr die Verpächterin ¾, die Siemens & Halske A.-G. I. Diese 7½ % sind wie folgt zu verwenden: 5 % zur Verzinsung des Anlagekapitals, 2½ % für Rückstellung in den Ern.- u. Tilg.-F. Der Anteil des Ertrages über 7½ % steht zur freien Verfügung der Verpächterin. Ebenso garantieren Siemens & Halske A.-G., welche unter sinngemässer Anwendung der vorstehenden Pachtbedingungen den Betrieb der Centralen in Pisa, Perugia und Alessandria überwachen, der Akt.-Ges. auf den von ihr auf- gewendeten Betrag für die einzelnen Anlagen ein Jahresergebnis von mind. 7½ %, wovon 2½ % für den Ern.- u. Tilg.-F. bestimmt sind.

Übersicht über die Werke der Gesellschaft:

Erzeugte EKilowaftstunden .% ....... im Geschäftsjahre 8 P8S. 1903/04 1904/05 1905/06 1906/08 5 Centrale: 15./12. 1898 5 Weimar. Bahn: 4./6. 1899 1700 601 410 732 800 823 560 2 Malaga 03 1360 1350 1 834 455 2 166 062 2 426 400 entrale: 1./7. 0 = Hof Bahn: 1./8. 1901 1580 767 180 832 620 960 160 3 8 München-Ost. 24. Januar 1900 1250 907 053 9959 704 8 395 28 Pisa 1. Dezember 1899 930 577 718 629 268 79 5 Perugia. 1. Januar 1900 950 640 480 731 859 807 790 Alessandria 1. Januar 1900 700 534 863 564 071 646 640

Die mit Siemens & Halske A.-G. abgeschlossenen Pachtverträge laufer Elektricitätswerke Hof, Osten von München, Perugia, Alessandria bis 30./6. 1921,

& Halske A.-G. garantierte Pachtminimum hat im Geschäftsjahr tragen und beträgt nach dem Anlagewert per 30./9. 1906 für das Gesc mindestens M. 722 340; als effektiven Zuschuss hatten Siemens & Halske 1901/

ufen für die

für das Elektricitätswerk Malaga bis 30./9. 1921 und für Pisa bis 30./6. 1926. Das von Siemens

1905/06 M. 715 993 häftsjahr 1906/07 1902 bis

be-