Ausländische Industrie-Gesellschaften. 29

rand mit elektrischer Kraft zu versorgen. Die Regierung ist dabei berechtigt, die unter dieser Konzession errichteten Anlagen vom 1./11. 1948 ab zu einem schiedsrichterlich fest- gestellten Kaufpreise zu übernehmen, der berechnet werden soll, indem der durchschnitt- liche jährliche Reingewinn der letzten 5 Jahre nach Ausscheidung des ungünstigsten mit 5 % kapitalisiert u. für eventuelle Neuanlagan der letzten Jahre ein angemessener Zuschlag hinzugeschlagen wird. Aus dem Reingewinn der unter dieser Konzession betriebenen Anlagen erfolgt eine jährliche Abgabe von 2½ %, im Minimum £ 500, an die Regierung. Die Konzession der General Electric Power Co. umfasst lediglich das Gebiet der Minen- gruppe der Consolidated Goldfields und ist zeitlich nicht begrenzt; ein eventueller Erwerb durch die Regierung ist nicht vorgesehen. Um sich für die Zukunft den Kraftbezug von den Victoria-Wasserfällen des Zambesiflusses zu sichern, hat die Ges. von dem African Concessions Syndicate Limited auf Grund seiner von der British South Africa Co. (Chartered Company) erhaltenen Berechtsame folgende Rechte erworben: Erstens, das ausschliessliche Recht, für dis Zeit von 75 Jahren vom 31./12. 1906 ab aus dem Zambesifluss an den Victoria- Fällen Wasser u. Wasserkraft für die Erzeugung von maximal 250 000 PS elektrischer Energie zu entnehmen u. die gewonnene elektrische Kraft durch Oberleitungen oder sonst- wie innerhalb Rhodesiens u. nach den Nachbargebieten weite zuleiten u. zu verwerten; sobald der Maximalbetrag von 250 000 PS erreicht ist, steht es dem African Concessions

Syndicate frei, die ferneren Wasserkräfte anderweit zu verwerten; zweitens, für den gleichen

Zeitraum einen Bodenkomplex in Verfügung u. Benutzung zu nehmen, der vom Livingstone Island bei den Victoria-Fällen als Zentrum aus einen Kreis von 5 engl. Meilen Radius um- fasst, wobei nur bezüglich der innerhalb dieses Bezirkes vorhandenen Parkanlagen gewisse beschränkende Bestimmungen auferlegt sind; hierzu kommen drittens Wegerechte im ganzen Gebiet der Chartered Company, ferner zwei auf die Aufspeicherung elektrischer Kraft auf hydraulischem Wege bezügliche Patentrechte, ferner das Recht kostenloser Holz- entnahme für Bauzwecke, eine Reihe weiterer Landbenutzungsrechte, sowie eine Reihe von minder wichtigen zur Förderung des Unternehmens bestimmten Rechten. Nach Ablauf der 75jährigen Frist ist die Chartered Company berechtigt, das Unternehmen zum schieds- richterlich festgestellten Taxwerte zu erwerben. Die UÜbertragung der Berechtsame der Victoria-Fälle-Kraft-Gesellschaft an andere ist an die Genehmigung des African Concessions Syndicate gebunden. Besitz u. Anlagen der Ges. setzen sich wie folgt zusammen: 1. Ein 1 Morgen 128 qR grosses Grundstück in der Stadt Germiston, auf welchem die im Betrieb befindliche, früher der General Electric Power Co gehörige Kraftstation von 5000 Ps liegt. 2. Ein 9 Morgen 152 qR grosses Grundstück bei Brakpan, auf welchem die in Betrieb befind- liche, früher den Rand Central Electric Works gehörige Kraftstation von 3550 PS liegt. Auf diesem Grundstück wird zurzeit eine zweite Kraftstation von 8000 Ps errichtet, die zwei Turbogeneratoren enthalten wird und deren Bau in den Händen der Allgemeinen Elektricitäts-Gesellschaft zu Berlin liegt. 3. Ein bei Simmerpan in der Nähe von Germiston gelegenes, 8 Morgen 232 qR grosses Grundstück, auf welchem sich eine Kraftstation von 16 000 PS (4 Turbogeneratoren) im Bau befindet. Die Ausführung des Baues liegt gleich- falls in den Händen der Allgemeinen Elektricitäts-Ges. zu Berlin. 4. Ein in der Nähe von Rosherville Dam gelegenes, 8 Morgen 200 qR grosses Grundstück, welches für eventuelle weitere Neu-Anlagen zur Verfügung bleibt. 5. Ein für den Zeitraum von 75 Jahren zur freien Benutzung überlassener, einen Kreis von 5 englischen Meilen Radius umfassender Landkomplex an den Victoria-Fällen des Zambesiflusses, auf dem die spätere Errichtung hydraulischer Kraftanlagen beabsichtigt ist. Die Neu-Anlagen in Brakpan u. bei Simmerpan werden durch 2 parallele Transmissionslinien von 63 km Länge bei einer Spannung von 40 000 Volt verbunden werden. Der Strom soll von beiden Zentralen, sowie von 2 zu errichtenden Unterstationen aus bei 10 000 Volt Spannung verteilt werden. Die Station Simmerpan wird voraussichtlich in der ersten Hälfte des Jahres 1909 in Betrieb gesetzt werden. Auf der neuen Station Brakpan ist mit der Stromabgabe im Sept. 1908 begonnen worden. Für die event. Errichtung noch einer weiteren Kraftstation am Rand ist durch einen Vertrag mit der Firma Lewis & Marks, London, u. der ihr nahestehenden Kohlen- bergbau-Gesellschaft Vereeniging Estates Co. Ld. unter für die Gesellschaft vorteilhaften Bedingungen ein Terrain gesichert worden. An allen vorgenannten Plätzen hat sich die Ges. ausreichende Wasserrechte für Kesselspeisung u. Kondensation gesichert.

Arbeits-Ergebnisse:

Es betrugen in Germiston Brakpan die abgegebenen Gie die abgegebenen die Kilowattstunden Bruttoeinnahmen Kilowattstunden Bruttoeinnahmen 1903 £ 36 730. 9. 1 £ 70 513. 9. 4 1904 38 597.10.11 „ 94 818. 9.10 1905 „ 74 676.14.11 „100 524.16. 7 1906 „ 80 667. 5. 4 „ 07 457.11. 5 1907 13 604 001 „31138 7775 211 „ 82 228. 0. 3

Kapital: £ 3 000 000, u. zwar £ 1 000 000 St.-Aktien, £ 2 000 000 Vorz.-Aktien, hiervon begeben: £ 1 000 000 St.-Aktien, £ 808 000 Vorz.-Aktien in Aktien à £ 1. Die Vorz.-Aktien erhalten vom 1./1. 1909 an 6 % Div. mit Nachzahlungsverpflichtung; der übrige Reingewinn wird auf Vorz.-Aktien u. St.-Aktien bis zur Höhe von 4 % per rata verteilt, so dass auf die Vorz.-Aktien insgesamt 10 %, auf die St.-Aktien 4 % Div. entfällt. Darüber hinaus entfallen