Gebr. Hörling Il. ö.

Lörtingsdorf b. Hannover

Gasmaschinen und Pumpen

Dieselmotoren, Sauggasanlagen, Motoren für flüssige Brennstoffe, Bootsmotoren, Flugmotoren, Unter- seebootsmotoren, Zentrifugal- u. Kolbenpumpen, kompl. Wasserver-

sorgungs- u. Kanalisationsanlagen

Zentralheizungen

Niederdruckdampf-, Hochdruckdampf- und Hb- dam pfheizung, Dampfheizung mit Luftumwälzung (Milddampfheizung), Warmwasserheizung, Fern- heizwerke für Dampf und Warmwasser, Warm- wasserbereitungs- und Sadeanlagen, Lüftungs- und Trockenanlagen jeder HArt, Entstaubungsanlagen

Strahlapparate

Strahlapparate aller Art, die, mit gespanntem Wasser, mit Dampf Luft oder Gasen betrieben, zur Förderung

von Wasser Dampf oder Gasen benutzt werden.

Luftbefeuchtungen, Oelfeuerungen, Wasserreiniger, Zerstäubungseinrichtungen für jeden Bedarf passend,

Eisenbahnbremsen, Pulsometer, Hrmaturen.