a――=―=- ――

= ―― 5 I

W 03 * *. 1

ale

NICI

==―=―

* Bergwerkseinrichtungen Verlade- und Transportanlagen Hafenanlagen und Hafenkrane Wertteinrichtungen

Krane aller Art Hochofenanlagen Stahlwerkseinrichtungen Walzwerksanlagen Eisenkonstruktionen Lasthebemagnete

Ketten und Schmiedestücke Zahnräder

Deutsche Maschinenfabrik Lc. Duisbur9

=Z―= =Z―――,§― ――――――― ――