1 B:- B.-.R B.A. ./.

./. .. 2

1* * 7 ―

ÜAIIULiI

KÖgrlNésbonpf- III=

MM n ― estk =――― ―

=== ― .ffi 3

= 5 3 M.

-0es bfsffcca- 1

Dieselmotoren für Rohöl, Teeröl etc. Sauggasanlagen für alle Brennstoffe

Motoren für flüssige Brennstoffe

Pumpen. Homplette Wasserversorgungsanlagen

ZEFNTRAIMZIMZUNMH rAHAPPAR=

Warmwasserheizungen, 14 Zum Fördern von gasförmigen Niederdruckdampfheizungen 8 flüssigen oder festen Stoffen, mit Luftumwälzung, Fern- Injektoren, Pulsometer, Oel- heizwerke, Bade-, Lüftungs-, feuerungen, Luftbefeuchtungs- Trocken- und Entstaubungs- anlagen, Eisenbahnbremsen,

anlagen Wasserreiniger

――

―――――――――――