344 Erzbergwerke und Hüttenbetriebe.

Gewinnung von Nebenprodukten. Bahnanschluss (Kleinbahn 13 km) von Werne nach Ermelinghof; Baukosten der Bahn ca. M. 1 500 000. Die Gesamtkosten der Zechen-Anlage beliefen sich Ende Juni 1908 auf M. 18 749 425. Anfang Dez. 1905 erfolgte auf Zeche Werne eine Schlagwetterexplosion, durch welche Bauten und Masch. erheblich beschädigt und zum Teil zerstört wurden. Der Schaden war bedeutend, da infolge der Explosion die Kohlen- beförderung der Zeche für unbestimmte Zeit eingestellt werden musste. Nach Feststellungen von Anfang 1907 betrug die für die Beseitigung der gesamten Explosionen u. Brandschäden aufgewendete Summe ca. M. 2 700 000. Der frühere Stand der Förderung (ca. 1000 t täglich) konnte erst Ende 1907 wieder erreicht werden; solange brachte die Zeche dem Verein auch keine Erträgnisse. Es werden die 2. u. zugleich 3. Tiefbausohle abgeteuft. Die Aufschliess. neuer Flöze ist im besten Gange. Förderung 1909/10 täglich ca. 1200 t, 1910/11 täglich ca. 1314 t, 1911/12 täglich ca. 1471 t, soll nach Ausbau der 1000 m Sohle u. nach Schaffung von weiteren Arb.-Wohnungen auf 2000 –2500 t täglich gebracht werden. Arb. ca. 2300. Die Abteil. Werne hat 1909/10 noch eine grosse Zubusse erfordert; auch im J. 1911/12 waren Aufwend. noch notwendig. Der Grund für die langsame Entwicklung der Förderung liegt im wesentlichen in dem auch gegenwärtig noch herrschenden Arbeitermangel.

Ausser den gedachten Betrieben besitzt der Verein die dem öffentlichen Verkehr dienenden Eisenbahnen von Oesede über Georgs-Marienhütte nach Hasbergen (normalspurig. 9 km lang) mit einer 4 km langen Anschlussbahn zum Hüggel, die Bergwerksbahn Hasbergen- Perm (9,5 km lang) u. die 17 km lange Wallückebahn von Kirchlengern nach der Wallücke: an einer anderen Kleinbahn vom Piesberge nach Hörstel zum Dortmund-Emshäfen-Kanal

u. Rheine hat sich die Ges. beteiligt.

Der Gesamtgrundbesitz der Akt.-Ges. beträgt 867 ha 37 a 03 qm, davon entfallen auf Fabrikräume u. zu Betriebszwecken benutzte Hofräume u. Plätze 239 ha 43 a 17 qm, sonst. Haus- u. Hofräume 35 ha 89 a 07 qm, Forsten u. Holzungen 188 ha 47 a 50 qm, Acker, Gärten, Wiesen u. Weiden 276 ha 36 a 96 qm, Bahnen ausserhalb des Werksgebiets 77 ha 70 a 30 qm, Sonstiges 79 ha 50 a 03 qm. Gesamtzahl der Wohnhäuser: 543 Häuser mit 1218 Wohnungen, 5 Kost- u. Logierhäuser für 685 unverheiratete Arbeiter. Gesamtstrecken- länge der Eisenbahnen ausschliesslich Werkgleise 54.7 km. Gesamtzahl der Beamten 350. Gesamtzahl der Arbeiter 8395.

Produktion: 1906/07 1907/08 1908/09 1909/10 1910/11 1911/12 Georgs-Marienhütte:

Erze. 314 337 3 §363659 058 39 092 / ? . %% 91 285 111 730 136 580 148 350 ½/ ⁊ P⅛¾éPN¼̃¼ẽNẽNẽPẽỹ . . 80 770 114 970 142 230 178 820 %%%....... 10 912 2229 8 243 8009 7.189 8 189 %% 1 545 684 176

/ßc.......Ü.Ü*A ͥ .Q.. 258 243 112

Schlackensteine 1000 Stück 16 725 15 570 000 14 129 500 18 734 000 16 691 000 14 727 600 hlackenabsatz 90 433 83 035 101 327 98 264 103 125 89 434 Umsatz . . M. 10 468 857 11 037 208 9 847 149 12 557 334 13 719 110 18 346 076

Stahlwerk Osnabrück:

Rohstahl ........ 97 148 65 321 23 391 24 922 26 252 27 358 (ete. 74 302 79 363 67 418 74 102 81 706 84729 %%%% 6529 5 955 3 442 3 804 3 841 3577 Feuerfeste Steine. . . „ 6 753 7 127 6 441 5 013 5820 4 821 Umsatz . . M. 14 042 167 14 655 115 13 364 980 14 017 918 14 339 128 15 791 630

Abteilung Piesberg: Steingewinnung, bearbeitet t 51 236 45 420 50081 51 450 48 146 44 560 unbearb. „ 438 714 422 187 528 512 620 346 643 125 603 691 Abteil. Werne: Kohlenförd. „ 98 337 288 450 338 789 357 668 389 630 438 455 Koks 98 691 93 228 94 636 97128 Steine 1000 Stück 9835 8 013 6391 8688 9 448 9233

Beteil. beim Stahlwerksverband 90 500 t auf A-Produkte. Beteil. beim Kohlensyndikat für Kohlen 340 000 t, für Koks 100 000 t. Die Ges. hat sich ausserdem hinsichtlich eines Teiles ihrer sonst. Fabrikation. Verkaufsvereinigungen (der Ammoniak- u. Teerverkaufs-

Vereinigung, der Radreifen-Gemeinschaft, der Radsatz-Gemeinschaft, der Weichen-Vereinigung, der Zungenvorrichtungen-Vereinigung, der Herzstück-Vereinigung, der Klemmplatten-Ver- einigung, der Drehstuhl-Vereinigung und der Gleitstühle-Vereinig.) angeschlossen. Arbeiter- zahl insges. 1904/1905–1911/1912 durchschnittl. 6224, 6454, 6741, 7296, 7183, 7413, 8152, 8395 Mann, an die 1911/1912 M. 10 350 149 Löhne bezahlt wurden.

Wert der an fremde Abnehmer abgesetzten Erzeugnisse aller 4 Abteil. 1902/1903 bis 1911/1912: M. 13 115 038, 13 906 130, 15 586 169, 18 453 341, 21419 489, 21 175 324, 19 838 860, 23 619 985, 25 406 456, 31 545 261; Summe der Liefer. der einzelnen Abteil. unter einander: M. 3 688 330, 3 758 046, 4 678 422, 5 305 626, 5 938 170, 9 407 889, 9 274 508, 9 434 266, 9 350 466, 10 016 167. Wert der Anlagen inkl. Zeche Werne nach M. 3 924 969 Zugängen u. M. 1 821 783 Abschreib. in 1911/12 am 30./6. 1912 M. 31 985 431. Die Instandhalt. der Werke erforderte 1911/12 die Summe von M. 141 685. Das Neuanlagen-Kto Georgsmarienhütte stand Ende Juni 1912 noch mit M. 602 851 zu Buch, nachdem 1911/12 M. 2 231 333 auf die einzelnen