Elektrotechnische Fabriken, Elektricitätswerke und Hilfsgeschäfte. 221

Warenbestände 1 110 110. – Passiva: A.-K. 1 000 000, R.-F. 100 000, Beamten-Pens.-F. 113 568, Arbeiter-F. 56 784, Kredit. 2 455 086, Gewinn 294 510. Sa. M. 4 019 948.

Gewinn- u. Verlust-Konto: Debet: Gen.-Unk. 286 551, Abschreib. 357 897, Gewinn 294 510. – Kredit: Vortrag 3477, Fabrikations- u. sonst. Gewinne 935 481. Sa. M. 938 959.

Dividenden 1912/13– 1914/15: 0, 0, ? %.

Direktion: Ing. Georg Zapf, Kaufm. Ernst Rasch.

Prokuristen: Christ. Capito, Jos. Nübel, Werner Rössler, Ing. Heinr. Haber.

Aufsichtsrat: Exz. Grossh. hessischer Finanzminister a. D. Dr. phil. u. Ing. Feodon Gnauth, Dir. Karl von der Herberg, Dir. Karl Steven, Mülheim a. Rh.

Elektr. Überland-Centrale Oberhausen Akt-Ges.

in Oberhausen-Herbolzheim (Breisgau).

Gegründet: 5./3. 1907; eingetr. 24./4. 1907 in Kenzingen. Gründer siehe Jahrg. 1908/09. Die Firma Karl Mez u. Söhne in Freiburg i. Br. brachte das von ihr bisher betriebene Elek- trizitätswerk mit Aktiven u. Passiven in die Akt.-Ges. ein. Übernahmewert M. 1 100 000. Zur Deckung desselben erhielt die Firma Karl Mez u. Söhne 300 Aktien, sie forderte hiernach noch M. 800 000; von dieser Forderung übertrug sie M. 300 000 an die übrigen Gründer, welche diese abgetretene Forder. in die Ges. einbrachten u. hierfür Aktien in Höhe von. M. 300 000 erhielten. Die restlichen M. 500 000 bleiben als Kontokorrentschuld bestehen.

Zweck: Betrieb eines Elektrizitätswerks. Angeschlossen waren Ende März 1915 47777 Glühlampen, 21 Bogenlampen, 1645 Motoren mit 3925 PS. sowie 417 Apparate, Gesamtan- schluss 4766 Kw. Abgegeben wurden, durch Wasser erzeugt, 473 569 Kw.-St., durch Dampf 155 754 Kw.-St., Fremdlieferung 1415 420 Kw.-St., zusammen 2 044 743 Kw.-St.; hiervon nutzbar abgegeben 1 426 590 Kw.-St. Es werden zurzeit 53 Ortschaften vom Werke mit elektr. Kraft versorgt. Das Hochspannungsnetz hat eine Länge von 205 km. Nutzbar abgegeben wurden 1907/08–1914/15: 333 441, 494 840, 577 869, 663 835, 859 761, 1 057 134, 1 288 900, 1 426 590 Kwst. 1909 fand die Erweiter. der Zentrale durch Aufstell. eines Turbo-Dynamos nebst Kessel statt, damit die Masch.-Anlage jetzt eine Gesamtleistung von 1450 PS. erreicht. Bis 1916 werden noch weitere 30 Gemeinden angeschlossen. Zur Ergänz. des Strombedarfs bezieht die Ges. elektr. Energie von der Badischen Kraftlief.-Ges. m. b. H. in Freiburg i. B.

Kapital: M. 1 350 000 in 1350 Aktien à M. 1000. Urspr. M. 600 000, erhöht lt. G.-V. v. 14./8. 1908 um M. 600 000, davon M. 400 000 übernommen zu pari von der Firma Carl Mez & Söhne in Freiburg in Anrechnung auf deren Guthaben. Nochmalige Erhöh. um M. 300 000

hat die G.-V. v. 8./12. 1914 beschlossen, hiervon bisher M. 150 000 zu pari plus Kosten an

die Süddeutsche Disconto-Ges. Fil. Freiburg i. B. begeben, div.-ber. ab 1./4. 1915. Angeboten den alten Aktionären zu denselben Bedingungen. Anleihen: I. M. 600 000 in 4½ % Oblig. von 1907, Stücke à M. 1000 u. 500, rückzahlbar zu 102 %. Tilg. ab 1909 durch jährl. Auslos. im April auf 1./10. II. M. 300 000 in 4½ % Oblig. von 1910. Noch in Umlauf am 31./. 1915 von beiden Anleihen M. 759 000. Zahlst.: Ges.-Kasse; Freiburg: J. A. Krebs, Süddeutsche Disconto-Ges. Geschäftsjahr: 1./4.–31./3. Gen.-Vers.: Im I. Geschäftshalbj. Stimmrecht: 1 Akt. = 1 St. Bilanz am 31. März 1915: Aktiva: Gesamtanlagen 3 097 936, Vorräte 49 318, Debit. 245 504. Abnehmer 55 528, Kassa 5431. – Passiva: A.-K. 1 200 000, Oblig. 759 000, do. Zs.- Kto 7372, do. Auslos.-Kto 6120, Darlehen 600 000, Ern.-F. 297 922 (Rückl. 50 000), Akzepte 30 189, R.-F. 31 676 (Rückl. 4500), Kredit. 431 764, Abschreib. 4034, Kaut. 1300, Div. 72 000, do. unerhob. 240, Tant. an A.-R. 4200, Rückstell. an Debit. 5000, Vortrag 2898. Sa. M. 3 453 718.

Gewinn- u. Verlust-Konto: Debet: Betriebsausgaben 121 042, Oblig.-Zs. 34 740, Zs.

52 244, Oblig.-Agio 520, Gewinn 142 632. – Kredit: Vortrag 6228, Betriebseinnahmen 344 950. Sa. M. 351 179.

Dividenden 1907/08–1914/15: 3, 5, 5½, 5½, 6, 6, 6, 6 %.

Direktion: Georg Kanneberg, Ing., Oberhausen; Paul Mez, Freiburg i. B.

Aufsichtsrat: (Mind. 5) Vors. Hans Mez, Hermann Mez, Bankier Eug. Krebs jun., Bank- Dir. Willi Wolff, Freiburg i. B.; Prof. Adam Mez, Eimeldingen; Prof. Dr. Karl Mez, Königs-

berg; Fabrikant Gottfried Krüger, Brandenburg; Dir. Karl Becker, Laufenburg; Dir. Frank, Baurat Schöberl, Maunheim.

Kraftversorgung Sundgau Akt.-Ges. in Pfirt (Elsass).

Gegründet: 6./2. 1913; eingetr. 7./4. 1913 in Mülhausen. Gründer: August Dotzheimer,

Ing. Aug. Nizzola, Baden (Schweiz); Ing. Ruppert Schneider, Schlettstadt; Ing. Aug. Menge, Metz-Montigny; Christian Bock, Bingen.

Zweck: Ankauf u. Vertrieb elektr. Energie sowie Kauf, Pacht u. Betrieb bestehender Kraftwerke, die Erstellung und der Betrieb neuer Kraftwerke, Leitungsanlagen u. Installat. aller Art, die mit dem Gegenstande des Unternehmens zusammenhängen.

Kapital: M. 300 000 in 300 Aktien à M. 1000. Urspr. M. 200 000, übernommen von den

Gründern zu pari. Erhöht lt. G.-V. v. 30./8. 1913 um M. 100 000, begeben zu pari. Bilanz am 31. Dez. 1914: Aktiva: Baukto 325 906, Zähler 4307, Mobil., Werkzeug etc. 2340, Materialvorräte 4552, Kassa 3863, Kaut. 1900, Debit. 40 518, Verlust 12 526. – Passiva: A.-K. 300 000, Kredit. 115 963, Übergangs-Kto 6955. Sa. M. 422 918.