Elektrotechnische Fabriken, Elektricitätswerke und Hilfsgeschäfte. 233

Geschäftsjahr: 1./9.–31./8. Gen.-Vers.: Im I. Geschäftshalbj. Stimmrecht: 1 A. = 1 St.

Bilanz am 31. Aug. 1914: Aktiva: Grundstück 38 750, Wasserkraft 86 630, Wasserbau 98 850, Gebäude 75 750, Gebäudeeinricht. 7390, Turbinen 12 975, Dampfkraft 14 440, Diesel- motoranlage 42 920, Primäranlage 44 790, Umformer- do. 10 715, Akkumulatoren 3000, Trans- formatoren 83 830, Fernleitung 96 020, Freileitung 135 720, Zähler 46 270, Mobil. 2775, Werk- zeuge 5850, Vorräte 5787, Installation 53 627, Debit. 82 817, Automobil 6400, Effekten 4000, Kassa 8846. – Passiva: A.-K. 500 000, Hypoth. 107 950, Anlehen 250 000, Kredit. 32 831, R.-F. 17 300 (Rückl. 2025), do. II 19 500 (Rückl. 4000), Div. 30 000, Vortrag 10 570. Sa. M. 968 152.

Gewinn- u. Verlust-Konto: Debet: Betriebsausgaben 30 671, Unk. 14 209, Verwalt. 10 850, Zs. 15 282, Abschreib. 42 570, Gewinn 46 595. – Kredit: Vortrag 8746, Einnahmen aus Licht, Kraft u. Zählermiete 128 660, Installationsgewinn 21 330, Pacht u. Miete 1441. Sa. M. 160 179.

Dividenden 1905/06–1913/14: 6, 6, 6, 6, 6, 6, 6, 6, 6 %.

Direktion: Ing. Georg Weisbecker, Waldsee. Aufsichtsrat: Vors. Reg.-Rat Dr. Bocks- hammer, Tettnang; Stellv. Freih. Schenk v. Stauffenberg, Risstissen; Fabrikdir. Dr. Spohn, Blaubeuren; Dir. Dübendorfer, Biberach; Oberamtmann Krämer, Waldsee.

Zahlstellen: Ges.-Kasse; Biberach: Gewerbe-Bank.

Elektrizitäts-Werke der Argen, A.-G. in Wangen im Allgäu.

Gegründet: 1893.

Zweck: Ausnützung der Wasserkräfte der Argen u. Umgebung für elektrotechnische Zwecke. Die Ges. besitzt die zwei Elektrizitätswerke Thalerschachen u. Au, mit einer effektiven Leistung von zus. 550 PS., an letztgenanntem Orte ausserdem eine neu errichtete Dampfreserve mit 350 PS. u. versorgt die 3 Städte: Wangen, Isny u. Leutkirch, sowie 40 weitere Ortschaften in den Oberamtsbezirken Wangen u. Leutkirch mit Licht u. Kraft. Die Belastung der Werke ist eine ziemlich regelmässige, so dass bei normalem Wasserstand ein Eingreifen der Dampfreserve nicht notwendig wird. Zudem befindet sich eine Reserve- wasserkraft von 300 PS. effektiv in Gottrazhofen (à km stromaufwärts des Werkes Au), welche bereits konzessioniert u. deren Projekt schon ausgearbeitet ist. Die Gesamterstellungskosten, einschl. der Fernleitung, Transformatoren, Verteilungsnetze, sowie der Umformerstationen in den 3 Städten, beliefen sich bis 1915 auf M. 1 394 084.

Kapital: M. 400 000 in 400 Aktien à M. 1000. Urspr. M. 200 000, erhöht 1894 um M. 100 000 begeben zu pari; ferner erhöht lt. G.-V. v. 6./7. 1911 um M. 100 000, begeben zu pari.

Anleihen: I. M. 120 000, verzinsl. zu 5 %, rückzahlbar zu 100 %. II. M. 450 000 in 4½ % Schuldverschreib. à M. 1000, rückzahlbar zu 102 %. Tilg. ab Dez. 1912 durch jährl. Auslos. von je M. 10 000 auf 1./7. (zuerst 1913). In Umlauf von Anleihe I u. II am 31./3. 1915 M. 520 000. Zahlst. für Verlos. wie unten exkl. Lindau.

Geschäftsjahr: 1./4.–31./3. Gen.-Vers.: Im I. Geschäftsquart. Stimmrecht: 1 Aktie =1 St.

Bilanz am 31. März 1915: Aktiva: Erstellungs-Kto 1 394 084, Neuanlage 23 000, Kassa 8880, Bankkonto 91 429, Werkzeuge 10 000, Automobile 1, Installationsmaterial 33 964, Betriebsmaterial 11 621, Feuerversich. 1157, Kohlen 5 538, Debit. 91 909. – Passiva: A.-K. 400 000, Anlehen 520 000, do. Zs.-Kto. 17 887, Akkumulatorenselbstversich. 9892, Amort.-F. 620 000, R.-F. 40 000, Talonsteuer-Res. 1000, Rückstell. für Pens. 8 750, Zs.-Coup. 450, Div. 24 000, do. unerhob. 450, Kredit. 25 180, Vortrag 3886. Sa. M. 1 671587.

Gewinn- u. Verlust-Konto: Debet: Gen.-Unk. 97 692, Amort.-Konto. 50 000, Extra- Amort. 1999, Rückstell. für Pens. 4000, Div. 24 000, Vortrag 3886. – Kredit: Vortrag 3553, Licht, Kraft u. Installation 178 025. Sa. M. 181 578.

Dividenden 1894/95–1914/15: 4, 5, 0, 0, 0, 0, 0, 0, 2, 3, 4, 4½, 5, 5, 5, 6, 6, 6, 6, 6, 6 %. Coup.-Verj.: 5 J. (F).

Direktion: J. Walchner. Prokurist: Wilh. Sohler.

Aufsichtsrat: (7–11) Vors. Rechtsanw. Dieterlen, Ravensburg; Stellv. Dir. Alfr. Petter- mand, Wangen; Oberst P. E. Huber, Zürich; Stadtschultheiss Trenkle, Wangen; Stadt- schultheiss Fischer, Leutkirch; Stadtschultheiss Bär, Isny; Emil von Seutter, Lindau; E. Gutermann, Schachen bei Lindau.

Zahlstellen: Ges.-Kasse; Lindau: Agentur der Bayer. Notenbank; Ulm: Gewerbebank Ulm; Ravensburg: Fil. der Gewerbebank Ulm G. m. b. H.

Elektrische Überlandzentrale Weferlingen u. Umgegend, eingetr. Genossenschaft m. b. Haftpflicht in Weferlingen (Prov. Sachsen).

Gegründet: 10./9. 1908; eingett. 17./9. 1908.

Zweck: Bau u. Betrieb elektr. Anlagen u. Abgabe von Licht u. Kraft an Mitglieder u. Nichtmitglieder. Die Mitgliedschaft können alle physischen u. juristischen Personen er- werben, welche sich durch Verträge verpflichten können u. ihren Wohnsitz resp. Sitz A Weferlingen oder einem Umkreise von 60 km haben. Die Haftpflicht der Genossen für die Verbindlichkeiten der Genossenschaft ist auf M. 1000 pro Geschäftsanteil beschränkt. Die höchste Zahl der Geschäftsanteile, die ein Genosse erwerben kann, beträgt 100. Die Anzahl der Genossen beläuft sich auf 2514; sie sind mit 3116 Geschäftsanteilen beteiligt, welche einer Haftsumme von M. 3 116 000 entsprechen. Die Geschäftsanteile mit je M. 200 sind voll eingezahlt.