........................ 33......... .... ..... ―――― §‚‚‚― * 20 ――

Elektrotechnische Fabriken, Elektricitätswerke und Hilfsgeschäfte. 2387

Elektrizitäts-Verband ist der Ges. die Versorgung von 136 rheinhessischen Gemeinden mit Strom bis 1960 gesichert. Ausserdem übernahm die Ges. den Vertrag der genannten Ges. mit der Stadt Worms betr. die Pachtung des städt. Elektrizitätswerks u. den Ausbau u. die Pachtung eines zum städt. Werk gehörigen Fernversorgungsnetzes des rechtsrhein. südlichen Riedgebiets auf die Dauer von 20 Jahren. Das Kraftwerk Worms hat jetzt eine Leistung von 1500 K W. Gleichstrom u. 2100 KW. Drehstrom. Nach einem Vertrag mit der Stadt Mainz übernahm deren Elektrizitätswerk die Versorgung von 15 Iinksrheinischen, südlich von Mainz gelegenen Gemeinden für die Ges. Es wurde auch das der Rhein. Schuckert-Ges. gehörige Elektrizitätswerk Osthofen a. Rh. erworben. Das neue Verbandskraftwerk Osthofen, welches an der Grenze der Gemark. Rheindürkheim, in nächster Nähe des Rheines errichtet ist, kam am 21./6. 1913 in Betrieb. Das Werk, welches mit dem Elektriz.-Werke in Worms zus.- geschaltet wurde, verfügt zunächst über eine Leistung von 2100 Kw. Beide Werke werden sich in zweckmässiger Weise ergänzen.

Stromabsatz 1914/15: Südl. Ried Verbands- orms gebiet

Angeschlossene Ortschaften. 1 9 136 Einwohnerzaall 49 000 20 000 140 000 Zahl der Konfsumentfen. 1690 2 320 18 500 Angeschlossene Glühlampen. 37 200 12 300 102 750 Leistung der angeschlossenen

Motoren u. Apparate . . Kwst. 5010 520 3 210 Gesamtanschlusswert mit

33... ... 5 7 421 Verkaufte Strommenge) „ 3914 000 577 000 2 368 000

*) Gleich- und Drehstrom zusammen.

Im Geschäftsj. 1913/14 erfolgte der Ankauf der Gruppen-Gaswerke Flonheim u. Schwa-

benheim, die zus. 15 rheinhess. Gemeinden mit 14 400 Einw. mit Gas versorgen. Mit der Stadt Worms wurde ein Vertrag, gültig bis 1931, über Bau u. Betrieb von 4 Strassenbahn- linien nach den Vororten v. Worms u. Pacht. des städt. Strassenbahnnetzes abgeschlossen.

Der Vertrag sieht vor, dass zur Deckung des für den Bau der neuen Linien erforderl. Kapi-

tals ein Anlehen von M. 2 000 000 aufgenommen werden soll, für das die Stadt Worms gegen Sicherstell. die Garantie für Zahlung der Zs. u. Tilg. zu übernehmen hat. Für den Fall

eines Minderergebnisses hätte die Stadt Worms einen angemess. Betriebszuschuss zu leisten. Die Vorarbeiten für die Angliederung dieses Bahnnetzes wurden infolge des: Krieges vor?-

läufig eingestellt.

Zweck: Versorgung der Stadt Worms, der Provinz Rheinhessen und benachbarter

Gebiete mit elektr. Energie. Herstellung, Erwerb, Betrieb und die Verwertung von Anlagen, welche den elektr. Strom anwenden oder zum Betriebe durch Elektrizität sich eignen, die

Beteiligung bei solchen oder verwandten Unternehm. sowie die Efwerbung u. Verwertung

einschlägiger Konzessionen.

Kapital: M. 3 000 000 in 3000 Aktien à M. 1000, übernommen von den Gründern zu parit.

Geschäftsjahr: 1./4.–31./3. Gen.-Vers.: Im I. Geschäftshalbj. Stimmrecht: 1 Aktie = 1 St.

Bilanz am 31. März 1915: Aktiva: Betriebsanlagen 10 204 418, Verwalt.-Gebäude 207 586,

Mobil., Werkzeuge u. Fahrzeuge 96 000, Vorräte 408 972, Debit. 755 314, Kassa 2717, Bank- guth. 163 735, Wechsel 10 121, Avale u. Kaut. 91 820, Interimsbuchungen 25 885. – Passiva:

A.-K. 3 000 000, Hypoth. auf Gaswerk Flonheim 130 785, R.-F. 8800, Ern.-F. u. Rückstell. 196 556 Kredit. 8 309 336, Avale u. Kaut. 105 201, Interimsbuchungen 98 973, Gewinn 116 918. Sa.

M. 11 966 571.

Gewinn- u. Verlust-Konto: Debet: Unk. 16 888, Kriegsunterstütz. 12 284, Abschreib. 103 546, Pachtabgabe 304 648, Zs. 388 777, Gewinn 116 918. – Kredit: Vortrag 32 960, Gewinn a. Stromverkauf, Installationen u. Zs. 910 103. Sa. M. 943 064.

Dividenden: 1911/12: 3 % P. r. t.; 1912/13: 4 % (Baujahre); 1913/14: 3 % P.r. 41914/195

Direktion: Oskar Bühring, Stellv. Baurat Heinr. Schöberl, Mannheim. Prokuristen: Albert Wandt, Wilh. Multhanf, Karl Löchner. Aufsichtsrat: Vors. Gr. Oberbürgermeister Heinr. Köhler, Worms; Stellv. Rechtsanw.

Ernst Bassermann, M. d. R., Mannheim; Komm.-Rat Dr. Ernst Blankenhorn, Müllheim (Baden); Bank-Dir. Theod. Frank, Mannheim; Komm.-Rat Wilh. Kölsch, Justizrat Dr. Karl Stephan,

Stadtverordn. Siegmund Mayer II, Worms. Zahlstellen: Worms: Ges.-Kasse; Mannheim: Süddeutsche Disconto-Ges.

Elektrizitätswerk Zell i. W., Akt.-Ges. in Zell (Wiesenthal).

Gegründet: 16./6. 1900; eingetr. 26./6. 1900. Sitz der Ges. bis 28./10, 1901 in Cöln Zweck: Erwerb und Betrieb elektr. Anlagen jeder Art, insbesondere des Elektrizitäts-

werkes Zell i. W. Die Grossherzogl. Badische Regierung, Bezirksamt Schönau, erteilte eine in der Zeit unbegrenzte Konzession für die Benutzung des Gefälles der Wiese, beginnend bei dem Werk bis ca. 4 km aufwärts. Die Wasserkraft beträgt rund 800 PS. Das von der Helios E.-A. in Cöln errichtete Werk in Mambach liefert elektr. Energie ausser an Zell, an die Gemeinden Mambach, Fahrnau, Hausen sowie an eine Papierfabrik in Schopfheim. Der Betrieb wurde 1899 eröffnet.

33... ... %―,,‚,, ..00. ...

=