nlektrotechnische Fabriken, Elektricitätswerke und Hilfsgeschäfte

Sdiemens- Elektrische Betriebe Aktiengesellschaft in Berlin. SW. Askanischer Platz 3.

Gegründet: 16./1. 1900 mit Wirkung ab 1./10. 1899; eingetr. 9./4. 1900. Gründung

JJahrg. 1901/1902.

Zweck: Übernahme u. Fortführ. des unter der Firma: „Siemens“ Elektrische Betriebe,

GSGi.. m. b. H. bisher betriebenen Geschäftes und ferner der Betrieb aller Geschäfte, welche sich aauf private oder öffentl. Unternehmungen unter Anwend. der Elektrizität beziehen. Über.

naommen wWurden bei der Gründung der A.-G.: 1) Elektrizitätswerk in Malaga in Spanien

M. 1 820 636, 2) Elektrizitätswerk u. die Strassenbahn in Weimar M. 894 961, ferner an flüssigen

Mitteln M. 233 519; zus. M. 2 949 117 abzügl. M. 1 249 117 Passiva, restliche M. 1 700 000

wurden in Aktien gewährt.

Das Kto „Beteiligungen an Unternehmungen“ setzte sich am 30./9. 1913 wie folgt zu- sammen (Zahlen für 1913/14–1915/15 nicht veröffentlicht): Aus dem gesamten K 1 400 000 betragenden Kapital der Oesterreich. „Siemens“ Elektrische Betriebe G. m. b. H. in Wien, welche dite Elektriz.-Werke Asch, Nassengrub, Oberleutensdorf, Soborten u. Nixdorf besitzt u. betreibt.

Aus 25 % Einzahl. auf eine Beteilig. von M. 1 950 000 an der Überlandzentrale Südharz

G. m. b. H. in Bleicherode a. H., deren Restkapital von M. 50 000 im Besitz des Kreises

Grafschaft Hohenstein ist, zu Buch stehend mit M. 487 500.

Aus K 2 400 000 Anteilen der Nordböhmischen Elektrizitätswerken G. m. b. H. in Boden- bach, deren Ges.-Kap. K 3 000 000 beträgt. Das Werk in Türmitz kam Anfang 1916 in Betrieb; das Unternehmen soll in eine Akt.-Ges. umgewandelt werden.

Die verpachteten Elektrizitätswerke in Malaga u. Hof werden unter der Firma der Ges., diejenigen in Perugia, Alessandria von Akt.-Ges. betrieben, deren gesamtes Kapital im Besitz der Ges. ist. Pächterin der Betriebe aller dieser Werke ist die Siemens & Halske Akt.-Ges., mit welcher Pachtverträge bis zum J. 1921 laufen. Der „Siemens“ Elektrische Betriebe A.-G. ist ein Ertrag von 7½ % des Anlagekapitels seitens der Siemens & Halske A.-G.

garantiert. Von dem Mehr des Betriebsüberschusses erhält die Pächterin, die Verpächterin.

Diese ¾ stehen der letzteren zur freien Verfüg., während von dem Minimum von 7½ % zur

Verzins. des Anlagekapitals 5 %, u. zur Rückstell. in den Tilgungs- u. Erneuer.-F. 2½ % zu

verwenden sind. Das Erträgnis aus den Pachtverträgen betrug im J. 1912/13 M. 824 336,

worin letztmalig die verkaufte Zentrale Pisa mit einem anteiligen Betrag von M. 139 329

enthalten war.

Übersicht über die Werke, welche der Ges. gehören und an denen sie beteiligt ist.

Lei-

„ E te Kilowattstunden im Jah Elektrizitätswerke „„ PSs. 1908/09 1909/10 1910/1 1911/12 1912/13

Eigene Betriebe

R 2058 1 228 500 1 191 300 1 295 800 1 599 000 1 776 600 xrEr.. 7200 — 7 846 380 5 617 590 8 854 800 V... I33Z2 é00 „„„.. — 5 885 120 11 746 070 Harburg Wilhelmsburg. 8 000 — — — im Bau 3 658 150 Verpachtete Zentralen %%.......... 1 915 1 117 130 1 219 770 1 302 270 1 402 960 1 612 570 666666.......... 4 030 2 982 171 3 005 698 3 191 191 3 139 109 2 677 129 /%%......... 1 880 1 222 060 1 234 775 1 326 114 1 466 651 1 668 751 (Lessandrias. 2 840 1199 392 1 524 123 1755 227 1 990 560 2 122 430 Beteiligungen Asch Geßt 1 080 1 051 720 1 219 219 1 370 424 1 590 928 1 593 532 Nassengrub Oester- 4000 — — im Bau 673 590 HOpber- reichische, leutensdf. 1180 853 720 887 120 947 415 1 429 229 1 701 070 Nixdorf Petrisb 880 708 654 831 741 903 813 1 020 595 1 061 461 Soborten „ 1050 /f .%. 394 590 Nordböhmische Elektri- 3 zitätswerke G. m. b. H. „„ im Bau (haftz G. m. b. H. 15 400 — im Bau 5 269 720

2 60 113 10 363 347 11 113 746 19 938 634 25 141 742 14 8107093 Zahlen für 1913/14–1915/16 nicht veröffentlicht.

Die Elektrizitäts-Werke in eigenem Betriebe umfassen folg. Unternehm.: Das Werk Weimar, das die Stadt Weimar mit Energie für Licht u. Kraft versorgt u. die Strassenbahn daselbst betreibt; die Überlandzentrale Wiesmoor, die zur Versorg. des umliegenden Land-

gebietes dient; die Überlandzentrale Lübeck, welche eine Anzahl von Kreisverbänden und Industrieanlagen mit Strom versorgt; das Kraftwerk Harburg-Wilhelmsburg, ebenfalls Stromlieferant für industrielle Anlagen. Dasselbe hat neuerdings durch den Abschluss eines Bau- u. Pachtvertrages mit dem Elektrizitätsverband Stade, welchem 14 Kreise an-