e-DUEbsÖ

*

K OPTING

Dieselmotoren für Land- und Schiffszwecke, stehend und liegend, Brennstoff: Teeröl, Rohöl u. a.

Sauggasmotoren (nebst Sauggasanlagen zur Gaserzeugung). Brennstoff: Anthrazit, Koks, Steinkohle, Braunkohlenbriketts

ÖG― Ö――――――――――――――――――――――――――――――――――

und Torf Leuchtgasmotoren. Brennstoff: Leuchtgas Kleinmotoren. Brennstoff: Benzol, Spiritus, Benzin, 9 Petroleum u. a.

8 Zentrifugal- und Kolbenpumpen für jede Leistung lInjektoren für Kesselspeisung, sowie jede Art Strahlpumpen

Pulsometer, Unterwindfeuerungen, Luftbe- 0 feuchtungs-Anlagen

8 Zentralheizungen (auch Fernheizwerke) für Wasser, Dampf oder Abdampf; Lüftungs- und Entstaubungsanlagen.

Gebr. Körting Aktiengesellschaft,

0 9 Körtingsdorf bei Hannover-Linden

3 = 0 Filialen und Ingeniörbüros an allen größeren Plätzen. MR;,‚‚,,,,,,?