2250 Elektrische Strassenbahnen, Klein- und Pferdebahnen etc.

vom 1. Mai 1927 bis 1. Mai 1932: 4 %; vom 1. Mai 1932 ab 5 % der jährl. Brutto-

einnahmen an die Stadt, jedoch nur von den Einnahmen aus dem Betrieb innerhalb der jeweiligen Stadtgemarkung nach Verhältnis der auf letzterer geleisteten Wagen-

kilometer zu den auf sämtlichen Linien geleisteten Wagenkilometern.

Die Stadtgemeinde ist berechtigt, nach Ablauf von 25 Jahren vom I. Okt. 1899 ab die gesamte Anlage für den 20fachen Durchschnittsbetrag des Reingewinns der letzten fünf Betriebsjahre käuflich zu erwerben, jedoch soll der Übernahmepreis den 1½ fachen Taxwert des ganzen Werkes, welcher mit Rücksicht auf den Fortbetrieb der Bahn zu schätzen ist, nicht übersteigen. Der Vertrag gilt auf je weitere 10 Jahre verlängert, falls die Stadt sich nicht auf desfallsige Aufforderung der Ges. im vorletzten Jahre binnen 3 Monaten erklärt hat. Nach Verlauf von 80 Jahren vom 1. Okt. 1899 ab geht die ge- samte Anlage ohne Ausnahme unentgeltlich in das Eigentum der Stadt über. Nach Ablauf der Betriebsdauer hat die Stadt das Recht, die Fortschaffung der Anlagen unter Herstellung des früheren Zustandes zu verlangen oder die ganze Anlage und zwar die gesamten Geleisanlagen nebst Zubehör ohne Entschädigung, das bewegliche Betriebs- material, die Gebäulichkeiten und die maschinellen Anlagen zum Taxwert und die Grundstücke zum Erwerbspreis zu übernehmen. Die Kosten für Anlage u. Erweiterung von Bauten werden nach Vollendung derselben durch gegenseitiges Anerkenntnis fest- gestellt. Der Strom ist von dem städt. Elektrizitätswerke zu entnehmen. Die Ges. hat den Selbstkostenpreis zuzügl. 20 % desselben an das städt. Elektrizitätswerk zu entrichten.

Die Ges. ist verpflichtet, auf Verlangen der Stadtgemeinde im Falle des Bedürf- nisses, worüber im Streitfalle ein Schiedsgericht entscheidet, während der ersten 35 Jahre der Konzessionsdauer den Bau weiterer Linien auszuführen. Ist ein solches Bedürfnis festgestellt, so muss die Inbetriebsetzung der neuen Linien innerhalb 9 Monaten vom Tage der Aufforderung an geschehen.

Betriebsvertrag: Nach dem Vertrage vom 11./12. Aug. 1899 übernahm die Elektricitäts- Act.-Ges. vorm. Schuckert & Co. den Betrieb der gesamten Anlagen unter folgenden Bedingungen: Für die Zeit bis zum 31. März 1900 wird der Betrieb für deren Rechnung geführt, während den Aktionären bis dahin 5 % Zs. auf die eingezahlten Beträge pro rata temporis vergütet werden.

Die Elektricitäts-Act.-Ges. vorm. Schuckert & Co. garantiert der Ges. während der Dauer des Vertragsverhältnisses (s. unten) eine Div. von 6 % auf das A.-K. v. 1. April 1900 ab. Auf den Teil dieses Kapitals, welcher am 31. März 1900 bezw. an einem späteren Jahresschluss an die genannte Firma nicht zur Auszahlung gelangt sein sollte bringt die Ges. 6 % Zs. pro rata temporis als bereits vereinnahmt in Anrechnung.

Abgesehen von den thatsächlichen Betriebskosten, den Unterhaltungskosten, welche

erforderlich sind, um die Anlagen in normalem, leistungsfähigem, vertrags- bezw. kon- zessionsmässigem Zustande zu erhalten und der Dotierung des gesetzl. R.-F. ist eine Tilg.-Rücklage zu stellen, welche genügt, um innerhalb der Konzessionsdauer bei Zu- grundelegung einer Verzinsung von 3½ % und unter Berücksichtigung der Zinseszinsen das Anlagekapital zu tilgen, ferner eine Rücklage für den Ern.-F. von 1/10 % des An- llagekapitals. Als Betriebsausgaben gelten auch die auf das Würzburger Unternehmen entfallenden Steuern der Ges. und die von der Ges. ausgewiesenen Generalunkosten auf das in Rede stehende Unternehmen, letztere bis zu M. 5000 jährl. Ergiebt der Jahres- abschluss der Bücher nach Bestreitung aller Ausgaben und nach Zahlung der garan- tierten Div. von 6 % einen Überschuss, so werden zunächst 25 % dieses Überschusses dazu verwandt, um der Ges. Schuckert die nach Abschlüssen der Vorjahre ausgewiesenen Verluste nebst 4 % Zs. vom Tage der geleisteten Zahlung zurückzuerstatten. Der Rest des Überschusses, oder falls eine Rückerstattung nicht notwendig ist, der ganze Über- schuss wird zwischen der Ges. und der Elektricitäts-Act.-Ges. vorm. Schuckert & Co. derart geteilt, dass erstere 80, letztere 20 % erhält. Die Ges. hat das Recht, nach vor- heriger Aufkündigung des Vertragsverhältnisses den Betrieb des Unternehmens selbst zu übernehmen. Die Künd. kann mit 6monat. Frist zum Schlusse eines Geschäftsjahres, frühestens jedoch zum 31. März 1905 erfolgen. Macht die Ges. von diesem Kündigungs- recht Gebrauch, so hat sie bei Ablauf des Betriebsvertrages der Ges. Schuckert & 00 die derselben bis dahin etwa nicht erstatteten Verluste aus dem Betriebsverhältnis nebst 4 % Zs. bar zu bezählen. Der Ges. Schuckert & Co. steht das gleiche Recht der Künd. mit 6 monat. Frist und frühestens zum 31./3. 1905 zu; jedoch darf sie von diesem Rechte nur Gebrauch machen, wenn die Einnahmen aus dem Betriebe drei hintereinander- folgender Jahre zur Zahlung einer nach Massgabe dieses Vertrages berechneten Div. von 6 % auf das A.-K. von M. 2 000 000 ausreichten, 1908/09–1912/13 erwarb die Schuckert-Ges. M. 1 300 000 bezw. M. 46 000, M. 27 000, M. 4000, M. 5000 u. 1913 noch M. 136 000 Aktien, für welche M. 1 518 000 sie aus der Div.-Garantie entlassen wurde, so lange die Aktien dem Verkehr entzogen bleiben, während sie selbst auf eine Div. dieser Aktien verzichtete. Zuschuss der Firma Schuckert 1901/1902–1916/1917: M. 167 339, 201 684, 162 024, 167 070. 153 630, 143 915, 143 698, 65 416, 51 521, 60 455, 40 742, 58 883, 58 360, 40 627, 44 464, 7562. Kapital: M. 2 000 000 in 2000 Aktien (Nr. 1–2000), seit 5./1. 1900 voll eingezahlt. Die Elektricitäts-Act.-Ges. vorm. Schuckert & Co. garantiert ab 1./4. 1900 eine 6 % Div. (siehe oben). Im Okt. 1908 erwarb die Elektr.-A.-G. vorm. Schuckert & Co. in Nürnberg die Mehr- zahl der Aktien, 1909 noch M. 46 000, 1910 noch M. 27 000 u. 1911 noch M. 4000. 1916 noch M. 2000 hinzuerworben, zus. jetzt M. 1 520 000 (siehe oben)

V