ebss une6 für Laboratorlen und lomo Pet wemoekelttshe und eptische; Fernthermometer

Röntgen- und elektromedizinische Aperste Telegraphen, Schreibtelegraphen, Wpeneruck-felegraphen Gerntruckef)

Fernsprechapparate und Einrichtungen für Haus-, Stadt- und Fernverkehr; für Eisenbahnen, Gruben, MWilitär und Marine; femsbechsbht mit Schutz gegen Hochspannung, Lautfernsprecher

Signalapparate aller Art, wie Läutewerke, Wecker, Hupen; be für Grüben, Bahnen und Schltte, Wasserstands-Fernmelder, Umdrehungs-Fernenzeiger

Installationsmaterial und Leitungen; flemente, nasse und trockene; Blitzeblelter Minenzündapparate und Glühzüunder

Feuermelder- und Waohterkontroll- Apparate verschiedener selhst- tätig wirkende Feuermelder

Flektrische Uhren

Kabel für alle Zwecke der Sc lnk, aussstu) Von fernsprechlinlen nach dem Pupinschen System

Wassermesser für Gemeinde-Wasserversorgungen, für „ u. a. Kesselspeise-Heißwassermesser

Elektrochemische Anlagen, u. 3, D0zon-Ventilatoren, elektrische Maüktionsöfen zur Herstellung von Stahl, elektrische Sleichanlagen

Halske

wernerwerk Siemensstadt bei Berlin