Elektrotechnische Fabriken, Elektricitätswerke und Hilfsgeschäfte. 775

dahlsbank 1180 Stück u. dem Rheinisch-Westfäl. Elektrizitätswerk 1963 Aktien zum Nenn- betrage gewährt. Die Stromlieferung erstreckt sich auf eine grosse Anzahl Städte u. Gemeinden. An das Leitungsnetz sind 2. Z. angeschlossen 92 Ortschaften in den Kreisen Hörde, Hagen, Iserlohn u. Hamm. Mit der Stromlieferung konnte im Dez. 1910 bzw. Jan. 1911 begonnen werden. Zur Zeit besitzt die Ges. das Verbands-Elektrizitätswerk Kruckel u. die Gaswerke Castrop, Hemer u. Barop. Die Zentralstation in Kruckel umfasst 21 Kessel mit zus. 8035 qm Heizfläche; die Turbinenanlage besteht aus 4 Turbogeneratoren, besitzt eine gleichzeitige Leistung von 25 000 Kw. Das Leitungsnetz umfasste am 1./4. 1918 335 km Hoch- spann.-, 95 km Niederspann.- 202 Telephonkabel u. 211 km Freileitungsstreckenlänge. Gesamt- anschlusswert am 31./3. 1918 48 591 Kw. Die Zentrale hatte 1909/10–1917/18 20 415 198, 24 133 616, 32 832 016, 34 106 643, 39 884 715, 35 036 986, 49 328 696, 61 732 878, 74 970 795 Kwst. Stromabgabe. Gasabgabe der Gaswerke 1910/11–1917/18: 1 260 358, 1 230 908, 1 343 475, 1 371 937, 1 242 105, 1 338 613, 1 500 567, 1 645 930 ebm.

Zweck: Erzeug., Abgabe u. Verteil. elektr. Stromes, Erwerb von elektr. Konzessionen, Erricht. u. Erwerb von elektr. Betriebsunternehmungen, soweit sie den Zwecken der Strom- abgabe dienen, u. Beteilig. an solchen Unternehmungen in jeder zulässigen Form. Die Ges. ist berechtigt, alle zur Erreich. oder Förder. dieser Zwecke dienenden Anlagen u. Geschäfte jeder Art zu errichten, zu erwerben, zu betreiben, zu pachten, zu verpachten u. zu veräussern.

Kapital: M. 3 300 000 in 3300 Aktien à M. 1000. An dem Aktienbesitz sind u. a. beteiligt: Kommunalverbände Dortmund mit M. 1 350 000, Kreis Hörde mit M. 300 000.

Anleihe: M. 13 000 000, für die die Stadt Dortmund teilweise die Bürgschaft übernahm. Davon sind M. 6 750 000 bei der Landesbank in Münster zu 4 % Zs. u. 1¼ % Amgrt. bei 3½ % Disagio aufgenommen worden. Ungetilgt insges. Ende März 1918 M. 11 636 208.

Geschäftsjahr: 1./4.–31./3. Gen.-Vers.: April/Aug. Stimmrecht: 1 Aktie = 1 St.

Gewinn-Verteilung: 5 % z. R.-F., bis 4 % Div., vom Übrigen 4 % Tant. an A.-R.

Bilanz am 31. März 1918: Aktiva: Elektrizitätswerk: Grundstücke u. Gebäude 1 582 176, Stromerzeugungsanlagen der Zentralstation Kruckel 6 926 337, Anlagen in den Talsperren- Kraftwerken 145 262, Leitungsnetz 10 080 988, im Bau begriffene Anlagen 17 276, Inventar, Werkzeug u. Geräte 251 202, Lager 445 591, Disagio 391 558, Kassa 11 848, Strom und Gas- Debit. 410 914, Konto-Korrent-Debit. 93 543, Bankguth. 327 182, Versich. 56 222, Effekten 4400, Beteilig. an der Verkehrsges. 1916 m. b. H. 65 000, Übernahme der Werke Soest und Wer1 1 574 715; Gaswerk Castrop, Hemer u. Barop: Übernahmewert 974 899; Gaswerk Castrop: Zugänge ab 1./1. 1909 296 302; Gaswerk Hemer do. 181 553; Gaswerk Barop do. 162 547. –— Passiva: A.-K. 3 300 000, Anleihe 11 636 208, Kredit. 2 810 788, Abschreib.-F. 4 842 518 (Rückl. 860 000), Ofenbau-Ern.-F. 12 636 (Rückl. 5000), R.-F. 87 138 (Rückl. 9192), Arb.-Unterst.-F. 2579, Talonsteuer-F. 33 000 (Rückl. 6600), Wechsel 1 100 000, Div. 165 000, Tant. an A.-R. 1706, Vortrag 7948. Sa. M. 23 999 524.

Gewinn- u. Verlust-Konto: Debet: Elektrizitätswerk: Betriebs- u. allg. Geschäfts-Unk. 3 473 936; Gaswerke: Betriebs- u. allg. Geschäftsunk. 206 091, Anleihe-Zs. 566 664, Bürgschafts- Provis. 23 430, Gewinn 1 055 447. – Kredit: Elektrizitätswerk: Betriebsgewinn einschl. Gewinn-Vortrag 4 969 583; Gaswerke: Betriebsgewinn 355 986. Sa. M. 5 325 569.

Dividenden 1908/09–1917/18: 3, 4, 4, 5, 5, 5, 5, 5, 5, 5 %

Direktion: Dir. Karl Döpke. Prokuristen: Rich. Buttke (stell. Dir.), Franz Meisinger.

Aufsichtsrat: Vors. Oberbürgermeister Dr. Ernst Eichhoff, Dortmund; Stellv. Hugo Stinnes, Mülheim a. d. Ruhr; Gen.-Dir. Komm.-Rat Ernst Schweckendieck, Reg.-Assesor Dr. Burchardt, Stadtrat Ing. Karl Meyer, Stadtverord. Fabrik-Dir. Ludwig Franzius, Stadtverord. Verleger Lambert Lensing, Landrat Dr. Alfred Luckhaus, Hörde; Gen.-Dir. Geh. Komm.-Rat Rob. Müser, Dortmund; Polizeipräsident Landrat Karl Gerstein, Bochum; Dir. Alb. Hempel, Berlin; Bergw.-Dir. Bergrat Friedr. Funcke, Kamen; Landrat Overweg, Insterburg.

* = ― – * * = Landkraftwerke Leipzig Akt.-Ges. in Kulkwitz bei Leipzig. Büro in Leipzig, Dittrichring 13.

Gegründet: 14./7. 1910; eingetr. 16./8. 1910 in Markranstädt. Gründer: Leipziger Aussen? bahn Akt.-Ges. in Leipzig, Seeoffizier a. D. Dir. Otto Credner, Leipzig; Ges. für elektr. Unter- nehmungen, Berlin; Direction der Disconto-Ges., Berlin; Allg. Deutsche Credit-Anstalt, Leipzig. Das gesamte A.-K. von M. 5 000 000 ist gezeichnet u. übernommen worden, und zwar ist dasselbe nach Höhe von 50 % = M. 2 500 000 durch Barzahlung bezw. durch folgende Sach- einlagen der Leipziger Aussenbahn Akt.-Ges. u. der Ges. für elektr. Unternehmungen in Berlin geleistet. Es übertrugen der Ges. als Einlage: a) die Leipziger Aussenbahn 1. das von ihr von den Braunkohlenwerken Kulkwitz Akt.-Ges. erworbene Grundstück (12 700 qm) in Kulkwitz zum Betrage von M. 42 292, 2. die von ihr erworbenen Geschäftsanteile der Firma Industriebahn Wurzen G. m. b. H. im Nominalbetrage von M. 150 000 für M. 153 201, 3. die ihr an die genannte Ges. zustehende Kontokorrentforderung in Höhe von M. 161 548 zu diesem Betrage, 4. alle diejenigen Rechte, welche ihr auf Grund des mit dem Gemeinde- verband für das Elektrizitätswerk Leipzig-Land abgeschlossenen Vertrages v. 19./2. 1910 gegen diesen auf Abnahme von elektr. Energie zustehen, zum Betrage von M. 40 000, 5. endlich die Leipziger Aussenbahn alle in einer Aufstellung A u. die Ges. für elektr. Unternehmungen in Berlin alle in einer Aufstellung B, welche beide dem Gründungsberichte als Unterlagen beigefügt sind, erwähnten Vermögenswerte zum Betrage von M. 214 143 u. betreffs der Ein-