1194 Elektrotechnische Fabriken, Elektrizitätswerke und Hilfsgeschäfte.

Elektricitätswerk Südwest Aktiengesellschaft in Berlin -Wilmersdorf, Motzstrasse 48.

Gegründet: 28./7. 1899 mit Nachtrag v. 11./11. 1899; eingetr. 21./11. 1899.

Zweck: Gewerbsmässige Erzeug. u. Ausnutz. elektr. Stromes in jeder Art, insbesonders zur Beleuchtung und Kraftübertragung in den südwestlichen Berliner Vorstädten und 8 ortgemeinden, und zu dem Zweck die Errichtung eines Elektrizitätswerkes in Gelenebeas angeschlossen Ende 1910–1919: 497/182, 494 001, 611 099, 723 815, 790631, 822661 86335 876 566, 905 502, 941 680 Glüh-, 4762, 5127, 5159. 5148, 4850, 4184, 3932, 3794, 3675.3587 Ra lampen, 3192, 3833, 4391, 4877, 5247, 5311, 5381, 5471, 5470, 5590 Motore von zus. 12765 14 632, 15 488, 16678, 16816, 17193, 17 648, 18 088, 18 250, 18 450 PS. Die Zahl der EKon betrug Ende 1919 40 453 mit 45 745 Elektriz.-Zählern. Ausserdem bewerkstelligt die Centrale die sehr bedeutende Stromversorg. der westl. u. südl. Berliner Vorortbahnen. soweit die Linien dieser Unternehm. nicht auf Berliner Gebiet liegen, sie versorgt auch die Vorortbahn Potsdamer Bahnhof Gross-Lichterfelde-Ost (Staatsbahn) mit elektr. Strom und die Schöneberger u. Wilmersdorfer Untergrundbahn. 1910–1919 wurden insgesamt ab- gegeben: 22 086 484, 26 669 883, 29 389 434, 31739 322, 33 334753, 31 901 268, 32403 713, 31895060. 32 255 090, 32 452 401 Kilowattst. Im Betrieb sind die Zentralstation in der verlängerten Gothenstr., die Zentralstation Wilmersdorf, die Akkumulatoren-Unterstation in Wilmersdort, Motzstr. 48, die Unterstation Halensee, Westfälischestr. 63, die Unterstation Untergrundbahn Schöneberg und Auguste Viktoria-Krankenhaus. Die Betriebsmittel des Unternehmens bestanden am Schlusse des Jahres 1919 insgesamt aus: 4 Dampfdynamos mit einer Gesamt- leistung von 3400 Kw., 7 Drehstrom-Turbodynamos von insges. 25 780 Kw., 27 Drehstrom- Gleichstrom-Umformern von insges. 27 260 Kw., 10 Akkumulatorenbatterien mit einer Kapazität von insgesamt 17 353 Kywstd. Erweiter. des Licht- u. Kraftverteilungsnetzes erforderten 1906–1914 M. 965 000, 700 000, 410 000, 340 000, 764 000, 875 000, 780 000, 980 000, 163 000 Aufwand.

Konzession: Mit den Stadtgemeinden B.-Schöneberg, B.-Wilmersdorf u. der Landgemeinde B.-Schmargendorf hat die Ges bis 31./12. 1950 laufende Verträge abgeschlossen, denen zufolge sie das Recht hat, die Strassen dieser Gemeinden zur Anlage elektr. Leitungen zu be. nutzen, wogegen ihr die Verpflichtung obliegt, innerhalb der Gemeindegebiete unter bestimmten Voraussetzungen und auf Grundlage der getroffenen Preisvereinbarungen auf Verlangen elektr. Leitungen zu legen und elektr. Strom abzugeben, die öffentliche Beleuchtung der Gemeindestrassen zu übernehmen, die städtischen bezw. Gemeindegebäude mit elektr. Beleuchtung zu versehen, und innerhalb der Gemeindegebiete auch zu anderen als Beleuchtungszwecken Elektrizität abzugeben. Die Ges. ist nach diesen Verträgen ver- pflichtet, zur Erneuerung ihrer in den beiden Gemeinden gelegenen Anlagen Ern.-F. zu bilden, in welche jährlich 2 % der aus Abgabe von Elektrizität in der betreffenden Gemeinde erzielten Bruttoeinnahmen einzulegen sind, bis die Ern.-F. 20 % des in der betreffenden Gemeinde verwandten Anlagekapitals erreicht haben. 3

Die Ges. hat an die Stadt Schöneberg eine Abgabe in Höhe v. 10 %, an die Stadt Wilmersdort

u. an d. Gemeinde Schmargendorf eine solche v. 5 % der durch Lieferung v. Elektrizität innerhalb

der betreffenden Gemeinde erzielten jährlichen Bruttoeinnahmen — ausschliesslich der fin- nahmen aus Stromlieferung für öffentliche Beleuchtung und an die Westliche und Sü liche Berliner Vorortbahn (s. u.) – abzuführen; an die Stadt Schöneberg sind ferner 9% derjenigen Bruttoeinnahme abzuführen, welche die Ges. für Elektrizität aus anderen meinden bezieht. Ausserdem an Wilmersdorf 5 % von den Kosten der in der Zentralstation Wilmersdorf erzeugten Kwst. Die Gemeinden haben ausserdem Anspruch auf einen Anteil am Reingewinn, der sich auf 40 % vom Reingewinn des über 5 % des Anlagekapitah d M. 6 000 000 und auf 40 % vom Reingewinn über 4 % des diesen Betrag übersteigen Anlagekapitals bemisst; bei der Berechnung des Reingewinnes darf die gezetzlich sefbrfen Einlage in den R.-F., sowie an Tant. für A.-R. und Vorstand und Grat. für „„ Betrag von 15 % des Nettogewinnes in Abzug gebracht werden; weitere Abzüge, sondere für Spez.-R.-F. und zur Schuldentilgung, sind nicht statthaft. Abgaben Brutto-Einnahmen an die Gemeinden Schöneberg, Wilmersdorf u. Schmargendorf 19 à 1919: M. 300 785, 353 133, 447 761, 487 629, 483 381, 487 553, 505 384, 515 465, 756 165, vertragsmäss. Anteil 1911–1919 M. 335 458, 292 607, 326 985, 245 709, 162 244, 41 846, – — 253 005. „ it allen dazu- Die Gemeinden sind berechtigt, zum 31./12. 1950 das Elektrizitätswerk mit a 733 gehörigen Anlagen zum Eigentum und zur Verwaltung zu übernehmen, u. Buchwerte oder zum Taxwerte. Erfolgt die Anzeige oder die Mitteilung, dass das 3 3 verhältnis endigen soll, nicht mindestens ein Jahr vor dem Ablauf des 3 „„ 3 längert sich derselbe stillschweigend um weitere 3 Jahre. Findet die Übergabe aniende lagen nach dem 30./9. 1928 statt, so ermässigt sich der von der Gemeinde Meifhrigen Preis, mit Ausnahme der Grundstücke und Gebäude, um je 10 % für jeden dreiahrt Zeitraum nach dem 30./9. 1928. öht lt. G.-V. Kapital: M. 18 500 000 in 18 500 Aktien à M. 1000. Urspr. M. 2 000 000, 000 in 1000 v. 21./4. 1902 um M. 2 000 000, begeben zu pari, lt. G.-V. v. 29./4. 1903 um M. 1905 um zu pari begebenen, ab 1./1. 1903 div.-ber. Aktien. Nochmals erhöht lt. G.-V. v. 1 üht t. G.-V. M. 1 000 000 in 1000 Aktien, begeben zu pari, div.-ber. ab 1./1. 1905. Weiter erhöht