100 * 0

Wasser- und Eiswerke, Kühlhallen etc. 1989

Gewinn- u. Verlust-Konto: Debet: Gehälter u. Löhne 16 738, Kohlenfracht 36 047, Zs. Unk. 15 506, sonst. Unk. 12 006, Abschreib. 17 212, Vortrag 57. 3 Kredit: Wassermebber 1 3937, Wassermessermiete 4069, Kto pro Diverse 141, Zs. 1718. Sa.

Dividenden 1902–1918: 8, 10, 10, 10, 10, 10, 8, 7, 8, 12, 12, 12, 15, 15, 9, 0, 0 %.

Direktion: Gumperz, Ernst Arnold, Franz Heinrich, Fritz Birkenstock,

Aufsichtsrat: Vors. Bürgermeister Carl Eigen, Kaufm. Rob. Hill, Stadtbaurat Christ. Epping, Bauunternehmer Heinr. Vogel, Kaufm. Carl Beissner, Hattingen.

Deutsch Belgische Crystall Eisfabrik in Köln a. Rh.,

Brabanterstrasse 14.

Zweck: Errichtung, Betrieb u. Veräusserung von Fabriken u. Masch. zur Herstellung von Eis sowie von Kühlkammern zur Aufbewahrung von Nahrungsmitteln u. anderen Gegen- ständen, Fabrikation u. der Verkauf von Kältemasch. für Brauereien u. sonst. Unternehm., von Eisschränken u. anderen Apparaten zur Konservierung von Nahrungsmitteln u. anderen Gegenständen; Ankauf u. Verkauf von Natur- u. Kunsteis.

Kapital: M. 310 000. Geschäftsjahr: Kalenderjahr. Gen.-Vers.: Bis Juni.

Bilanz am 31. Dez. 1919: Aktiva: Immobil. 106 334, Mobil. 979, Neuanlage 33 655, neues Material 41 093, Res.-Material 781, altes Material 1, Effekten 4845, Postscheck-Kto 17 830, Kassa 23 295, Debit. 262 657, Rollmaterial 32 029, Waren 18 174. – Passiva: A.-K. 310 000, R.-F. 21 289, Kredit. 80 808, Ern.-F. 21 700, Gewinn 107 878. Sa. M. 541 676.

Gewinn- u. Verlust-Konto: Debet: Verluste 4552, günstigen Saldo 107 878. Sa. M.

112 431. – Kredit: Fabrikat.-Kto nach Abzug aller Gen.-Unk. M. 112 431. Dividenden 1901–1919: 0, 0, 0, 2, 0, 0, 0, 0, 0, 0, 4, 4, 4, 4, 4, 6, 6, 6, 6 %. Direktion: J. Willems, G. Kinon.

Aufsichtsrat: Vors. Louis de Lamime.

Rheinische Wasserwerks-Gesellschaft in Cöln,

Mathildenstrasse 52.

Gegründet: 18./6. 1872 in Cöln, dann Sitz in Bonn; lt. G.-V. v. 9./5. 1902 Sitz der Ges. nach Cöln-Deutz verlegt.

Zweck: Anfertigung von Plänen, Gutachten, Kostenanschlägen u. Rentabilitätsberechnungen für Wasser-, Gas- u. Elektriz.-Werke, Entwässerungs- u. Kanalisationsanlagen, Ausführung derartiger Anlagen für eigene u. fremde Rechnung, Ankauf, Betrieb u. Verkauf von Wasser-, Gas- u. Elektriz.-Anlagen, sowie Erwerb u. Verwertung solcher Konz., Ankauf, Einrichtung, Betrieb u. Verkauf von Anstalten, welche die Herstellung der in das Fach einschlagenden Material. u. Apparate bezwecken. Die Ges. versorgt die Städte Mülheim, Deutz, Kalk sowie die Bürgermeistereien Merheim, Vingst, Heumar u. Wahn mit Wasser. Hierzu dienen 2 Pumpwerke, von welchen das eine bei Stammheim, das andere bei Westhoven geleger ist. Die Konzessionsverträge mit den Städten Mülheim, Deutz u. Kalk laufen Ende 1920 ab- Die Verträge mit den übrigen Gemeinden lauten auf 40 Jahre. Ausser den Städten Mül- heim-Deutz-Kalk werden die Bürgermeistereien Vingst, Heumar, Wahn u. Merheim mit Leucht- u. Kraftgas versorgt durch je eine Gasfabrik in Vingst, Porz u. Merheim. Länge des Rohrnetzes des Wasserwerks Ende 1919 202 763 m, angeschlossen waren 9938 Grundstücke, gefördertes Wasserquantum 1910–1919: 5 235 354, 6 217 024, 6 213 547, 6 800 388, 7 002 782, 6 951 247, 7 709 369, 10 509 256, 11 705 888, 10 873 488 cbm. Gaserzeugung in den Gasfabriken Vingst, u. Porz-Urbach 1910–1919: 1 249 070, 1 504 630, 1 982 425, 1 884 395, 1 371 370, 1 528 770, 1 920 830, 2 071 210, 2 111 040, 2 700 800 cbm; Länge des Leitungs-Netzes Ende 1919 123792 m, Flammenzahl 25 985. Etwa 125 Beamte u. Arb.

Kapital: M. 2 250 000 in 3750 Aktien (Nr. 1–3750) à M. 600. Urspr. M. 3 750 000, herab- gesetzt lt. G.-V. v. 8./4. 1878 auf jetzigen Stand. 5 3

Geschäftsjahr: Kalenderj. Gen.-Vers.: Im I. Sem. Stimmrecht: 1 Aktie = 1 St.

Gewinn-Verteilung: Mind. 10 % z. R.-F. bis 20 % des A.-K. (erfüllt), 4 %, Div., vom verbleib.

Betrage 10 % Tant. an A.-R. (mind. eine feste Vergüt. von M. 3000 pro Mitgl. u. von

M. 6000 für den Vors.), Rest Super-Div, bezw. nach G.-V.-B.

Bilanz am 31. Dez. 1919: Aktiva: Immobil. in Deutz u. Bayenthal 214 183, Mobil. u. Ge- räte 3000, Effekten 445 162, Hypoth. 16 500, Avale 6000, Guth. bei den Bank. u. sonst. Debit. 608 139, Wasserwerke Mülheim-Deutz-Kalk etc., Gaswerke Heumar-Wahn-Vingst-Merheim Ende 1919 1 225 865, Betriebsmaterialien 104 548, Lagerbestände 155 031, Kassa 398 365. – Passiva: A.-K. 2 250 000, R.-F. 450 000, Spez.-R.-F. 15 028, unerhob. Div. 6732, Avale 6000, Talonsteuer-Res. 7500, Kredit. 227 724, Div. 180 000, Tant. an A.-R. u. Dir. 18 837, Vortrag 14 974. Sa. M. 3 176 796.

Gewinn- u. Vaflat-EKonto: Debet: Betriebs- u. Handl.-Unk. 1 740 253, Steuern u. Abgaben 83 885, Alters-, Invaliden- und Angestelltenversicherung, Krankenkasse u. Berufsgenossen- schaft 30 872, Instandhalt. der Werke, Reparat. etc. 248.174, Abschreib. 86 269, Uberschuss