1018 Elektrotechnische Fabriken, Elektrizitätswerke und Hilfsgeschäfte.

Kapital: M. 700 000 in 700 Aktien à M. 1000, begeben zu pari. Von dem A.-K. waren 400 Vorz.-Aktien (Serie A) u. 300 St.-Aktien (Serie B). Zur Deckung der Verluste aus 1911 u. 1912 stellten die Aktionäre M. 634 200 Aktien franco Valuta zur Verfüg. M. 388 000 Aktien befinden sich im Besitz der Ges. Seit Durchführung der Sanierung fielen die Vor- rechte der bis dahin bestandenen 400 Vorz.-Aktien (Ser. A) weg

Bilanz am 28. August 1922: Aktiva: Patente 1, Debit. 4856. – Passiva: Kredit. 4820, Gewinn 36. Sa. M. 4857.

Gewinn- u. Verlust-Konto: Debet: Handl.-Unk. 99, Gewinn 36. – Kredit: Vortrag 48, Zs. 87. Sa. M. 136.

Dividenden: 1910 (6 Mon.): 0 % (Baujahr); 1911–1914: 0, 0, 0, 99

Liquidator: Dir. Walter Suhge.

Aufsichtsrat: Vors. Assessor Dr. Otto Merckens, Paul Biesing, Dr. Joh. Simon, Aachen.

Adelsheimer Electricitätswerk in Adelsheim.

Gegründet: 31./5. 1897. Übernahmepreis M. 117 000. Gründung s. Jahrg. 1899/1900.

Zweck: Gewerbsmässiger Betrieb des in Adelsheim erbauten Elektrizitätswerks und die Beteilig. an anderen ähnl. Werken.

Kapital: M. 196 000 in 41 Vorz.-Aktien, 5 St.-Aktien u. 150 6 % Vorz.-Aktien à M. 1000. Bis 1911: M. 92 000; lt. G.-V. v. 13./10. 1911 auf M. 46 000 herabgesetzt. Erhöht lt. G.-V. v. 7./12. 1921 um M. 150 000 (also auf M. 196 000) in 150 6 % Vorz. Aktien à M. 1000 mit Div. Ber. ab 1./7. 1921, übern. vom Bankhaus Max Meyer, Hannover, angeb. den bisher Aktionären im Verh. 1: 2 vom 10./12.–24./12. 1921 zu 105 %. Diese Vorz.-Aktien sind ab 1./12. 1923 mit 110 % rückzahlbar.

Geschäftsjahr: 1./7.–30./6. Gen.-Vers.: Bis Okt. Stimmrecht: 1 Aktie = 1 St.

Bilanz am 30. Juni 1922: Aktiva: Grundst. 5000, Wasserwerk 25 000, Leitung 17 000, Masch. 1, Geb. 12 500, Kassa 4224, Ausstände 10 824, Waren 97 641, Zähler 6000, Werk- zeuge 1, Akkumulat. 70 000, Schaltanlage 149 000. – Passiva: Vorz.-Akt. 41 000, St.-Akt. 5000, 6 % Vorz.-Akt. 150 000, Werkerhalt.-K. 31 000, R.-F. 20 532, A.-K-Aufzahl.-K. 12 300, Bankechuld 28 820, Gläubiger 82 939, Div. 15 530, Reingewinn 10 070. Sa. M. 397 192.

Gewinn- u. Verlust-Konto: Debet: Tant. 8609, Zs. 3396, Provis. 870, Abschr. 34 952, R.-F. 2000, Werkerhalt.-K. 5000, Div. 13 350, Tant. 6179, Reingewinn 3891. – Kredit: Vortrag 10 524, Betriebs-K. 67 725. Sa. M. 78 250.

Dividenden: Aktien: 1912/13–1921/22: 0, 0, 0, 0, 0, 0, 0, 3, 10, 5 %. Vorz.-Aktien 1915/16 bis 1921/22: 5, 5, 5, 5, 8, 5, 10 bzw. 6 %. C.-V.: 4 J. (K.)

Direktion: Apotheker Dr. Wilh. Weng; Stellv.: Ludw. Gramlich jun.

Aufsichtsrat: (3–7) Vors. Bankier Herm. Meyer, Christ. Huss, Bürgermeister Gramlich, Hauptm. a. D. Krusemarck, Kaufm. Friedr. Dieterich, Heilbronn.

Zahlstelle: Adelsheim: Vorschuss-Verein.

Altenburger Landkraftwerke Akt.-Ges. in Altenburg S.-A.

Gegründet: 10./7. 1912 mit Wirkung ab 10./7. 1912; eingetr. 15./8. 1912. Gründer siehe dieses Handbuch 1920/21.

Mit den Rositzer Braunkohlenwerken hat die Ges. einen bis 1928 laufenden Kohlen- lieferungsvertrag abgeschlossen. Am 31./10. 1912 erwarb die Ges. die Vertragsrechte auf das in Meuselwitz bestehende Thalackersche Elektrizitätswerk. Ferner kaufte sie am 20./4. 1913 die Leitungsanlage u. die Transformatorenstation der Gemeinde Rositz, die den Strom direkt ab Schalttafel der Rositzer Braunkohlenwerken A.-G. bezog u. selbst an die Konsumenten verkaufte. Am 1./7. 1913 ferner erworben das Elektrizitätswerk Lucka. Am 30./6. 1922 betrug der Gesamtanschluss an das Drehstromnetz der Ges. bei 6544 Teil- nehmern: 6549 2 Kw. = 130 984 Normallampen Aquivalente (à 50 Watt); einschl. der Gleichstromnetze in Lucka u. Meuselwitz. Am 30./6. 1920 waren angeschlossen 102 Ort- schaften; die Hochspannungsleitungen betrugen 170.3 km, die der Ortsnetzleitungen 125.4 km.

Zweck: Erwerb u. Betrieb von Elektr.-Werken, Strassenbahnen u. Überlandzentralen sowie die Ausführung aller Arbeiten, die mit dem Betrieb zus. hängen. Die Ges. kann zu diesem Zwecke auch an anderen Ges. sich durch Kapital oder Arbeit beteiligen, auch pacht- weise oder für fremde Rechnung andere als die ihr eigentümlich gehörenden Elektrizitäts- werke, Strassenbahnen u. Überlandzentralen betreiben.

Kapital: M. 50 000 000 in 50 000 Aktien à M. 1000. Urspr. M. 600 000, begeben zu 110 % Die G.-V. v. 2./3. 1914 beschloss Erhöh. um M. 400 000, begeben zu 105 %. Weiter erhöht lt. G.-V. v. 3./9. 1921 um M. 3 000 000 (also auf M. 4 000 000) in 3000 Aktien à M. 1000, mit Div.-Ber. ab 1./7. 1921, übern. von einem Konsort. zu 120 %, angeb. den bish. Aktionär. 1:2 vom 3./10.–26./10. 1921 zu 125 %. ILt. G.-V. v. 6./2. 1922 erhöht um M. 4 000 000 in 4000 Aktien à M. 1000. Die Akt. sind voll eingezahlt. Weiter erhöht lt. G.-V. v. 10./10. 1922 um M. 14 000 000 in 14 000 Aktien à M. 1000 mit Div.-Ber. ab 1./7. 1922, übern. von einem Konsort. zu 142½½ %, davon M. 12 000 000 angeb. den bisher. Aktionären im Verh. 2:3 vom 19./10. bis 6./11. 1922 zu 150 % plus Stempel; der Rest ist zu Pari übernommen. Lt. G-V. v. 29./1. 1923 erhöht um M. 28 000 000 in 28 000 Akt. à M. 1000, davon ausgeg. 22 000 Stücke zu 460 % u. 6000 Stücke zu 150 %.