6116 Nachträge, Veränderungen während des Druckes.

Dividende 1924: 8 %. Aufsichtsrat: An Stelle des ausgeschied. Eduard Hannon ist Ernest John Solvay, Brüssel in den A.-R. gewählt.

Alkaliwerke Sigmundshall A.-G., Bokeloh bei Wunstorf (s. auch Seite 432),.

Bilanz am 31. Dez. 1924: Aktiva: Bergwerks- u. Fabrikanlagen 49 875, Geb. 826 161, Schachtbau 491 286, Masch. u. Apparate 689 966, Geräte 62 107, Beteil. 163 886, Waren 370 356, Wertp. 1 (Bürgschaften RM. 49 000), Bankguth. 2268, sonst. Forder. 169 084, Kassa 315. – Passiva: A.-K. 2 148 000, R.-F. 220 000, Hyp. 34 500, Teilschuldverschr. 86 958 (Bürgschaften RM. 49 000), Gläubiger 335 849. Sa. RM. 2 825 307. 3

Gewinn- u. Verlust-Konto: Debet: Handl.-Unk. 120 045, Steuern u. Abgaben 129 772, Abschr. 126 748. – Kredit: Überschuss 374 471, Mieten 2095. Sa. RM. 376 566.

Dividende 1924: 0 %.

Vereinigte Kohlen-A.-G., Borna (s. auch Seite 433).

Bilanz am 31. Dez. 1924: Aktiva: Kohlenunterirdisches 851 067, Grundbesitz 1 283 351, Baggeranlagen 1 330 113, Grubenanlagen 287 224, Geb. 1 963 575, Masch. 1 859 653, Anschluss- bahnen 343 263, Ziegeleien 34 652, Inv. 123 026, Wertp. 2 469 120, Beteil. 285 560, Debit. 16 320. – Passiva: A.-K. 5 760 000, R.-F. 240 000, Teilschuldverschr. 56 727. hypothek. eingetr. Restkaufgelder 635 703, sonst. do. 23 955, Kredit. 4 126 342, Reingewinn 4196. Sa. RM. 10 846 925.

Gewinn- u. Verlust-Konto: Debet: Verwalt.-Kosten 16 351, Abschr. 583 196, Reingewinn 4196. Sa. RM. 603 744. – Kredit: Geschäftserträgnis RM. 603 744. 8

Dividende 1924: Den aussensteh. Aktion. wird seitens der Deutschen Erdöl-A.-G. eine Div. von 6 % gezahlt.

Borsigwerk A.-G., Borsigwerk-Biskupitz (s. auch Seite 434)

Bilanz am 31. Dez. 1924: Aktiva: Grundst. 1 486 109, Steinkohlengruben 5 158 991, Hüttenwerksanlagen 4 381 542, Wohnhäuser 2 651 940, Neubauten 2 487 128, Bestände an Material., Halbfabrikaten u. Fabrikaten 4 597 697, Schuldner 4 025 781, Eff. u. Beteil. 501 696, Kassa 36 304, Reichsbank 1371, Wechsel 8812, Verlust 4 482 845. –— Passiva: A.-K. 17 500 000, Hyp. 238 687, Obl. 117 103, Akzepte 1 630 055, Gläubiger 9 944 372, Rückst. 390 000. Sa. RM. 29 820 219.

Gewinn- u. Verlust-Konto: Debet: Betriebsverluste der Hütte abz. Betriebsgewinne der Gruben 68 702, allg. Verwalt-Kosten 1 985 194, Steuern 1 603 374, Zs. 950 516, Rückst. 6644, Abschr. 437 498. – Kredit: R.-F. 569 084, Verlust 4 482 845. Sa. RM. 5 051 929.

Mineralöl-Raffinerie vorm. August Korff, Bremen (s. auch Seite 436).

Bilanz am 31. Dez. 1924: Aktiva: Grundst. 762 450, Geb. 418 451, Masch. u. Utensil. 627 010, Bassinanlage Nordenham 46 514, Transportmittel 41 601, Waren 597 157, Material. 33 361, Kassa u. Bankguth. 49 362, Debit. 276 415, Assekuranzprämien u. Steuern 6403, Verlust 199 160. – Passiva: A.-K. 1 800 000, Verbindlichkeiten u. Vorträge 1 257 888. Sa. RM. 3 057 888.

Gewinn- u. Verlust-Konto: Debet: Abschr. 72 981, Verlust auf Debit. 8278, Betriebsunk. 762 624. – Kredit: Betriebsgewinn 644 724, Verlust 199 160. Sa. RM. 843 884.

Dividende 1924: 0 %.

Norddeutsche Hütte A.-G., Bremen (s. auch Seite 437).

Bilanz am 31. Dez. 1924: Aktiva: Grundst. 1 313 827, Anlagen 6 271 186, Debit. 2 417 051, Versich. 7388, Kassa 6462, Banken 202 845, Eff. 1093, Wechsel 140 436, Beteil. 1, Vorräte

2 784 499. – Passiva: A.-K. 9 000 000, R.-F. 1 800 000, Kredit. 819 265, Akzepte 986 532,

unerhob. Div. 3888, Reingewinn 535 106. Sa. RM. 13 144 792.

Gewinn- u. Verlnst-Konto: Debet: Unk. u. Zs. 446 308, Steuern 425 704, Abschr. 520 082, Gewinn 535 106 (davon Div. 450 000, Vortrag 85 106). Sa. RM. 1 927 201. – Kredit: Betriebsgewinn RM. 1 927 201.

Kurs: Freiverkehr Bremen u. Hamburg: 60 Bill. %.

Dividende 1924: 5 %.

A.-G. für metallurgische Produkte, Berlin (s. auch Seite 442).

Bilanz am 31. Dez. 1924: Aktiva: Bankguth. 2828, Waren 45 420, Aussenstände 70 576, Kapitalentwert.-K. 20 000. – Passiva: A.-K. 100 000, R.-F. 255, Reingew. 38 569. Sa. RM. 138 824.

Gewinn- u. Verlust-Konto: Debet: Handl.-Unk., Frachten u. Spesen 9878, Reingewinn 38 569 (davon Kapitalentwert.-K. 20 000, Div. 10 000, Tant. 3000, R.-F. 5569). Sa. RM. 48 448. – Kredit: Gewinn 48 448.

Dividende 1924: 10 %.

Rawack & Grünfeld A.-G., Charlottenburg (s. auch Seite 445).

Bilanz am 31. Dez. 1924: Aktiva: Kassa 43 942, Wechsel 261 508, Wertp. u. Beteil. 3 665 112, Waren 960 472, Debit. 8 711 970, Grundst., Geb. u. Einricht. 533 310. – Passzva: A.-K. 5 000 000, Kredit. u. sonst. Verpflicht. 8 357 861, Reingewinn 818 453. Sa. RM. 14 176 314.

Gewinn- u. Verlust-Konto: Debet: Handl.-Unk. u. Steuern 1 966 768, Reingewinn 818 453. Sa. RM. 2 785 221. – Kredit: Bruttoerträgnis RM. 2 785 221.

A. G. Kroeller ist aus dem Aufsichtsrat ausgeschieden; Gen.-Dir. Dr. M. Neumark, Herrenwyk bei Lübeck, ist neu gewählt worden.

Dividende 1924: 12 %.