2756 Elektrotechnische Fabriken, Elektrizitätswerke und Hilfsgeschäfte.

Die hauptsächlichsten Stromerzeugungsanlagen der Ges. sind die beiden Dampflnzt -werke Altbach u. Bissingen, sowie die Wasserkraftwerke Altbach u. Besigheim, welcl letzteres nur in Pacht betrieben wird. Hierzu kommen noch 2 kleine eigene Wasserknäft 1 u. Pfullingen u. die von der Stadt Esslingen gepachtete Bauer'sche Mühle in

sslingen. *

Die angeführten Kraftquellen haben insges. eine Leistung von 29 424 KW. Ausse dieser Leistung stehen der Ges. auf Grund von Stromlieferungsverträgen mit dem Bayern werk u. den Oberschwäb. Elektr.-Werken Wasserkraftleistungen bis zu 30 000 KM zu Verfügung. Der Strombezug auf Grund dieser Verträge geschieht ab Niederstotzingen übe die 100 KV Leitung der Württembergischen Landes-Elektrizitäts-Akt.-Ges., an deren A.-K. von RM. 4 500 000 die N. A. G. als Mitbegründerin mit 17 % beteiligt ist. Die Verteilung der Energie von den 100 KV Umspannwerken Obertürkheim u. Süssen aus vollzieht sich au den der Ges. gehörigen 35 KV Leitungen mit einer Gesamtlänge von 85 km.

Die Transformierung auf die Verteilungs-Spannung von 10 KV erfolgt in nachstehende Unterwerken: Feuerbach 13 400, Altbach 12 000, Göppingen 8740, Metzingen 4375 KV Transformer-Leistung.

Das gesamte Hochspannungs-Verteilungsnetz (35 u. 10 KV Leitungen) hat eine Läng von 168.4 km Kabel u. 706.2 km Freileitung. Der Transformierung von 10 000 Volt auf di jeweilige Gebrauchsspannung dienen 570 Transformatoren, die mit einer Gesamtleistun von 34 017 KVA in 382 Transformatorenstationen untergebracht sind. Ausserdem besitz die Ges. 6 Umformerstationen Dreh-Gleichstrom von insges. 4712 K W. Solche Statione befinden sich auf eigenem Grundbesitz der Ges. in Göppingen, Kirchheim, Urach, Zuffen. hausen, Esslingen, Böblingen, Pfullingen u. Metzingen. Weiter besitzt die Ges. noch Grund besitz mit Kanal- u. Wehranlagen in Altbach, Deizisau, Plochingen, Bissingen/Enz u. andere Orten mit insges. 27 ha.

Die Stromerzeug. betrug 1914–1925: 34 186 561, 34 422 302, 36 350 804, 45 994 899, 43 266 865 37 241 017, 44 348 230, 54 633 613, 57 963 646, 52 624 028, 56 896 685, 80 462 473, Kwst. Die Zahl der bis 31./12. 1925 an das Werk angeschlossenen Gemeinden beträgt 215 miß 419 529 Einwohnern.

Der Anschlusswert der Neckarwerke betrug:

―

――――‚―――――――‚―――,=―§―

1922 1923 1924 1925 Anlagetk,. 66 059 68 968 72 316 79 876 Glühlampen . . . 355 166 370 148 396 621 440 351 Bogenlampen. .. 710 717 725 728 Motoren 13 112 13 760 15 109 17 229 %% 49 217 51 159 55 012 60 698 Koch- u. Heizapparate 4758 5330 7412 11 068

Der gesamte Anschlusswert betrug Ende 1922–1925: 58 297, 60 936, 66 539, 75 302 KW

Für die Stromabgabe sind mit diesen 215 Gemeinden Konzessionsverträge auf 15–20 Jahr abgeschlossen. Von den Konz. laufen zurzeit noch 5 auf 1–5 Jahre, 98 auf 5–10 J ahre 55 auf 10–15 Jahre, 42 auf 15–35 Jahre. Sämtl. Konz.-Verträge sind ausschliessliche. Di Gemeinden haben das Recht, nach Ablauf der Konz. die Ortsnetze zum Taxwert zu erwerben

Für den Betrieb der Wasserkraftanlagen in den Gemeinden Altbach, Deizisau, Metzingel u. Pfullingen sind der Ges. dauernde staatliche Konz. erteilt worden. Die Ges. steht ausse mit den bereits erwähnten dauernden Stromlieferanten Bayernwerk u. Oberschwäb. Elektr Werken im vertraglichen Stromlieferungs- bzw. Gebietsabgrenzungs-Verhältnis mit folgende Nachbarwerken: Städt. Elektr.-Werk Stuttgart, Alb-Elektr.-Werk Geislingen, Überlandwer Jagstkreis Ellwangen, Elektr. Kraftübertragung Herrenberg, Elektr.-Werk Röhm. Mittelstad Kraftwerk Altwürttemberg, Ludwigsburg. – Die Ges. besitzt sämtl. Anteile der Überland zentrale Epzgauwerke G. m. b. H. (St.-K. RM. 1 600 000). Die Enzgauwerke beziehen ihre ganzen Strom von der Neckarwerke A.- G. Angeschlossen sind 76 Gemeinden ml 109 Stationen, 120 Transformatoren von zus. 5000 KVA-Leistung.

Der Anschlusswert der Enzgauwerke betrug:

1922 1923 1924 1925 Ahlagen 17 629 17 843 18 523 19 329 Glühlampen ... 68 287 71 212 77 013 85 000 Bogenlampen 33 33 3 35 Mötereßk, 4668 4859 5334 6049 it %% 15 774 16 904 17 722 19 458 Koch- u. Heizapparate 2019 2112 2350 3166

Der gesamte Anschlusswert betrug Ende 1922–1925: 16 829, 17 541, 19 023, 21 042 KV

Kapital: RM. 15 000 000 in 150 000 St.-Akt. zu RM. 100. Urspr. M. 5 000 000 St.-Akt dazu 1910 M. 2 500 000, sowie 1912 noch M. 2 500 000. 1914 Erhöh. um M. 5 000 000 1 5000 Vorz.-Akt. Die G.-V. v. 20./5. 1920 beschloss weitere Erhöh. um M. 10 000 000 1 5000 Vorz.- u. 5000 St.-Akt. Weiter erhöht lt. G.-V. v. 27./6 1921 um M. 10 000 000 1 5000 St.-Akt u. 5000 Vorz.-Akt. Nochmals erhöht lt. G.-V. v. 24./5. 1922 um M. 16 000 00 in 16 000 St.-Akt. zu M. 1000. Ferner erhöht lt. G.-V. v. 1./12. 1922 um M. 36 000 00 in 36 000 St.-Akt. Sodann erhöht lt. G.-V. v. 23./3. 1923 um M. 78 000 000 in 78 000 St.-Ak