Verschiedene Gesellschaften, neueste Gründungen, Nachträge. 1885

Dividenden 1923–1926: 0 %.

Direktion. Dr. Wilh. Heraeus, Dr. Wilh. Rohn.

Aufsichtsrat. Dr. Werner Canthal, Dr. Ernst Haagn, William Meyer, Hanau. Zahlstelle: Ges.-Kasse.

*„Deutsche Nähmaschinen' Vertriebsaktiengesellschaft, Hannover, Georgstr. 20.

Gegründet: 2./3. 1927; eingetr. 29./3. 1927. Gründer: Prokurist Johannes Lengowski, Prokurist Dr. Karl Huffelmann, Prokurist Wilhelm Rohlfs, Handlungsbevollmächtigte Margarete von Harenne, Prokuristin Gertrud Lindemann, Düsseldorf.

Zweck: Handel in deutschen Nähmaschinen u. allen sonstigen in dieses Fach ein- schlagenden Maschinen, Maschinenteilen u. Zubehörstücken, aller Arten von Nähbedarf, auf Nähmaschinen hergest. Waren, der Betrieb von Reparaturwerkstätten u. anderen in dieses Fach einschlag. Fabrikationswerkstätten, die Beteilig. an fachverwandten Unternehmungen.

Kapital: RM. 100 000 in 100 Aktien zu RM. 1000, übern. von den Gründern zu pari.

Geschäftsjahr: Kalenderj. Gen.-Vers.: Im 1. Geschäftshalbj. Stimmrecht: 1 Aktie 1 St.

Direktion: E. Tewes.

Aufsichtsrat: Hermann Altenburg, Zivil-Ing. Walter Schumacher, Düsseldorf; Rechts- anwalt Friedrich Brinkmann, Hamm. Zahlstelle: Ges.-Kasse.

Gebr. Körting Akt.-Ges. in Hannover-Linden, Linden-Körtingsdorf b. Hannover.

Gegründet: 17./6. 1903 mit Wirkung ab 1./1. 1903; eingetr. 21./9. 1903. Gründung siehe Jahrgang 1912/13 dieses Buches. – Zweigniederl. in Köln u. Hamburg.

Zweck: Übernahme u. Fortführung der Fabriken u. Handelsgeschäfte des Komm.-Rat Berthold Körting u. Ing. Ernst Körting, namentlich der Firma Gebr. Körting zu Linden, Bau u. Verwertung von Maschinen u. Apparaten u. der Betrieb aller mit diesen Zwecken zus.hängenden Geschäfte.

Besitztum: Das Hauptwerk der Ges. mit der Zentralverwalt. der in- u. ausländ. Unternehm. liegt in Linden-Körtingsdorf bei Hannover u. umfasst die Fabrikation von Strahlapparaten u. Olfeuerungsanlagen, Pulsometern, Zentralheizungs-, Eüftungs- u. Trockenanlagen, Gas- maschinen für gasförmige u. flüssige Brennstoffe, Öleinspritzmotoren, Sauggasanlagen. Wasserversorgungs- u. Entwässerungsanlagen. Die Hauptartikel, welche von der Gesellschaft fabriziert werden, sind Zentralheizungsanlagen, Gasmaschinen, Strahlapparate u. Motoren. Die Motorenfabrik ist in der Lage, neben Masch. liegender Bauart, die in der Grösse von 4 bis 1000 PS gebaut werden, auch solche stehender Anordn. in Grössen von 5 bis 750 PS in Ein- bzw. Mehrzylinder-Anordnung zu liefern. Auch die stehenden Maschinen arbeiten nach dem bewährten Zündkammerverfahren. Die Abt. Heizung hat neben den normalen Zentralheizungen, Grossraumheizungen u. Abwärmeverwertungsanlagen das System der Vakuum-Heizung eingeführt. Für Siedlungsbauten u. Etagenheizungen werden besondere Kleinkessel eig. Konstruktion gebaut. Die Abt. Strahlapparate erweiterte das Arbeitsgebiet durch Hinzunahme der Fabrikation von Benzin-, Mess- u. Kontroll-Pumpen sowie von Lokomotiv-Auswaschanl. eig. Konstruktion u. brachte als Neufabrikation Vakuumbremsen auf den Markt. Das Gebiet der Zentrifugalpumpen wurde durch Neueinführ. hochwertiger Hochdruck-Zentrifugalpumpen erweitert.

Der Gesamtgrundbes. in Hannover-Linden beträgt rd. 220 hann. Morgen. Hierin befindet sich das eigentliche Fabrikgrundst. in Grösse von fast 60 Morgen. 1918 wurde das den Vorbesitzern des Werkes bis dahin gehörende Koloniegrundstück Körtingsdorf in Grösse von 130 Morgen angekauft, worauf 43 Wohnhäuser für Angestellte u. Arb. der Fabrik stehen. Sämtliche Grundstücke liegen in der Nähe der Eisenbahn und in einer Entfernung von einigen 100 Metern vom Lindener Hafen des Stichkanals des Mittellandkanals. Das Fabrikgrundstück ist durch Anschlussgleise mit der Eisenbahn verbunden. Über 700 Beamte u. 4000 Arb.

Tochtergesellschaften: 1912 Erricht. einer selbständigen Tochter-Ges. m. b. H. in Buenos Aires unter der Firma Körting Hermanos G. m. b. H. mit Hauptsitz in Hannover (St.-Kap. RM. 100 000). Diese Ges. übernahm die frühere Körting-Abteil. der Firma Heinlein & Co. in Buenos Aires, wobei die Gebr. Körting A.-G. in Hannover-Linden ebenfalls beteiligt war.

1914 Errichtung einer selbständigen Tochtergesellschaft in Mexiko mit dem Hauptsitz in

Hannover unter der Firma Gebr. Körting G. m. b. H. (St.-Kap. RM. 100 000).

Kapital: RM. 7 900 000 in 75 000 St.-Akt. zu RM. 100 u. 20 000 Vorz.-Akt. zu RM. 20. Urspr. M. 16 000 000. 1909 Erhöh. um M. 3 000 000. Die G.-V. v. 14./9. 1920 beschloss Erhöh. um M. 6 000 000. Weiter erhöht lt. G.-V. v. 23./2. 1921 um M. 12 000 000 in 12 000 Vorz.-Akt. Die Vorz.-Aktien sind auf eine Höchstdiv. von 6 % beschränkt u. haben Nachz.-Anspruch; ihre Einzieh. zu 112 % ist gestattet. Nochmals erhöht lt. G.-V. v. 6./4. 1922 um 10 000 St.-Akt. u. 8000 Vorz.-Akt. Weiter erhöht lt. G.-V. v. 5./9. 1922 um M. 15 000 000 in 15 000 Vorz.-Akt. à M. 1000, unter Umwandl. von M. 15 000 000 alter Vorz.-Akt. in St.-Akt. Nochmals erhöht lt. G.-V. v. 10./4. 1923 um M. 50 Mill., die zunächst nicht begeben, sondern für kommende Bedurfnisse bereit gehalten werden. Die Erhöh. ist bis zum Betrag von M. 25 Mill.