Deutsch. Turkestanische Handels-A.-G., Berlin. –..Ueberseeische Elektrizitäts. A. G. – – Handels-A.-G., Berlin... M= – Petroleum A. G., Hamburg Ukrainische Flachs-A. G., Breslau Ö Schafwollhandels- A.-G., 6 d. Leipzig 5 — 3......... Berlin. Deutsche Acetat-Kunstseiden „ Freiburg.. – A.-G. f. Holzverwert., Berlin . — A. G. f. Landbedarfu. Industrie, Hildes- heim. — A. G. f. Landeskultur, Berlin 0 – A-G. f. Nestle-Ereugnisse, Lindau – A.-G. zur Verwert. von Erfind., – Allg. Treuhand, München Alls Versich., Berlin .. Ansiedlungsbank, Berlin – Asbeston-Werke, Köln – Asbestwerke A. G, Berlin- zehlendort – Asphalt-A.-G. der Limmer u. Vor- wohler Grubenfelder, Hannover. – Assekuranz-Compagnie, Transp.- u. Rückvers. Berlin. – Aufbau-A.-G. f. Grundbesitz, Industrie u. Schiffahrt, Beriin..... – Aussteuer, Bad Oldesloe – Automobilbank, Berlin – Automobil- Werkstätte, Berlin Auto-Versicherungs-A. G. Stuttgart. — akaz & Wilcox Damplkesselwerke. erlin

=– Bäder- u. iloteibeiriebs- A. G., Berin

„ Bank, Berlin

– Basalt-A. G., Treysa Bauernbank, Berlin =– Bau- u. Bodenbank, Berlin – Bau- u. Elektrizitäts-A. G., Berlin – Bauindustrie, Herne – Baumwoll-A.-G. (Debag), vrälneim: – Baustoff-A.-G., Berlin .. – — Brandenburg — =– Düsseldorf – Baustuben Dr. Ing. Maälier A. G., Berlin – Beamten-Zentralbank, Berlin .. Bergbau- u. Handels-A. G., Essen . GeBag A.-G. f. Kohle- u. Erdolchemie. Heidelberg – Blaufriesveem, Transp. u. Lagerbau-, * Hamburg – Boden-A.-G., Berlin 8 8

– Boden-Kultur, Berlin.

Bodenschätze, Hamburg-

Braunkohlen-A.-G., Berlin

– Brennstoff-A.-G., Berlin

– Briefmarken-Handels-A.-G.

(Debriehag), Berlin.

Brikett-A.-G., Düsseldorf

Büro- Industrie, Berlin

Bürsten- u. Pinsel-Ind., Reinfeld

Bugsier-A.-G., Hamburg

Burroughs Rechenmaschinen, Berlin

Bussan, Hamburg 3

Cahücit-Werke, Gnaschwitz

Celluloid-Fabrik, Eilenburg.

– =Industrie, Beilstein

Celt, Elberfeld 8

Cement.Ind., Bremen.

Chemikalien, Berlin.

– Chem. Werke, Berlin

– Continental-Gas-Ges., Dessau

– Correx, Berlin

—– Creditanstalt f. Industrie u. Landwirt-

schaft. Barlin.

= Credit- u. Effektenbank, Leutäkirch

3. Nordsee, Norden- ram .

― Dampfschiffahrtsges. Hansa, Bremen

–= kKosmos, Hamburg.

%„ 8

.

= – Deckenbau-A.-G., Essen Cor Degras-A.-G. Dresden 0 – u. Lederöl, Braunschweig.. Pesinfektions-Bedarfs- A. G., Berlin. Ö Destillerie, Berlin 2

0G0 Dinatin-A. 3 München Ce Drahtwalzwerke, Düsseldorf 0= PDäünger u. Chemikalien, Leopoldshall – Duiilop-Gummi-Comp., Hanau a. M. „ Dynamo- -Werke, Rottluf f = – Etlelstahlwerke. Bochum

– Edelstein-Ges. vorm. H. wild, Idar

7 Firmen-Register. 1928 Deutsche Efrekten- Vereinigung, Berlin 5250 – Effecten- und Wechsel-Bank, Frank- 5417 furt a. M. 6961 —– Eisenbahn- Betriebs- Ges., Berlin 3904 —– Eisenbahn-Ges. Frankfurt a. M.. 6262 – Eisenfabrikate, Nürnberg. Eisenschutz-A. G., Dresden 6310 – Elektrizitats-A. Königsberg i. Pr. 5257 – Elektrizitäts- Werke, (Garbe, Pal

2956, 7215 6530

5632 5475

5203, 7264 7121

4016 4979 1973 2815 3392

2185 1210 234, 7158 6601

3964 4282 5039

429 4924 19 6229 3967 3965 4058 7086 3016 5686 2766 2782 5686 3968 5820

6407

5082 4058 5476 7088 5798 341

1696 5818 1107 6603 6753 7090 1723 98, 5551 3127 947 4628 4545 3088 6369 48102 1174

3969, 7150 5643

1602, 7258 1244, 1852 50*3

2165

6272

6379

1939

6785

6123

485, 7177 998

4910

6150

457

4567

―――

m yer & Co.) Aachen

– Elektromobil- u. Motorenwerke, Han- nover.

–Elektromotoren Ueberwachung, Berlin

– Elektro-Revisions-A- G., Statigart

– Elemente-Fabr., Berlin.

– Erdöl-Akt.-Ges., Berlin

– Erfinder A.-G. Landshut.

– Erzgewinnungs-A.-G., Berlin.

– Evaporator, Berlin

Exporthaus A.-G., Bremen.

– Export-Industrie Verlags-A. G. Berlin

– Fahrrad-Versich., München.

– Fahrzeugfabrik, Berg.- -Gladbach

– Farbmöbel, München

– Feldspat. u. Kaolinwerke, Seilitz – Fensterglas-A.-G., Berlin... – Feuerversich., Berlin —Fiat-Automobil- Verkaufs- A. G. Berlin – Film-A.-G., Bremen.

— Filmcopier- Werke, Berlin

Charlottenburg – Fischerei, Bremen — Fischversorgungs- A.-G., Wesermunde – Futterstoff-Fabrik, Kiel

– Garantie- u. Kredit- Akt.-Ges., Berlin – Gartenbau-Kredit A.-G., Berlin 8 – Gartenbau- u. Handelsbank, Berlin – Garvin-Masch.-Fabrik, Berlin. – Gas-u. Industrie-A.-G., Brackwede. – Gas-, Elektrizit.- u. Wasserwerks-A.-G., Breslau — Gasgesellschaft, Berlin- impehot – Gasindustrie-Versich., Köln. – Gasolin A.-G. Berlin.... – Gaststätten-A.-G., Berlin.. – Gefia, A.-G. f. ind. Anlagen, Berlin – Gelatine-Fabriken, Schweinfurt. – Genossenschaftsbank, Berlin

cgogenschafts- Hypothekenbank erli

– Gesellschaft 2. Förder. des wWohnungs- baues, Berlin

– Getreide- u. A.-G., Hamburg.

– Gewerbe- u. Haffdels Baßk Berlin

– Gips-Compagnie, Katzenstein

– Gipswerke, Nordhausen..

– Glanzstein Berlin

– Glasdachwerke, Leipzig

– Glas- u. Spie „ Fürth

– Glasring-Werke, Ober- Penzighammer

– Glasveredel.-A.-G., Gross-Freden

– Glas-Versich., R

—– Glühlampen- A. G., Berlin

Golddiskontbank, Berlin

– Gold-Kredit- Bank, Berlin

– Gold- u. Silberscheide- Anstalt, furt a. M.

— Grammophon- A. Berlin

=– Grosshandelsbank flannover:

– Grube b. Bitterfeld. 8

– Grundbesitz-A.-G., Berlin – – Saarbrücken-

– Grunderedit-Bank, Gotha „ – Grundstücks-A. 0, Berlin... – Gussstahlkugel . „

– Handels-A.-G., Ha

– – Hannover

– Handels- u. Kreditbank, Dusseldorf

– – u. Plantagen-Ges.der Sudsee- Inseln,

Hamburg.

– –=u. Wirtschaftsbank, Berlin

– Handelsbank, MRanffartät

– Hanfbau-A. 0G. Berlin.

– Hansabank, Munchen

– Hansa Versich., Berlin.

– Hauptbank für Hypethekensclwtz München

Futtermittelhandels-

Berlin

– Haus. u. B odenges.,

I. 1̊ Bd. Seite 1–1952, II. Bd. S. 1953–3952, III. Bd. S. 3953–5568, IV. Bd. .

– Finanz- u. Handels-A. Gaksf

5580 3779 4707, 7268 2987

5580 1974,5520 1974 4283 4888 4492 3373 3515 4696 6641 429, 5537 6438

1975

5354, 7150 1210

4017 5687

5569–7274.