1016 Gas-, Wasser- und Eiswerke.

Kapital: RM. 56 000 in 140 Aktien zu RM. 400. – Vorkriegskapital: M. 140 000.

Urspr. M. 120 000. 1902 Erhöh. um M. 20 000 in 20 Aktfen. Lt. G.-V. v. 6./3.1930 Umstell. des A.-K. von M. 140 000 auf RM. 56 000 durch Abstemp. der Akt. zu M. 1000 auf RM. 400 (Frist 1./7. 1930).

Geschäftsjahr: 1./3. bis Ende Febr. Gen.-Vers.: März-Mai. Stimmrecht: 1 Aktie 1 St

Goldmark-Eröffnungs-Bilanz am 1. März 1924: Aktiva: Personen-K. RM. 120 450. — Passiva: A.-K. 56 000, Rückstell. 50 000, R.-F. 14 450. Sa. RM. 120 450.

Bilanz am 28. Febr. 1925: Aktiva: Personen-K. 121 825, Verlust 709. — Passiya. A.-K. 56 000, Personen-K. 2084, Rückstell. 50 000, R.-F. 14 450. Sa. RM. 122 534.

Gewinn- u. Verlust-Konto: Debet: Unk. u. Zs. RM. 709. – Kredit: Bilanz-K. RM. 709

Bilanz am 28. Febr. 1926: Aktiva: Personen-K. 119 185, Verlust 554. –— Passivyz: A.-K. 56 000, Rückstell. 50 000, R.-F. (14 450, Verl. i. 1924/25 709) 13 740. Sa. RM. 119 740.

Gewinn- u. Verlust-Konto: Debet: Unk. RM. 775. – Kredit: Zs. 220, Bilanz-K. 554 Sa. RM. 775.

Bilanz am 28. Febr. 1927: Aktiva: Personen-K. RM. 119 244. – Passiva: A.-K. 56 000 Rückstell. 50 000, R.-F. (13 740, Verl. i. 1925/26 554) 13 185, Gewinn 58. Sa. RM. 119 244.

Gewinn- u. Verlust-Konto: Debet: Unk. 699, Bilanz-K. 58. Sa. RM. 758. – Kredit. Zs. RM. 758.

Bilanz am 28. Febr. 1928: Aktiva: Personen-K. 119 144, Verlust (1927/28 100, Gew. a. 1926/27 58) 41. – Passiva: A.-K. 56 000, Rückstell. 50 000, R.-F. 13 185. Sa. RM. 119 185.

Gewinn- u. Verlust-Konto: Debet: Unk.-K. RM 697. – Kredit: Gewinnvortiag a. 1926 27 58, Zs. 597, Bilanz-K. 41. Sa. RM 697.

Bilanz am 28. Febr. 1929: Aktiva: Personen-K. 119 039, Verlust 105. – Passiva. A.-K. 56 000, Rückstell. 50 000, R.-F. (13 185, Verl. a. 1927/28 41) 13 144. Sa. RM. 119 144

Gewinn- u. Verlust-Konto: Debet: Unk. RM. 697. – Kredit: Zs. 592, Bilanz-K. 10h. Sa. RM. 697.

Dividenden: 1913/14: 8 %; 1924/25–1928/29: 0 %

Vorstand: Rich. Dunkel, Bremen.

Aufsichtsrat: Dir. Herm. Wenhold, Diedr. Schnurbusch, Paul Grossmann, Bernh. ten Breujel, Bremen.

Zahlstelle: Ges.-Kasse.

Gas-, Wasser- und Elektricitäts-Werke Mörchingen, A.6. Sitz in Bremen 4, Am Seefelde 22.

Gegründet: 27./8. 1897. Im Betriebe Gasanstalt u. Wasserwerk.

Die Ges. sollte lt. Bek. des Amts-Ger. Bremen von Amts wegen gelöscht werden. Laut Mitteil. vom Dez. 1925 trat die Ges. in Lidqu. Liquidator war R. Dunkel, Bremen. Die G.-V. v. 25./9. 1929 beschloss Aufhebung der Liquidation. Die Nichtigkeitserklärung vom 25./9. 1925 wurde am 17./1. 1930 aufgehoben.

Kapital: RM. 84 000 in 280 Akt. zu RM. 300. –— Vorkriegskapital: M. 280 000.

Urspr. M. 200 000, erhöht 1899 um M. 80 000 in 80 Aktien. Lt. G.-V. v. 6./3. 1930 Umstell. des A.-K. von M. 280 000 auf RM. 84 000 durch Abstempelung der Aktien zu M. 1000 auf RM. 300 (Frist 1./7. 1930).

Geschäftsjahr: 1./5.–30./4. Gen.-Vers.: Spät, im Okt. Stimmrecht: 1 Aktie 1 St.

Goldmarkeröffnungs-Bilanz am 1. Mai 1924: Aktiva: Personen-K. RM. 131 430. – Passiva: A.-K. 84 000, R.-F. 5430, Rückst. 42 000, Sa. RM. 131 430.

Bilanz am 30. April 1925: Aktiva: Personen-K. 131 580, Verlust 632. —– Passiva A.-K. 84 000, R.-F. 5430, Personen-K. 782, Rückst. 42 000. Sa. RM. 132 212.

Gewinn- u. Verlust-Konto: Debet: Zs. u. Unk. RM. 632. – Kredit: Bilanz RM. 632. 1 Bilanz am 30. April 1926: Aktiva: Personen-K. 130 488, Verlust 308. – Passiva: A.-K. 84 000, R.-F. (5430, Verlust in 1924/25 632) 4797, Rückst. 42 000. Sa. RM. 130 797.

Gewinn- u. Verlust-Konto: Debet: Unk. RM. 775. — Kredit: Zs. 466, Bilanz 308. Sa. RM. 775.

Bilanz am 30. April 1927: Aktiva: Personen-K. 130 399, Verlust 89. – Passiva: A.-K. 84 000, R.-F. (4797, Verlust in 1925/26 308) 4488, Rückst. 42 000. Sa. RM. 130 488.

Gewinn- u. Verlust-Konto: Debet: Unk. RM. 699. — Kredit: Zs. 610, Bilanz 69. Sa. RM. 699.

Bilanz am 30. April 1928: Aktiva: Personen-K. 130 308, Verlust 91. – Passiva: A.K. 84 000, R.-F. (4488, Verlust in 1926/27 89) 4399, Rückst. 42 000. Sa. RM. 130 399.

Gewinn- u. Verlust-Konto: Debet: Unk. RM. 697. — Kredit: Zs. 606, Bilanz 91. Sa. RM. 697.

Bilanz am 30. April 1929: Aktiva: Personen-K. 130 212, Verlust 96. – Passiva: A.-K. 84 000, R.-F. (4399, Verlust in 1927/28 91) 4308, Rückst. 42 000. Sa. RM. 130 308.

Gewinu- u. Verlust-Konto: Debet: Unk. RM. 697. – $redit: Zs. 601, Bilanz 90.

Sa. RM. 697. Dividenden: 1913/14: 5 %; 1924/25–1928/29: 0 %. Direktion: Rich. Dunkel, Bremen. Aufsichtsrat: Dir. Herm. Wenhold, Diedr. Schnurbusch, Paul Grossmann, Bremen. Zahlstelle: Bremen: Ges.-Kasse.