1018 Gas-, Wasser- und Eiswerke.

Bilanz am 31. Jan. 1925: Aktiva: Personen-K. 112 670, Verlust 715. – Passiyga: A.-K. 42 600, R.-F. 8670, Personen-K. 2115, Rückstell. 60 0C00. Sa. RM. 113 385. Gewinn- u. Verlust-Konto: Debet: Zs. u. Unk. RM. 715. – Kredit: Bilanz-K. RM. 715. Bilanz am 31. Jan. 1926: Aktiva: Personen-K. 109 927, Verlust 627. Passiva: A.-K. 42 600, R-F. (8670, Verlust 1924/25 715) 7954, Rückstell. 60 000. Sa. RM. 110 554. Gewinn- u. Verlust-Konto: Debet: Unk. RM. 775. – Kredit: Zs. 147, Bilanz-K. 627, Sa. RM. 775. Bilanz am 31. Jan. 1927: Aktiva: Personen-K. RM. 109 967. – Passiva: A.-K. 42 600, R.-F. (7954, Verlust 1925/26 627) 7327, Rückstell. 60 000, Verlust 40. Sa. RM. 109 967. Gewinn- u. Verlust-Konto: Debet: Unk. 697, Bilanz-K. 40. Sa. RM. 738. – Kredit: Zs. RM. 738. Bilanz am 31. Jan. 1928: Aktiva: Personen-K. 109 860, Verlust (1927/28 107, Gewinn 1926/27 40) 66. – Passiva: A.-K. 42 600, R.-F. 7327, Rückstell. 60 000. Sa. RM. 109 927. Gewinn- u. Verlust-Konto: Debet: Unk. RM. 699. – Kredit: Gewinnyortrag 40, Zs. 592, Bilanz-K. 66. Sa. RM. 699.

Bilanz am 31. Jan. 1929: Aktiva: Personen-K. 109 750, Verlust 110 — Passiva:

A.-K. 42 600, R.-F. (7327, Verlust 1927/28 66) 7260, Rückstell. 60 000. Sa. RM 109 860.

Gewinn- u. Verlust-Konto: Debet: Unk. RM. 697. — Kredit: Zs. 587, Bilanz-K. 110. Sa. RM. 697.

Bilanz am 31. Jan. 1930: Aktiva: Personen-K. 109 557, Verlust 193. – Passiva: A.-K. 42 600, R.-F. (7260, Verlust 1928/29 110) 7150, Rückstell. 60 000. Sa. RM. 109 750. Gewinn- u. Verlust-Konto: Debet: Unk. RM. 773. – Kredit: Zs. 580, Bilanz.K. 193.

Sa. RM. 773.

Dividenden: 1913/14: 5 %; 1924/25–1028/29: 9 – Direktion: Rich. Dunkel, Bremen. Aufsichtsrat: Dir. Herm. Wenhold, Diedr. Schnurbusch, Paul Grossmann, Bremen. Zahlstelle: Ges.-Kasse.

Vereinigte Lothringer Licht- u. Wasserwerke Akt.-Ges. Sitz in Bremen 4, Am Seefelde 22.

Gegründet: 5./1. 1898; Firma bis 9./5. 1898: Gas- u. Wasserwerk Forbach: dann bis 5./9. 1912: Gas- u. Elektricitäts-Werke Forbach A.-G. In Betrieb ist ein Gas- u. Wasserwerk; seit 1915 auch Elektrizitätsanlage (Überlandzentrale),.

Die Ges. sollte lt. Bek. des Amts-Ger. Bremen von Amts wegen gelöscht werden. Laut

Mitt. v. Dez. 1925 trat die Ges. in Liquidation. Liquidator war R. Dunkel, Bremen. Die

G.-V. v. 25./9. 1929 beschloss Aufhebung der Liquidation. Die Nichtigkeitserklärung vom 25./9. 1925 wurde am 17./1. 1930 aufgehoben.

Kapital: RM. 300 000 in 1000 Akt. zu RM. 300. — Vorkriegskapital: M. 1 000 000.

Urspr. M. 300 000. 1912 Erhöh. um M. 700 000 behufs Erwerb von Aktien der Gas- u. Elektrizitäts-Werke in Gross-Mövern A.-G. u. sonst. lothring. Gaswerks-Akt.-Ges. Lt. G.-V. v. 6./3. 1930 Umstell. des A.-K. von M. 1 000 000 auf RM. 300 000 durch Abstempelung der Aktien zu M. 1000 auf RM. 300 (Frist 1./7. 1930).

Geschäftsjahr: 1./4.–31./3. Gen.-Vers.: Im 1. Geschäftshalbjahr.

Stimmrecht: 1 Aktie = 1 St.

Goldmark-Eröffnungsbilanz am 1. April 1924: Aktiva: Personen-K. 282 491, Beteilig. 177 000. – Pass iva: A.-K. 300 000, Rückstell. 154 000, R.-F. 5491. Sa. RM. 459 491.

Bilanz am 31. März 1925: Personen-Konto 285 369, Beteilig. 177 000, Verlust 1405. — Passiva: A.-K. 300 000, Personen-K. 4283, Rückstell. 154 000, R.-F. 5491. Sa. RII. 463 774.

Gewinn- u. Verlust-Konto: Debet: Zinsen u. Unkosten RKM. 1405. – Kredit: Bilanz- Konto RM. 1405.

Bilanz am 31. März 1926: Aktiva: Personen-Konto 279 947, Beteilig. 177 000, Verlust

1138. – Passiva: A.-K. 300 000, Rückstell. 154 000 R.-F. (5491, Verlust 1924/25 1405) 4085.

Sa. RM. 458 085. Gewinn- u. Verlust-Konto: Debet: Unkosten RM. 1500. – Kredit: Zinsen 361, Bilanz- Konto 1138. Sa. RM. 1500. Bilanz am 31. März 1927: Aktiva: Personen-Konto 279 505, Beteil. 177 000, Verlust

441. – Passiva: A.-K. 300 000, Rückstell. 154 000, R.-F. (4085, Verlust 1925/26 1138) 2947.

Sa. RM. 456 947.

Gewinn- u. Verlust-Konto: Debet: Unkosten RM. 1300. – Kredit: Zinsen 858,

Bilanz-K. 441. Sa. RM. 1300.

Bilanz am 31. März 1928: Aktiva: Personen-Konto 278 718, Beteil. 177 000, Verlust 787. — Passiva: A.-K. 300 000, Rückstell. 154 000, R.-F. (2947, Verlust 1926/27 441) 2505. Sa. RM. 456 505.

Gewinn- u. Verlust-Konto: Debet: Unk. RM. 1302. – Kredit: Zinsen 515, Bilan-- Konto 787. Sa. RM. 1302. 5

Bilanz am 31. März 1929: Aktiva: Personen-K. 277 893, Beteil. 177 000, Verlust 824.

—– Passiva: A.-K. 300 000, Rückstell. 154 000, R.-F. (2505, Verlust 1927/28 787) 1718:-

Sa. RM. 455 718.