Hlektriritätswerke, elektrotechnische Indnstrie, Feinmechanik, ptik, Dhotographische Apparate, Chren.

Elektricitätswerk Unterelbe Akt.-Ges. in Altona.

Hauptverwaltung: Flottbeker Chaussee 99.

Gegründet: 23./1. 1912; eingetr. 10./4. 1912. Gründer u. Einbring.-Werte s. Hdb. d. Dt. A.-G. Jahrg. 1922/23.

Besitztum: Im Jahre 1912 erwarb die Gesellschaft sämtliche M. 1 200 000 Aktien der Elektrischen Bahn Altona-Blankenese A.-G., 1913 Bau eines neuen Drehstromkraftwerkes von zunächst 13 500 k W. installierte Leistung in Neumühlen, das im Nov. 1913 den Betrieb aufnahm. 1922/23 Erweiterung um 12 500 k W. auf insges. 26 000 kW. 1925 Ankauf eines Geländes in Schulau an der Unterelbe zwecks Erricht. eines neuen Elektrizitätswerkes; dieses wurde 1928 in Betrieb genommen. 1927 Eingemeindung mehrerer Vororte nach Altona u. Ibernahme der in den eingemeindeten Ortschaften Osdorf u. Gr.-Flottbek bestehenden Stromerzeugungsanlagen. – 1927 wurde mit den Vereinigten Grosskraftwerken Schleswig- Holstein G. m b. H. in Rendsburg ein Vertrag auf gegenseitige Unterstütz. zunächst bis zur Höhe von 6000 kW. abgeschlossen. Zu diesem Zweck ist eine Verbind.-Leit. zwischen Elmshorn u. Itzehoe hergestellt, woselbst ein Zusammenschluss mit sämtl. grösseren Elektrizitätswerken in Schleswig-Holstein stattfindet. Ab 1./10. 1928 Übernahme der Strom- verteilungsanlagen der Siedlungs-A.-G. in Altona. – Der mit den Hamburgischen Elec- tricitäts-Werken geschlossene Stromlieferungsvertrag war mit dem 31./12. 1930 abgelaufen. Um die früher geschaffenen Anlagen nicht wertlos zu machen, wurde ein Vertrag auf gegenseit. Unterstütz. in Störungsfällen im Rahmen der Übertrag.-Möglichkeit getätigt. – Die Ges. betreibt die Kraftwerke Neumühlen u. Schulau.

Statistik: 1926 1927 1928 1929 1930 Stromerzeugung Schulau . . . kWh — 1 649 244 66 308 320 87 270 400 0 Neumühlen . „ 52 951 200 67 480 400 74 124 400 22 421 300 215 900 Funkstrasse. „ 128 900 380 010 470 170 183 990 933 Gr. Flottbeck „ 239 950 372 260 40 850 = 3 Osdorf ... „ 38 46 262 73 230 = — Strombezug von: Hamburg. Electr.-Werke . „ 1 632 800 5 275 120 7 527 487 3 583 170 2 607 730 Müllverbrenn.-Anst. Altona „ 548 139 621 868 680 165 720 330 712 990 Betriebswerke Lockstedt . „ — 219 069 — — Insgesamt erzeugt u. bezogen kWh 55 261 039 74 043 610 85 116 025 93 257 960 90 807 020 Stromabgabe „ 48 233 502 63 065 265 72 514 458 76 470 052 75 195 986 Angeschlossene Zähler... Stück 33 411 50 174 57372 61 520 63 871

Am Schlusse des Geschäftsjahres 1930 waren angeschlossen: 1. Im Stadtgebiet Altona: Hausanschlüsse 14 101, Abnehmer 58 102, Glüh- u. Bogenlamen 825 207 (= 33 396 kW), Motoren u. Apparate 36 742 (= 59 998 kW); 2. im Überlandgebiet: Hausanschlüsse 457, Abnehmer 676, Glüh- u. Bogenlampen 7615 (= 304 kW), Motoren u. Apparate 231 (= 8005 kW); mithin 6.0 % mehr als im Jahre 1929.

Kapital: RM. 22 500 000 in 22 150 St.-Akt. u. 350 Vorz.-Akt. zu RM. 1000.

Urspr. M. 6 500 000 (Vorkriegskapital) in 3000 St.-Akt. u. 3500 Vorz.-Akt. zu M. 1000, übernommen von den Gründern zu pari, und zwar die M. 3 500 000 Vorz.-Akt. von der Stadt Altona, die M. 3 Mill. St.-Akt. zu gleichen Teilen von übrigen drei Gründern. Erhöht lt. G.-V. v. 4./9. 1922 um M. 33 500 000 in 33 500 St.-Akt. zu M. 1000, lt. G.-V. v. 2./3. 1923 um M. 60 Mill. in Aktien zu M. 1000. Lt. G.-V. v. 21./10. 1924 Umstell. von M. 100 Mill. auf RM. 10 Mill. (10: 1) in 9650 St.-Akt. u. 350 Vorz.-Akt. zu je RM. 1000. Lt. G.-V. v. 24./9. 1926 Erhöh. um RM. 10 Mill. in Akt. zu RM. 1000 zu pari zum Erwerb der Gas- u. Wasser- werksanlagen in Altona. Lt. G.-V. v. 17./12. 1927 Erhöh. des A.-K. um RM. 2 500 000 in St.-Akt., div-ber. ab 1./7. 1927. Die neuen Akt. dienten zur Übernahme von Elektrizitäts-, Gas- u. Wasserwerksbetrieben von der Stadt Altona.

Grossaktionär: Die Stadt Altona.

6 % Gold-Anleihe von 1923, GM. 420 000, hyp. u. durch Bürgsch. sichergest., begeben bis 1924: GM. 197 127. Kurs: Hamburg Ende 1924–1930: 60, 84, 100, 100, –, –, – %. Ende