Elektrizitätswerke, elektrotechnische Industrie, Feinmechanik, Optik. 2313

auf RM. 240 000 in 12 000 Aktien zu RM. 20 umgestellt. Zur Sanierung der Ges. erfolgte lt. G.-V.-B. v. 29./6. 1925 Zus. legung des A.-K. im Verh. 2: 1 auf RM. 120 000.

Geschäftsjahr: Kalenderj. Gen.-Vers.: 1931 am 6./6. Stimmrecht: 1 Aktie = 1 St.

Bilanz am 31. Dez. 1930: Aktiva: Kassa 1072, Bank u. Postscheck 24 075, Schuldner 41 733, Inv. 2, Masch. 694, Werkzeug u. Geräte 1205, Modelle u. Zeichn. 1. Patente 1, Barkasse Hamburg 100, Rohmaterial., Ganz- u. Halbfabrikate 114 031, Grundst. u. Gebäude 119 600, Verlustvortrag 6619. – Passiva: A.-K. 120 000, R.-F. 6000, Gläubiger 121 387, Hyp. 61 749. Sa. RM. 309 13 6.

Gewinn- u. Verlust-Konto: Debet: Gen.-Unk. 121 108, Abschr. 15 044. – Kredit: Gewinn- vortrag 2540, Betriebsüberschuss 126 993, Verlust (wird vorgetragen) 6619. Sa. RM. 136 152.

Dividenden: 1924–1930: 0 %.

Direktion: Franz Koop.

Aufsichtsrat: Kfm. D. Rimpau, Bankier Hugo Groth, Rechtsanw. Rob. Solmitz, Hamburg.

Zahlstelle: Ges.-Kasse.

Elektrizitätswerk Schlesien, Akt.-Ges. in Breslau, Albrechtstr. 22/23.

Gegründet: 18./11. 1909; eingetr. 17./2. 1910. Gründer: Ges. f. elektr. Unternehmungen, Berlin, etc. Filialen in Langenbielau, Mölke u. Waldenburg.

Zweck: Gewerbsmässige Erzeugung u. Ausnutzung elektr. Stromes in jeder Art, insbes. zur Beleucht. u. Kraftübertragung, sowie Betrieb aller zur Erfüllung des Zwecks der Ges. dienenden u. darauf bezügl. Geschäfte. Die Ges. darf zur Ausführung ihrer Zwecke Grund- stücke, Anlagen u. Einricht. aller Art u. gleichartige Unternehm., weilche geeignet sind, die Ges.-Zwecke zu fördern, erwerben oder sich daran beteiligen.

Besitztum: Der Grundbesitz der Ges. umfasst 26 ha 15 a 96 qm, von denen 22 ha 84 a 31 qm überbaut sind. Die Ges. besitzt u. betreibt 3 modern eingerichtete Kraftstationen, die eine in Tschechnitz bei Breslau gelegen mit 7 Dampfturbinen von zus. 65 000 kW Leistung, die zweite in Mölke Kreis Neurode gelegen mit 4 Dampfturbinen von zus. 30 000 KW Leistung u. die dritte in Waldenburg mit 5 Dampfturbinen von zus. 31 500 KW, insges. 126 500 kW. Die 3 Kraftwerke sind untereinander zur gegenseitigen Unter- stützung durch 40 000 Volt-Leitungen verbunden; die elektr. Arbeit wird als Drehstrom durch ein 2700 km langes Fernleitungsnetz verteilt. Das Versorgungsgebiet einschl. desjenigen der Niederschlesischen Elektrizitäts- u. Kleinbahn-A.-G., Waldenburg, hat einen Flächeninhalt von 8300 qkm mit rd. 1 000 000 Einwohner; es umfasst 17 Land- kreise u. Teile von zwei weiteren Kreisen, in denen 33 Städte u. 1040 Ortschaften ver- sorgt werden. 19 dieser Städte sind Grossabnehmer, welche die Elektrizität in eigenen Stadtnetzen weiter verteilen. Die übrigen 14 Städte besitzen Stadtnetze, die Eigentum des 0 Hlektrizitätswerkes sind. Die Ges. unterhält in weiteren 700 Ortschaften eigene Ortsnetze. In den restl. 700 Ortschaften wird der Strom durch 496 Genossenschaften verfeilt. Industrie u. Grosslandwirtschaft sind mit ca. 1050 Grossabnehmern vertreten. Die Gesamtzahl der Stromabnehmer, mit denen die Ges. direkt abrechnet, beträgt rd. 73 000. Ausserdem ver- sorgt das Elektrizitätswerk Schlesien zus. mit anderen Werken die Nachbarwerke „Über- landwerk Oberschlesien“, Neisse, „Überlandzentrale Mittelschlesien“, Striegau und das Hektrizitätswerk des Provinzial-Verbandes von Schlesien in Hirschberg. Das Versorgungs- gebiet ist besiedelt von einer leistungsfähigen Landwirtschaft u. einer sehr bedeufenden Industrie, insbes. der niederschlesischen Kohlenindustrie, ferner der Textilindustrie in den Bezirken Reichenbach-Langenbielau u. Landeshut sowie der Metall- u. keramischen Industrie In Waldenburg. Eine grosse Anzahl von Mühlen sowie Werken der Stein- u. Ziegel- industrie ist über das ganze Versorgungsgebiet verteilt.

Die Elektrizitätswerk Schlesien A.-G. beschäftigt zurzeit 324 Angestellte u. 929 Arbeiter.

àas gesamte Hochspann. netz hat eine Länge von ca. 2700 km ober- u. unterirdische Leit. 3 Stromabgabe 1924–1930: 142 336 504, 194 217 518, 196 026 805, 224 831 916, 242 041 396, 3624 527, 259 941 001 kWh. . Konzessionen: Mit den Wegeberechtigten im Versorgungsgebiet der Ges. sind gegen isemessene Abgabe langfristige Konz.-Verträge getätigt, von denen die meisten u. wichtigsten Vo. zum Jahre 1960 bezw. bis 1975 laufen. Weiterhin sind Konz.-Verträge mit den im der Ges. liegenden Städten abgeschlossen, u. zwar auf Konzessionsdauern 3 bis 50 J ahren. Mit den Landgemeinden sind zumeist 50 jährige Konz.-Verträge ge- 9 worden. Die Städte bezw. Landgemeinden sind berechtigt, während der Vertrags- kiter u. zwar das erstemal nach Ablauf des fünften Betriebsjahres, die Niederspannungs- unter Ausschluss der Hochspannungs- u. Durchgangsleitungen, sowie der V „ auf eigene Rechnung zum Buchwerte oder Taxwerte zu übern. mit der ung, für die Dauer der betreff. Konz.-Verträge Strom als Grossabnehmer nach 1 a ausschliessl. von der Ges. zu beziehen. Auf Grund einer Kabinettsorder Rasef 380 ektrizitätswerk das Enteignungsrecht verliehen, das inzwischen abgelaufen,

B neue wieder verliehen worden ist. izitge: iligungen: Die Ges. besitzt nom. RM. 1 764 200 Aktien der Niederschl. Elek- auf dis 53 Kleinbahn-A.-G., Waldenburg (A.-K. RM. 2 000 000), deren Betrieb von ihr

auer von 30 Jahren bis 1952 gepachtet worden ist. Nach dem Pachtvertrag