Orts-Register.

Bd. Seite Bd. Blockstationen II 950 Berlin, Heldburg, Bergbau „ Kleinbahn im Mans- 3 Helios Gasglühlicht II felder Bergrevier 13 1559 3 Hellriegel, Garl Licht- u. Kr aftanlagen I 950 5 Hera-Pr ometheus Strassenb. Valparaiso 1I 927 „ Hlerman (Siedelung). II Elektrochemische Werke I 1600 „ Hlessisch-Rhein. Bergb. Verein II Emaillirwerk Silesia. 1 794 „ Heymann & Schmidt II Ernst & Co. I1129 9 Hilfsverein deutscher Lehrer I Erste Berliner Kautions- Ges. E 36 „ Hotel-Betriebs-A.-G. 1 „ Deutsche Fein-Jute- 3 Hüttenhaus, A.-G. Garn-Spinnerei. I 1426 Huldschinskysche Hüttenw. II Fabrik für Blechemballage, „ Humboldtmühle II Schaeffer 3 Hydro-Sandstein- Werke II von Gummiwaaren, 0 Ilse, Bergbau Schwanitz I 1096 „ Immobilien- Verkehrsbank isolirter Drähte I „ In-ädustriestätte Süd-Ost 1I f. Nähmasch.-Appar. I 717 „ Inn photograph. Papiere I 1130 „ Internat. Electricitäts- Ges. Faconschmiede .. ... „ 3 Electricitätswerke Falbe, Metallwerke 18 5 Lloyd. Fesca & Co. E 772 „ Jenaer Elektrizitätswerke Fides, Versich.-A. I1, 408 „ Jocksdorfer Bergbau-A.-G. . I Filzfabrik Adlershof. I 1366 „ Kabelwerk Wilhelminenhof . I Fortschritt I 1157 „ Kaffeeplantage Sakarre. 11 Fortuna, Versich.- Ges. I 409 „ Kaiser-Allee. I Friedr. Wilhelm-Versich.-Ges. 1 409 „ Kaiser Wilhelmstrasse. II Fries & Co. „. „ Kaiserhof. Frister & Rossmann .. „ Kaliwerke Friedrichshall I Galvan. Metall- Fabrik II 251 „ Kamerun Bergwerks-A.-G. . II Gaswerk Britz.. II 588 „ Kammerich'sche Werke. 1 Grünau II 599 5 Kautschuk-Pflanzung Meanja I Gebr. Böhler & Co. Eleinbahn, Selters-Hachen- Gera-Meuselw.-Wuitzer „ II 893 burg Gerlach & Co. II 149 Königsberger Strassenbahn . II Germania, Transp. Vers. 6 1 410 „ Koönigswusterhausen-Töpchi- Germania-Verlag I 1157 Rleinbahn.. Germanischer Lloyd I1 483 „ Konzertgarten II Ges. f. elektrische Hoch- 3 3 Kronen-Brauerei II Untergrundbahnen. I 1507 „ Krüger & Co. 1 „ f.elektr. Unternehmungen I 1601 „ Kurfürstendamm-Boden- Ges. 1 „ Nordwest-Kamerun 3 Ges. „ f. Verwalt. u. Verwerth. -Terrain-Ges. I von Hypotheken. I1 304 „ Land- u. eckabelwerte 1 Gladenbech. II %% % Gloria, Kurbelstick-Masch. I1 772 „ Lederfabrik Eyck Glückauf, Braunkohlenver- „ Lehmann, Anton & Altred II werthung 3 4 6909 „ Leipziger Gummi-Waarenfabr. I Gott Mit Ens Grube 204 „ Lodz-Gas-Ges. II Graphische Gesellschaft 1 1157 „ Loewe & Co. 1 Grosse Berliner Strassenbahn I 1510 „ Logenhaus, A.-G. 1 „ Venezuela-Eisenbahn . I 1493 „ Lo0oh, Militärausrüstung. 1 Grunderwerbs.- u. Bau-Ges. 305 Ludwig Lehmann. 1 Grundrenten-Ges.. 1 305 „ Maklerbank 1 Grundstücks-A.-G. 1 306 „ Marienborn-Beendorfer Klein- Güter-Transport „ bahn Gummiwaarenfabrik Voigt I 1097 „ Marold Emil A. = Gutenberg-Druckerei 1 1158 „ Maschinenfabrik Guttsmann. I Haasenstein & 1 548 5 Kapler. Hagelberg... I Mecklenburg.- Strel. — Hahnsche Werke .. 1 74 Bank.. Hallesche Bahn- u. Terrain-G. 1 1540 „ Medicin. Waarenhaus II Handels-Ges. f. Grundbesitz . I 306 „ Metallwaarenfabr. Baer &Stein 1 Handelsstätte Bellealliance I 307 „ Meyer, Dr. Paul 1 Hansaviertel, Neues. „ Minerva, A.-G. (Huf beschlag) 1 Hardy & Co. „„ „ Mitteldeutsche Creditbank . 1 Hedwigshütte „„%. „ Mix & Genest 1 Heidelberger Riesenstein I 1447 „ Moabiter Electricitäts- Werke II Heimstätten-A.-G. 1 309 „ Monoline, Maschinenfabrik . II Hein, Lehmann & Co.. 1 718 „ Motorenfabrik Oberursel II

――――――

W――――ÜÜÜ,‚,