an Masch. 29 800 HP. für Gleichstrom u. Drehstrom. In Aufstellung begriffen waren

1654 Elektrofechnfsche Fabriken, Elektricitätswerke und Hilfsgeschäfte.

Beleuchtung u. des Transportwesens. – Zunächst ist eine Centrale von 7000 HP. Gleich strom für Abgabe elektr. Stromes zu Beleucht.-Zwecken und Kraftabgabe in der Stad Buenos Aires, Calle Paraguay (Fläche 4850 qm) errichtet; dieselbe eröffnete 1899 de Betrieb, der 1901 seit Fertigstellung der Anlagen voll aufgenommen wurde. Die de Ges. ebenfalls gehörige Trambahn (Tranvia Metropolitano) daselbst wurde noch mit Pferder betrieben. Umwandlung in elektr. Betrieb (Kosten ca. M. 4 000 000) fand 1903–190 statt. Erst jetzt, nach Einführung des elektr. Betriebes ist eine Prosperität zu erwarten Konc. bis 1960, alsdann geht die Strassenbahn kostenlos in den Besitz der Stadt Bueno Aires über (ausgenommen Masch. und Gebäude). –— Die G.-V. v. 30./3. 1901 beschloss die Anglieder. der zu Paris domizilier., in Liquid. getret. Compagnie Générale d'Electricite de la Ville de Buenos Aires à Paris durch Übernahme der gesamten Aktiva dieser Ges. nach dem Stande v. 30./6. 1900. Für diese Einlage ist der genannten Inferentin der Betrag von 8000 Aktien gewährt worden (wovon 2000 hebst 600 Genussscheinen aus dem Aktien- besitze des Bankenkonsortiums der Ges. gegen Überlassung einer mit 5 % zu verzinsenden Buchforderung von M. 2 000 000 an dasselbe stammen), während der Rest des Kaufpreises einstweilen als 5 % Buchschuld stehen blieb. Die von der Ges. erworbenen Anlagen umfassen ein etwa 5680 qm grosses Grundstück, ein von der Union Elektricitäts-Ges. in Berlin erbautes Elektricitätswerk für Wechselstrom mit 3000 HP. und weitere Maschinen- aggregate von 1000 HP., ein ausgedehntes Kabelnetz sowie sonstige dazu gehörige An- lagen; ferner wurde ein Kundenkreis gewonnen, dessen Bedienung die vorhandenen Maschinenanlagen fast vollständig in Anspruch genommen hat. Die Vorteile der Ver- schmelzung traten erst 1902 zu Tage. – 1903 wurde eine weitere Vergrösserung des Unternehmens durch den Erwerb des in Buenos-Aires liegenden Elektricitätswerkes der River Plate Electricity Comp. vorgenommen u. zu diesem Zwecke M. 3 000 000 in 5 % Oblig. ausgegeben (s. unten). Überdies erhielt genannte Ges. £ 2500 bar. Diese Centrale von 1800 HP. Wechselstrom liegt Calle San Juan (Grösse des Grundstücks 5217 qm, Die Ges. hat ausserdem mit der Primitiva Gas- and Electric Lighting Company of Buenos Aires Limited, Sitz in London, unter dem 12./8. 1903 ein Abkommen getroffen, wonach sie das Elektricitäts-Unternehmen dieser Ges. mit allen Anlagen u. Material., sowie mit den Ver- trägen über Anschlüsse im Aquivalent von rund 69 000 Normallampen von 16 Kerzen mit Wirkung ab 1./6. 1903 auf die Dauer von 41 Jahren gegen Zahlung einer jährl. Pachtsumme von £ 30 000 dergestalt pachtet, dass mit Zahlung der letzten Pachtrate die gesamten An- lagen ohne weiteres Entgelt in das Eigentum der Ges. übergehen. Die Primitiva Gas- and Electric Lighting Comp. hat eine mit 4 % verzinsl. Debenturesschuld von £ 600 000 (wovon sich z. Z. £ 547 200 in Zirkulation befinden, £ 50 000 noch nicht ausgegeben und £ 2800 bereits zurückgezahlt sind), die bis zu dem Zeitpunkt, zu welchem dieses Werk in den definitiven Besitz der Ges. übergeht, vollständig getilgt wird. Das Elektricitäts-Unternehmen der Primitiva Gas- and Electric Lighting Comp. umfasst eine auf einem 945 qm grossen Grundstück in der Calle Cuyo errichtete Centralstation mit 3250 HP. für Gleichstrom, 2 Accumulatorenbatterien von 6000 Amperestunden Kapazität und allem Zubehör, sowie ain Kabelnetz von 96 247 m Länge. Das Reinerträgnis des Elektricitäts-Unternehmens der Primitiva Gas- and Electric Lighting Comp. betrug ohne Berücksichtigung von Abschreib. im Jahre 1901 £ 24 924 und 1902 £ 28 532. Die gesamten Aktiven des Elektr.-Unternehmens standen am 31./12. 1902 mit £ 596 000 zu Buche. – Durch dieses mit der Primitiva Gas- and Electric Lighting Comp. getroffene Abkommen, sowie durch den schon früher aurchsefümtan Erwerb der Buenos Aires Elektricitäts-Unternehmung der Comp. Générale d-'Electricite 95 iln Ville de Buenos Ayres und der River Plate Electricity Comp. ist die Deutsch-Ueberseelse 46 Elektricitäts-Ges. die alleinige, die Erzeugung und den Vertrieb elektrischer Energie. 83 Buenos Aires z. Z. ausübende Ges. geworden. Da diese Vereinigung sämtl. in Buenos Aire bestehenden Elektricitätswerke in der Hand der Ges. den Wegfall der bisher bestanden Konkurrenz, sowie eine einheitliche Betriebsführung zur Folge hat, welche eine Ausnützung der verschiedenen Anlagen u. Ersparnisse in den Ausgaben ermöglicht. Rhn die Ges. mit den neuerworbenen bezw. gepachteten Unternehm. erheblich grössereé 13 schüsse erzielen zu können, als die Aufwendungen ausmachen, die sie hierfür zu Die Gesamtlänge der Kabelleitungen beträgt ca. 849 km. Für Bahnbetriebe waren a Kilowatt für 480 Motorwagen in Anspruch genommen. Angeschlossen waren b. netz Ende 1904: 280 399 Glüh- u. Nernstlampen, 2746 Bogenlampen, 1818 Motoren mit 9 „ 4897 Apparate u. Ventilatoren, insges. 24 630 Kilowatt entsprechend 447822 Normal 371069% Aquivalente- von 16 Kerzen. Entwickelung des Stromabsatzes 1900–1904: 7 470 410, 1904 10281188, 17 360 170, 26 793 986 Kilowattstunden. Die Centralstationen umfassten Ende

eitere on 6000 Am-

12 000 HP. Turbinenaggregate. Ausserdem stehen 2 Akkumulatorenbatterien v Mlgestelt

bperestunden Kapazität zur Verf. In 65 Unterstationen sind 132 Transformatoren. de Buenos Für die Benutzung der Strassen zur Verlegung der Kabel etc. ist an die „ 3 elekß Aires eine Abgabe zu entrichten, die zur Zeit 5 % der Brutto-Einnahme aus dem Perß Kone. Energie beträgt. Die Abgabe aus der Brutto-Einnahme der Tramway beträgt 6 9 icht be- für den Vertrieb der elektr. Energie ist keine ausschliessliche, aber auch zeitlichen schränkte. Alöpt lt. 0-V.

Kapital: M. 22 000 000 in 22 000 Aktien à M. 1000. Urspr. M. 10 000 000. vV. 30./3. 1901 um M. 6 000 000 in 6000 Aktien, welche der Comp. Genérale

ricit