1806 Elektrotechnische Fabriken, Elektricitätswerke und Hilfsgeschäfte.

R.-F. 821 505, Pens.-F. 29 957 (Rückl. 5000), Abgaben 82 729, Tant. 28 710, Vortrag 3184 Sa. M. 11 914 811. ―― Gewinn- u. Verlust-Konto: Debet: Betriebsmaterial. 321 796, do. Unk. 168 355, Handl-

Unk. 108 860, Versich. 6000, Fahrzeuge u. Kleider 2835, Steuern 29 741, Zs. 160 966, Haupt-

postinstallation 3220, Anlage-Tilg.-Kto 265 648, Ern.-F. 70 000, Gewinn 669 624. Kredit: Vortrag 4093, Stromeinnahme 1 642 951, Elektricitätsmesser 101 934, Transformatoren 640, Montage- u. Prüf.-Gebühren 29 924, Gewinn an Waren 27 502. Sa. M. 1 807 044.

Kurs Ende 1903–1905: Frs. 1995, 2325, 3200 per Stück. Aufgel. im April 1903 zu 145 %. Notiert in Zürich. Dividenden 1900–1905: 6, 7, 8, 9, 10, 11 %. Coup.-Verj.: 4 J. (K.) In der Schweiz erfolgt die Div.-Zahlung zum Tageskurse für kurze Wechsel auf Deutschland.

Direktion: Alfred Loewe. Aufsichtsrat: (5–7) Vors. Präs. Karl Abegg-Arter, Zürich; Stellv. Komm.-Rat. Bank-Dir. Jul. Schaller, Strassburg; Dir. Paul Mamroth, Dir. Dr. Walther Rathenau, Berlin; Bank-Dir. Dr. Jul. Frey, Zürich.

Zahlstellen: Gesellschaftskasse; Strassburg i. E.: Bank f. Elsass u. Lothringen u. deren Zweiganstalten, Filiale der Rhein. Credit-Bank; Berlin: Berl. Handels-Ges.; Zürich: Schweiz. Kreditanstalt.

Elektricitätswerke Thorn, Akt.-Ges. in Thorn.

Gegründet: 8./12.1899. Gründ.s. Jahrg. 1899/1900. Letzte Statutänd. 5./6. 1901, 28./4., 14./5.1903.

Zweck: Erwerb, Erricht. u. Betrieb elektr. u. sonst. industrieller Unternehmungen aller Art; spec. Erwerb u. Betrieb des Thorner Elektr.-Werkes, welches für elektr. Beleucht. u. Kraftabgabe konc. ist. Betrieb von Bank- u. Handelsgeschäften; Erwerb u. Veräusser. von Grundbesitz. Die Ges. besitzt d. Thorner elektr. Strassenbahn, Länge 4 km. Konc. v. 1./1.1899 auf 50 Jahre. Betriebseröffn. am 1./2. 1899. Ferner die Elektr. Strassenbahn Thorn-Mocker, Länge 2,4km. Konc. v. 31.5. 1899 auf 99 Jahre. Betriebseröffn. ann 30./11. 1899. Der mit der A.-6. Helios geschlossene 10 jähr. Betriebsvertrag wurde bereits mit Wirkung ab 1./1. 1902 gelöst. Die Bahn beförderte 1902–1905: 1 063 699, 1 041 494, 1 079 395, 1 123 805 Pers. Angeschlossen waren Ende 1903–1905 an die Kraftstation 127, 151, 220 Lichtkonsumenten mit 140, 172, 260 Zählern, 6634, ca. 7000. 8070 Aquivalentlampen, 47, 76, 113 Motore mit 112.8, 145.6, 211.9 K.-W. Nutzbar abgegebene K.-W.-Stunden 93 706, 129 863, 192 960.

Rapital: M. 1 200 000 in 1200 Aktien à M.- 1000. Urspr. M. 1 500 000. Die G.-V. v. 4./5. 1903 beschloss Herabsetzung durch Rückkauf u. Vernicht. v. Aktien im Betrage v. M. 300 000 (=, 300 Aktien, angeboten von Helios E. A. G. für M. 120 000).

Geschäftsjahr: Kalenderj. Gen.-Vers.: Im I. Sem. Stimmrecht: 1 Aktie = 1 St.

Bilanz am 31. Dez. 1905: Aktiva: Anlagewerte 1 367 733, Bürgschaften 25 335, Tilg- Rücklage 11 730, Versich. 6348, Kassa 395, Debit. 161 317, Bankguth. 11 161, Vorräte 42 289, Strafgeldanl. 246. – Passiva:; A.-K. 1 200 000, Grundschulden 150 000, Tilg.-Rücklage 117 759 (Rückl. 12 500), Ern.-Rücklage 61 068 (Rückl. 18 000), R.-F. 14 595 (Rückl. 2538), Anschluss- bürgschaften 840, versch. Rückl. 3920, Strafgeld- u. Unterst.-Rückl. 247, Gläubiger 29 895, Div. 48 000, Vortrag 231. Sa. M. 1.626 557.

Gewinn-u. Verlust-Konto: Debet: Betriebsausgaben 106 951, Gewinn 81 246. Sa. M. 188198. —– Kredit: Betriebseinnahmen M. 188 198.

Dividenden 1899–1905: 0, 4, 4, 2, 3, 3, 4 %. Coup.-Verj.: 4 J. (K.)

Direktion: Ing. Oscar van Perlstein. Aufsichtsrat: Vors. Rechtsanwalt A. Levinger, Stellv. Rechtsanwalt G. Fischer, Gen.-Dir. Pfankuch, Ober-Ing. J. Kovacs, Dr. T. Bredt-Schmal- bein, Obering. K. Vanoni, Cöln; S. Schönbrunn, Brüssel.

Traben-Trarbacher Beleuchtungs-Gesellschaft (Elektricitäts-Werk) in Traben-Trarbach.

Gegründet: 1890. Letzte Statutänd. 28./4. 1900. Zweck: Betrieb von elektr. Beleucht.- u. Kraftübertragungsanlagen. Die Konc. sind 1899 bis 1940 verlängert worden. Zahl der An- schlüsse Ende 1903–1905; 282, 299, 322 mit 337, 371, 419 Kilowatt, darunter 72, 80, 88 Motore,

Kapital: M. 170 000 in 170 Aktien à M. 1000. Urspr. M. 50 000, erhöht lt. G.-V. v. 16./4. 1898 um M. 70 000, ausgegeben zu 103 % und lt. G.-V. v. 8./6. 1901 zwecks Ausbau der Anlagen um M. 50 000 mit Div.-Bezug vom Tage der Einzahlung, ausgegeben 16.–31./12. 1901, zu 110 % plus 3½ % für Stempel u. Unk.

Anleihe: M. 150 000 in 4½ % Oblig. von 1898; Stücke à M. 1000. Zs. 2./1. u. 1./7. Tilg,

ab 1906 durch jährl. Auslos. im Juli (zuerst 1905) auf 2./1. Zahlst.: Gesellschaftskasse.

Geschäftsjahr: Kalenderj. Gen.-Vers.: Im I. Sem. Stimmrecht: Jede Aktie = 1 St.

Mewinn-Verteilung: Siehe Jahrg. 1901/1902.

Bilanz am 31. Dez. 1905: Aktiva: Grundstücke u. Gebäude 121 311, Masch. u. Kessel 166 758, Schaltanlagen 13 966, Accumulatoren 45 685, Strassenleit. 108 333, Elektricitätszähler 17 825, Inventar 8014, Installationsvorräte 10 306, Betriebsmaterial 2305, Betriebskosten 1134, Glühlampenersatz 1784, Feuerversich. 1428, Kassa u. Bankguth. 9670, Debit. 3734. – Passiva: A.-K. 170 000, Oblig. 150 000, do. Zs.-Kto 787, R.-F. 17 000, Abschreib. 157 700, A. E. G. Bonn 5181, Div. 10 200, do. alte 280, Tant. d. Dir. 700, Grat. 244, Vortrag 167. Sa. M. 512 260.

Gewinn- u. Verlust-Konto: Debet: Zs. 6750, Betriebs-Unk. 8672, Betriebsmaterial 16 684, Handl.-Unk. 5594, Abgaben 1229, Glühlampenersatz 1917, Abschreib. 15 200, Gewinn 11 311. – Kredit: Vortrag 255, Stromliefer. 64 106, Zählermiete 2635, Installation 363. Sa. M. 67 360,.