Slruxxs.--Schlckhkrurykkr)

G. m. b. H.

Ausführung elektrischer Anlagen Beleuchtung und Kraftübertragung Bau elektrischer Bahnen

BENLIN SW. 11, Askanischer Platz 3 Fernsprecher VI, 4885

Direktion – Abteilung für Beleuchtung und

Kraft –— Abteilung für elektrische Bahnen

BERLIN SW. 48, wineimstrasse 130

Fernsprecher VI, 2305 Technisches Bureau Berlin

CHAR LOTTE NBU R G „ FPranklinstrasse 29

Fernsprecher Charlottenburg 13 Charlottenburger Werk

BERLIN-NONNEN DAMM

Fernsprecher Charlottenburg 903 Kabelwerk

Fernsprecher Charlottenburg 6888 Kriegs- und Schiffbautechnische Abteilung – Automobilwerk

Im Deutschen Reich vertreten

durch Technische Bureaus in

Aachen, Augsburg, Berlin, Braunschweig, Breslau, Cassel, Chemnitz, Coblenz, Cöln, Cottbus,

Danzig, Dortmund, Dresden, Duisburg, Düsseldorf, Elberfeld, Erfurt, Essen, Frankfurt (Main), Görlitz, Hannover, Kattowitz, Königsberg (Preussen), Leipzig, Magdeburg, Mainz, München, Münster, Nürnberg, Posen, Siegen, Stettin, Stuttgart, Waldenburg (Schlesien), Zwickau; durch Hanseatische Siemens-Schuckertwerke G. m. b. H. in Hamburg, Kiel, Bremen; durch Rheinische Siemens-Schuckertwerke G. m. b. H. in Freiburg (Bader),

Karlsruhe, Mannheim, Metz, Mülhausen (Elsass), Saarbrücken, Strassburg (Elsass)