Elektrotechnische Fabriken, Elektricitätswerke und Hilfsgeschäfte. 763

ist, sind zu demselben von den in dem oben erwähnten Vertrage fixierten Brutto- Einnahmen eines jeden Betriebsjahres 2 % abzuführen. Der Ern.-F. I, welcher in Wert- bapieren bei der Kämmereikasse hinterlegt ist, geht nach Beendigung des Vertragsverhält- nisses ohne Gegenleistung an die Stadt Stettin über. Ein neugebildeter Ern.-F. II verbleibt der freien Verfügung der Ges. Die Ges. ist verpflichtet, ihre Anlagen dauernd betriebsfähig zu erhalten und den Betrieb nicht ohne Genehmigung des Magistrats ein- zustellen, es sei denn, dass der Betrieb von Staats- oder Reichsbehörden untersagt würde, und die gegen ein solches Verbot gesetzlich zulässigen Mittel erfolglos blieben, oder dass Naturereignisse, Krieg oder Aufstand den Betrieb unmöglich machten. Ver- letzt die Ges. die in vorstehendem Absatz enthaltene Verpflichtung, so ist der Magistrat zum KHücktritt von diesem Vertrage berechtigt.

Betriebsangaben: Auf dem Grundstück Schulzenstr. 21 in Stettin befindet sich die Central- anlage mit 9 Dampfkesseln, 6 Dampfmaschinen von zusammen 2650 PS., 10 Dynamos und einer Accumulatorenbatterie; Poelitzerstr. 97 befinden sich die Installationsabteilung, die Werkstattsräume; in Falkenwalderstr. 95 ist ein Accumulatorenseitenstation (das Grundstück ist sonst vermietet, desgl. Galgwiese Nr. 35; eine 2. Centrale mit 3 Dampf- kesseln u. 2 Dampfmaschinen (750/1000 PS. mit 4 Dynamos u. 1 Accumulatorenbatterie befindet sich Logengartenstr. 1 in der Unterwiek. Dieselbe ist im Dez. 1902 in Betrieb gekommen. Die Erhöhung der Gebrauchsspannung auf 220 Volt ist 1904/1905 durchgeführt worden. Zugänge auf Anlage-Kti erforderten 1905/06–1908/09 ca. M. 290 000, 135 000, 315 460, ca. 160 000: hiervon erforderte 1907/08 die Aufstellung eines Turbogenerators System Zoelly von 1500 PS Leistung nebst Umbau des Masch.-Hauses zus. M. 228 608.

Im Betriebe am 30./6. 1902 1903 1904 1905 1906 1907 1908 1909 Glühlampen . . 48 1 53 821 658 236 62 0150 66 512 70 747 63 Bogenlampen .. 1 91213824 f. W. 1 865 1 918 2084 2 218 2 356 2283 Nernstlampen .. 561 561 1 482 1794 1 800 1 740 s. Glühl. Meles 291 350 393 446 510 652 726 875 Kabellänge . m 220 411 254 031 267 275 279 652 295 675 307 865 310 000 310 000

Kapital: M. 5 000 000 in 5000 Aktien à M. 1000. Urspr. M. 1 200 000, erhöht 1892 um M. 300 000, lt. G.-V. v. 22./12. 1894 um M. 500 000 in 500 Aktien, den Aktionären 22./3. bis 5./4. 1895 angeboten, lt. G.-V. v. 17./5. 1897 um M. 500 000 in 500 ab 1./7. 1897 div.-ber. Aktien, den Aktionären 16.–25./6. 1897 zu 125 % angeboten, lt. G.-V v. 24./9. 1898 um noch M. 500 000 in 500 ab 1./1. 1899 div.-ber. Aktien, angeboten den Aktionären 5: 1 v. 18.–26. 11. 1898 zu 130 %, lt. G.-V. v. 11./5. 1900 um M. 1 000 000 in 1000 Aktien mit halber Div.-Ber. für 1900/1901, ab 1./7. 1901 voll div.-ber.; diese neuen Aktien wurden von einem Konsortium zu 120 % über- nommen und den Aktionären 3: 1 v. 1.–16./6. 1900 zu 125 % angeboten, voll eingezahlt seit 15./12. 1900; weitere Erhöhung lt. G.-V. v. 15./5. 1902 um M. 1 000 000 (auf M. 5 000 000) in 1000 neuen Aktien, div.-ber. für 1902/1903 zur Hälfte, ab 1./7. 1903 voll, übernommen von einem Konsortium zu 112.50 %, angeboten den Aktionären 4: 1 v. 16.–24./6. 1902 zu 117.50 % zuzügl. ½ Schlussnotenstempel; 50 % u. Agio waren gleich zu zahlen, restl. 50 % waren bis 20./6. 1903 zu entrichten. Zur Erhöhung des A.-K. ist Genehmigung des Stettiner Magistrats erforderlich.

Hypotheken: M. 80 000, auf dem Grundstück Falkenwalderstr. 95, verzinsl. seit 1./1. 1904 zu 4 % unkündb. bis 1./1. 1914. Der Stadtgemeinde ist eine Kaut.-Hyp. von M. 215 000 bestellt.

Geschäftsjahr: 1./7.–30./6. Gen.-Vers.: Bis Ende Okt. in Berlin oder Stettin. 1 Aktie = 1 St.

Gewinn-Verteilung: Mind. 5 % z. R.-F. (ist erfüllt), sodann von der Brutto-Einnahme 2 % 2. Ern.-F. bis 20 % des in den gesamten Anlagen investierten Kapitals, bis 5 % vertragsm. Tant. an Vorst. u. Angestellte, dann bis 4 % Div., vom Rest 10 % Tant. an A.-R. u. Vorst. gemeinsam, dann weitere 2 % Div., vom Uberrest 25 % der Stadtgemeinde, 75 % als weitere Div. bezw. nach G.-V.-B.

Bilanz am 30. Juni 1909: Aktiva: Immobil. 447 641, Gebäude 1 411 137, Kessel 346 267, Dampf., Dynamomasch. u. Motoren 1 230 769, Zu- u. Abflusskanal 152 418, Rohrleitungen 150 117, Beleucht.-Utensil. 41 346, elektr. Apparate, Elektrizitätsmesser u. Bogenlampen im Betriebe 617 474, Laufkräne u. sonst. Betriebsmittel d. Zentrale 134 014, Kabelnetz u. Hausanschlüsse 1 938 511, Akkumulatoren 503 964, Treppenflur-Beleucht. 563 445, Strassen- do. 6328, Waren, Betriebs- u. Rohmaterial, in Ausführung begriffene u. leihweise gegebene Sachen 142 639, ausser Betrieb befindl. Masch. 10 671, Kontor-, Werkstatt- u. Betriebsutensil. 28 514, Werk- zeuge u. Werkzeugmasch. 15 813, Laboratorium 1, Gespanne 1, fremde Kaut. 20 145, Kaut. bei Behörden 42 300, Kaut.-Hypoth. Stadtgemeinde 215 000, Ern.-F. bei Stadtgemeinde 22 137, Kassa 6065, Versich. 1833, Debit. u. Bankguth. 272 333. – Passiva: A.-K. 5 000 000, R.-F. 580 937, Delkr.-Kto 2000, Ern.-F. 42 759, Hypoth. 80 000, Kaut. 19 010, Kaut.-Hyp. (Stadt- gemeinde) 215 000, restl. Abgabe an die Stadtgemeinde 51 667, Unterst.-F. 3385, unerhob. Div. 540, Amort.-F. (Abschreib.) 1 864 450, Kredit. 55 553, Div. 350 000, Tant. a. A.-R. u. Vorst. 38 792, Gewinnanteil Stadtgemeinde 16 699, Vortrag 98. Sa. M. 8 320893.

Gewinn- u. Verlust-Konto: Debet: Gen.-Unk. 57 061, Zs. 4828, z. Amortis.-Kto 171 231, Abschreib. von den Aktiven 14 832, Ern.-F. 20 622, Gewinn 405 589. – Kredit: Vortrag 125, Betriebsüberschuss abzügl. 108 110 Abgabe an die Stadtgemeinde bleibt 671 218, Miets-Ertrag 2823. Sa. M. 674 166.

Kurs Ende 1894–1909: 127.75, 127.50, 158, 160, 158.60, 150.50, 136, 133.25, 135, 132.25, 128.75, 130.80, 131.50, 120, 119.25, 133 %. Aufgelegt 21./3. 1893 zu 110 %. Notiert in Berlin.