Elektrotechnische Fabriken, Elektrizitätswerke und Hilfsgeschäfte. 1063

Dividenden 1920–1922: ?, ?, 30 %.

Direktion: Bernh. Willy Blechen, Niedersedlitz. Aufsichtsrat: Vors. Dir. Harry Kühne, Dresden; Stellv. Bankdir. Hugo Ehrlich, Komm.-Rat Heinr. Arnstein, Eger; Dir. Thomas Ort, Niedersedlitz; Fabrikbes. Erich Harlan, Fabrikdir. H. F. Schladitz, Dresden.

Elektricitätswerk Westfalen Akt.-Ges. in Bochum.

Gegründet: 27./6. 1906; eingetr. 28./8. 1906. Gründer siehe dieses Handb. 1920/21. Das Elektriz.-Werk ist ein kommunales Unternehmen.

Zweck: Erzeugung, Fortleitung, Lieferung u. Verwendung von Elektrizität zu Beleuch- tungs-, Kraftübertragungs-, Beförderungs- und sonstigen Zwecken, desgleichen der Betrieb von Gas- u. Wasserwerken in Westfalen u. Rheinland sowie die Ausführung aller zur Erfüllung dieser Zwecke dienenden oder darauf bezügl. Geschäfte.

Hauptverwaltung in Bochum. Das Versorgungsgebiet ist in zwei Verwaltungsbezirke mit dem Sitz in Bochum u. Münster eingeteilt.

Das Versorgungsgebiet der Ges. erstreckt sich innerhalb der Provinz Westfalen über 23 Land- u. Stadtkreise der Reg.-Bez. Arnsberg, Münster u. Minden u. umfasst die wich- tigsten Teile des Ruhrkohlen- u. des westf. Industriebezirks, sowie die bedeutende Land- wirtschaft des Münsterlandes. Die Versorgung dieses rund 6700 qkm grossen Gebietes mit elektr. Energie erfolgt durch drei eigene grosse Kraftwerke: Das Gemeinschaftswerk in Hattingen a. d. R., das Gersteinwerk in Stockum a. d. Lippe u. ein kleineres Werk in Witten, die sämtl. mit Dampf betrieben werden. Ausser diesen eig. Kraftwerken bezieht die Ges. auf Grund langfristiger Verträge elektr. Energie von 18 im Versorg.gebiet lieg. Zechenkraft- werken u. von and. benachbarten Elektrizitätswerken, dem Rh. Westf. Elektrizitätswerk A.-G. Essen, dem Westfäl. Verbands-Elektrizitätswerk A.-G. u. dem Städtischen Elektrizi- tätswerk Dortmund, sowie den Niedersächs. Kraftwerken A.-G. Osnabrück-Ibbenbüren. Von allen diesen Kraftwerken aus führen der Ges. gehörende Freileitungen u. Kabel mit 100 000, 50 000 u. 10 000 Volt Betriebsspannung in die einzelnen Bezirke des Versorgungsgebietes, in denen die elektr. Energie in zahlreichen grösseren u. kleineren Schalt- u. Transforma- torenstationen auf Gebrauchsspannung umgewandelt wird, mit der die angeschlossenen Gemeinden, Gewerbetreibenden oder Industrien mit Licht u. Kraft versorgt werden. Das Schwergewicht der Stromlieferung liegt bei der Art des Versorgungsgebietes im Verbrauch der grösseren u. mittleren Industrien, die rd. 95 % der Stromerzeug. in Anspruch nehmen. Eine Anzahl von Gemeinden wird von der Ges. auch mit Gas versorgt. Die dafür erforderl. Gaswerke u. Rohrleitungsnetze befinden sich zum Teil im Eigentum der Ges. Die Gas- ereug. auf diesen Werken ist jedoch stillgelegt, die Ges. bezieht das Gas von benachbarten Zechen. Zum Teil sind die Gaswerke Eigentum der Gemeinden u. werden von der Ges. auf Grund von Pachtverträgen betrieben. Die Grundst. umfassen rd. 325 800 qm, die mit rd M. 647 000 zu Buche stehen. An Geb. sind ausser den Kraftwerken vorhanden: Ein Verwaltungsgebäude, sowie mehrere Betriebsgeb., Werkstätten, Beamten- u. Arbeiter-Wohn- häuser in Bochum, sowie zahlreiche grössere u kleinere Schalt- u. Transformatorenstationen im Versorgungsgebiet mit Wohnhäusern für das Betriebspersonal; diese Gebäude stehen zu Buch mit rd. M. 13 232 230. Die Betriebsmittel zur Stromumformung u. Schaltung umfassen 938 Transformatoren mit 238 350 K. V. A. Gesamtleistung. An Leitungsanlagen sind vor- handen: 577 km Kabel, 846 km Freileit. für Hochspannung, 164 km Kabel, 922 km Freileit. für Niederspannung, 420 km Kabel, 67 km Fraileit. für Fernsprechleit. Diese Werte stehen zu Buch mit rd. M. 41 592 937 An Grosskraftwerken besitzt die Ges. das ,Gersteinwerk“ in Stockum a. d. Lippe (Kreis Lüdinghausen), sowie das „Gemeinschaftswerk“ in Hattingen a. d. R. Das Gersteinwerk hat mit 12 Dampfkesseln von rd. 6000 qm Heigzfläche u. drei Dampfturbogeneratoren eine Gesamtleist. von rd. 30 000 KW u. steht zurzeit mit rund M. 8 703 350 zu Buch. Eine Erweiter. des Werkes mit 4 Dampfkesseln von rd. 2400 qm Heiz- fläche u 1 Dampfturbogenerator von 12 500 KW nebst Schaltanl. u. sonst. Zubehör befindet sich im Bau, die als halbfert. Anlagen zurzeit mit M. 56 900 000 zu Buche stehen. Das Gemein- schaftswerk hat mit 12 Dampfkesseln von rd. 6000 qm Heizfläche u. drei Dampfturbogene- ratoren eine Gesamtleist. von rd. 25 500 KW. An diesem Werke ist die Ges. u. die Stadt Barmen je zur Hälfte beteiligt. Der Anteil der Ges. steht mit M. 4 919 526 zu Buche. Auch dieses Kraftwerk erfährt eine starke Erweiter. durch Aufstell. von acht Dampfkesseln mit rd. 4800 qm Hsoizfläche u. zwei Dampfturbogenerat. von zus. 25 000 KW Leistung. Die dafür bisher aufgewendeten Mittel betragen auf der Seite der Ges. M. 36 929 000. Die im Eigentum der Ges. betrieb. Gaswerke Eickel-Wanne-Röhlinghausen-Günningfeld (Landkreis Gelsenkirchen) sowie Langendreer-Werne (Landkr. Bochum) stehen zu Buche mit M. 4 750 090. In 1921/22 betrug der Stromabsatz über 121 070 795 KWSt, Gasabgabe 5 844 222 cbm. In den Betrieben der Ges. werden ca. 600 Angestellte u. Arb. beschäftigt.

Kapital: M. 100 000 000 in 100 000 Aktien à M. 1000. Urspr. M. 2 000 000. Die G.-V. v. 24./6.1907 beschloss Erhöhung des A.-K. um M. 2 000 000 in 2000 Aktien mit Div.-Ber. ab 1./10. 1907, übernommen von einem Konsort. zu 115 %; angeboten hiervon M. 1 000 000 den alten Aktionären zu 117 %. Die a. o. G.-V. v. 17./4. 1912 beschloss weitere Erhöh. des A.-K. um M. 2 000 000: diese neuen Aktien wurden zu 160 % ausgegeben u. in erster Linie den der Ges. neu hinzutretenden Kreisen u. Gemeinden bis zu bestimmten Beträgen reserviert, der Rest blieb den alten Aktionären vorbehalten. Dann erhöht lt. G.-V., v. 29./9. 1921 um