Siemens & Halske Aktiengesellschaft

Vertriebsorganisation.

a) Technische Büros der sSiemens & Halske A.-G. und der Siemens-Schuckert-

Aachen (nur SSW) Allenstein (nur SSW)

Augsburg Berlin Bielefeld Brandenburg Braunschweig Bremen Breslau Chemnitz Cottbus Dessau

Dortmund (nur SSW)

Dresden Düsseldorf

Duisburg (nur SSW)

b) Gesellschaften, Geschäftsstellen und Vertr und der Siemens-Schuckertwerke A.-G.

werlke A.-G. im Deutschen Reich.

Elbing (nur SSW) Kiel

Erfurt Koblenz (nur SSW) Essen Köln

Frankfurt a. M. Königesberg i. Pr. Frankfurt a. O. (nur SS8 W) Leipzig

Freiburg (nur SSW) Magdeburg

Gleiwitz Mainz

Görlitz Mannheim

Goslar (nur SSW) München

Halle Münster

Hamburg Nordhausen (nur SSW) Hamm Nürnberg

Hannover Oldenburg (nur SSW) Hof (nur SSW) Osnabrück (nur SSW) Karlsruhe Plauen Kassel Regensburg (nur SSW)

Rostock

Saarbrücken

Schwerin (nur SSW)

Siegen (nur SSW)

Stettin

Stolp (nur SSW)

Stralsund

Stuttgart

Waldenburg

Wetzlar (nur SSW)

Wilhelmshaven

Würzburg (nur SSW)

Wuppertal-Elberfeld (nur SSW)

Zittau

Zwickau

etungen der Siemens & Halske A.-G. im Ausland.

Land Firmenbezeichnung Sitz Europäisches Ausland: Albanien „Sita“* Shoquenie Industriale Tregtare Anonime LTirana Belgien SGociété Anonyme Siemens Brüssel Bulgarien Bulgarische Elektrizitäts A.-G. „Siemens“ Sofia Dänemark Siemens Elektricitets Aktieselskab Kopenhagen Danzig „Siemens? G. m. b. H. Danzig Estland Tehnika Büroo Hermann Oesterlein Hallinn Finnland Sähkö Osakeyhtiö Siemens Elektriskt A. B. Helsingfors desgtl. o desgl. Voioiipuri Frankreich 133 esgl. on desgl. Griechenland Technische Gesellschaft Alexander Zachariou & Co. Athen „ 880 esgl. 9 Patras Groß-Britannien Siemens-Schuckert (Great Britain) Ltd. London desgl. Park Royal Works lanag anchester

Irland, Freistaat Island Italien

Jugoslawien

Lettland Litauen Luxemburg Memel Niederlande Norwegen

desgl.

desgl. Siemens-Schuckert (Ireland) Ltd. Ing. Paul Smith Siemens Societä Anonima

desgl.

desgl.

desgl.

desgl.

desgl.

desgl. Jugoslawische Siemens A.-G.

desgl.

desgl. Lettländische A.-G. Siemens Obering. A. Putrimas u. Co. Société Anonyme Siemens Dipl.-Ing. A. Wittenberg Nederlandsche Siemens Maatschappij N. V. Siemens Norsk Aktieselskap

desgl.

desgl.

desgl.

Brentford, Middlesex Dublin

Reykjavik

Mailand Bari Florenz

Genua

Rom

Triest

n

Agram (Zagreb) Beigrad (Beogräd) Laibach (Ljubljana) Riga Kowno (Kaunas) Luxemburg Klaipeda (Memel) s'Gravenhage Oslo Bergen Stavanger Trondhjem