―Ra――― .

..

―

― ―

――

Harpener Bergbau-Aktien-Gesellschaft, Dortmund

Schachtanlagen: a) Schacht Arnold un d Jakob: 3 Schächte; tägliche Durchschnittsförderleistung rund 4500 t. Nebenanlagen: Großkokerei mit 65 Oefen (Tageskapazität rd. 1200 t) Großwäscherei, Ringofen- Ziegelei, 70 Teeröfen und Brikettfabrik (außer Betrieb). b) Schacht Amalia: 2 Schächte (Förderung 1927 eingestellt). c) Schacht Caroline: 4 Schächte. Nebenanlagen: 76 Koks(flamm)öfen, Brikett- fabrik.

2. Zeche Neu-Iserlohn, Bochum.

Größe der Felder (siehe Zeche Robert Müser). Grundbesitz: 623 776 qm. Häuser: 109. Anlagen: Teeröfenanlage und Benzolfabrik, Klein- kokerei (Brikettfabrik außer Betrieb). Die Schachtanlage Neu-Iserlohn II gelangt 1932 zum Abbruch.

z. Zeche Siebenplaneten (Gewerkschaft Sieben- planeten).

Größe der Felder: 4 412 992 qm = 2 Normalfelder.

Häuser: 36.

Schächte: 2.

Anlagen: Koksofenanlage, Brikettfabrik.

4. Zeche Massener Tiefbau (Gewerkschaft Siebenplaneten). Größe der Felder: 26 268 000 qm. Schächte: 4 (1925 stillgelegt). Anlagen: 2 Koksofenanlagen mit Nebengewinnurg, 2 Brikettfabriken, 2 Benzolfabriken.

I. Gruppe Dortmund. 5. Zeche ÜGneisenau, Dortmund-Herne.

Größe der Felder: 64 205 406 qm = 29 Normalfelder (Gneisenau, Scharnhorst und Preußen I und II).

Grundbesitz: 1 027 481 qm.

Häuser: 203.

Schächte: 4.

Anlagen: Zentralkokerei für die Zechen Gneisenau, Scharnhorst und Kurl mit 130 Oefen und einer Tageskapazität von 2400 t. (Die Ausbauten wurden Anfang 1931 beendet; das überschüssige Kokerei- gas wird an die Ruhrgas A.-G. abgesetzt und dient zur Speisung der Gasfernversorgung Süd- westfalen). Teeröfenanlagen, Benzolfabrik, Ring- ofen-Ziegelei, Kraftzentrale nebst Kesselhaus, Gas- kompressionsanlage für Gasfernversorgung.

Fabriken: Konstruktionswerkstätten.

6. Zeche Scharnhorst, Dortmund-Scharn- horst.

Größe der Felder (siehe Zeche Gneisenau). Grundbesitz: 1 009 516 qm.

Häuser: 159.

Schächte: 2 (Förderung 1928 eingestellt).

Anlagen: Teeröfen und Benzolfabrik.

7. Zeche Kurl, Kurl. Größe der Felder (siehe Gneisenau). Grundbesitz: 553 902 qm.

Häuser: 210.

Schächte: 2 (Förderung Juni 1931 eingestellt).

Anlagen: 160 Koksöfen und Benzolfabrik, Brikett- fabrik außer Betrieb.

S. Zeche Preußen I und II.

Größe der Felder (siehe Zeche Gneisenau).

Grundbesitz: 2 087 992 qm.

Häuser: 424.

Schächte: 4 (3. April 1926 stillgelegt). Abbau der Zeche Preußen I erfolgt durch Zeche Gneisenau.

Anlagen: 85 Teeröfenanlagen und Benzolfabriken.

9. Zeche Victoria (Gewerkschaft Victoria, Lünen),. Größe der Felder: 8 818 570 qm = 4 Normalfelder. Grundbesitz: 860 792 qm.

Häuser: 267.

Schächte: 2 (15. Juni 1928 Stillgelegt. wird nicht wieder aufgenommen.) Großkokerei, Teeröfenanlagen und Benzol-

abrik.

Der Betrieb

10. Zeche Roland.

Größe der Felder: 6 090 000 = 44 Normalfelder. Grundbesitz: 453 032 qm.

Häuser: 83.

Schächte: 3 (1926 stillgelegt).

Anlagen: Brikettfabrik.

C. Gruppe Herne.

11. Zeche Julia, Herne (einschl. frühere Zeche v. d. Heydt).

Größe der Felder: 22 526 000 qm (Julia, Reckling- hausen I und II).

Grundbesitz: 803 876 qm.

Häuser: 136.

Schächte: 5.

Anlagen: 60 Koksöfen (September 1928 stillgelegt) und Benzolfabrik.

Zechen Recklinghausen I und II, Recklinghausen.

Größe der Felder (siehe Zeche Julia).

Grundbesitz: 1 087 510.8 qm.

Häuser: 278.

Schächte: 4 (Förderung auf Recklinghausen I am 15. September 1931 eingestellt).

Anlagen: Recklinghausen I:

Ringofenziegelel.

Recklinghausen II: 58 Koksöfen (stillgelegt).

12.

60 Koksöfen und Benzolfabrik,

D. Gruppe Buer.

13. Zechen Hugo Iund II, Gelsenkirchen- Buer (einschl. frühere Hugo III).

Größe der Felder: 28 546 517 qm = 107 Normalfelder.

Grundbesitz: 1 580 347 qm.

Häuser: 343.

Schächte: 5.

Anlagen: Hugo I: Ringofen-Ziegelei und Bausteinformerei. Hugo II: 96 Koksöfen mit Nebengewinnungsanlagen

(Benzolfabrik, Separation).

Sonstiges: Durch eigenen Hafen an den Rhein-Herne-

Kanal angeschlossen.

Als Manuskript gedruckt. 6949