Hüttenwerke C. Wilh. Kayser & Co. – Niederschöneweide Aktiengesellschaft, Berlin

Anlagen: 1 Schachtofenanlage für Kupferrückstände mit 2 Schachtöfen und Abhitzkessel,

1 Kupferhütte mit Konverterbetrieb, Trommel- und Flammöfen, Gießvorrichtungen und 2 Sackhaus- anlagen, Kupferelektrolyse, Schachtofenanlage für Schachtöfen,

1 Schachtofenanlage für Zinnrückstände mit einem

Schachtofen,

1 Bleiraffineriehütte mit dazugehörigen Flammöfen,

Treiböfen,

1 Zinnraffineriehütte öfen,

1 Lötzinnfabrikationsanlage,

1 Vakuum-Verdampfanlage.

–

Bleirückstände mit zwei

mit Flammöfen, Mischzinn-

Maschinelle Einrichtung: 2 elektrische Gasreinigungsanlagen, 1 Brikettierungsanlage für Feinmaterialien, Kompressor für die Konvertoren, 1 Gasgeneratorenanlage, 4 Gebläse für Schachtöfen, 1 Einrichtung für die Lötzinnfabrikation, Lastenaufzüge, Kugelmühlen, Fallwerk, elektrische Schlagschere, 1 Drehkran, 3 Motorengeneratoren für Elektrolyse, 1 Hüttenkran.

Kraftanlagen: Der benötigte Strom wird zu 90 % vom Elektrizi- tätswerk bezogen. Als Reserve dient 1 Tandem-

Dampfmaschine von 600 PS mit 2 Drehstromgene- ratoren von 240 kVA, 6 Dampfkessel.

Bahnanlage:

1260 m Normalspurgleis, 1 Hauptgleis und 3 Neben- gleise mit 2 Drehscheiben, 1 Waggonwaage. Es sind 2400 m Schmalspurgleis vorhanden.

Gebäude:

2 Wohnhäuser,

2 Verwaltungsgebäude mit Laboratorium, Probe-

nahme und Büroräumen,

1 Wohlfahrtsgebäude für die Gefolgschaft,

1 Magazingebäude,

1 Kessel- und Maschinenhaus,

1 Gebläsehaus,

2 Ofenhäuser,

1 Gebäude für Kupferelektrolyse, Laugerei und Reparaturwerkstätten, wie Schlosserei, Schmiede, Bleilöterei und Tischlerei,

2 Sackhäuser,

2 Gebäude für elektrische Gasreinigung,

2 Lagerhallen.

3. Werk Lünen a. d. Lippe.

Grundbesitz: 110 362 qm, bebaut 14 553 qm. Erzeugnisse: Elektrolytkupfer- Kathoden, Raffinade-

Kupfer, Konverter-Kupfer.

Nebenprodukte: Kupfervitriol, Nickelvitriol, zinn- haltige Oxyde, Zinkoxyde für Farbzwecke und hüttenmännische Zwecke, Anodenschlamm.

Anlagen:

1 Schachtofenanlage für Kupferrückstände, be- stehend aus einem Wassermantelofen und zwei kleinen Schachtöfen mit Fahrstühlen, Abhitz- kesseln, Umluftfilteranlagen und Gleisanlagen Kupferhütte mit Konverteranlage mit drei Kon- vertern, Gebläsemaschinen, Krananlage, Gieß- maschinen mit 2 Flammenöfen, Kupferelektrolyse,

Wälzanlage mit Drehofen, Bunker, Mahlvorrich- tung, Siebv und mechanischer Förder- anlage, 1 Vakuum-V ferd- unpfanlage, Kühlanlage und Umluftfilteranlage.

Maschinelle Einrichtung:

—

2 Umluftfilteranlagen,

2 Hüttenkrane für Konverterbetrieb,

1 Kühlanlage,

1 Dampfkran,

3 Motorengeneratoren für Elektrolyse, 1 Einankerumformer für Elektrolyse, 1 Kompressor für Konvertoren,

2 Gebläse für Schachtöfen,

Umformer für die Hängebahn. Kraftanlagen: Der benötigte Strom wird dem Elektrizitätswerk

entnommen. Als Reserve dienen 2 Dampfmaschinen von je 300 PS mit 2 Drehstromgeneratoren von 240 KkVA und 4 Dampfkesseln. Bahnanlage: 1600 Normalspurgleis, 3 Hauptgleise. 1 Neben- gleis, 2 Waggonwaagen, 1 elektrische Hängebahn, 3000 m Schmalspurgleis, 1 Benzollokomotive, 12 Güterwagen. Gebäude: 7 Wohnhäuser, 1 Verwaltungsgebäude mit Betriebsbüro, torium, Probenahme und Lagerräumen, 1 Wohlfahrtsgebäude mit Pförtnerhaus, 1 Maschinenkesselhaus, 1 Ofenhaus, 1 Gebäude für Elektrolyse und Laugerei, 1 große Lagerhalle mit anschließenden Reparatur- 1 1 1

Labora-

werkstätten, Staubkammer, Pumpenhaus, Lagerschuppen, 1 Gebäude für Umluftfilteranlage.

Die Gesellschaft gehört folgenden Fachgruppen und Verbänden an:

Fachgruppe Metallerzeugende Industrie der Wirt-

schaftsgruppe Nichteisenmetall-Industrie; Wirtschaftsgruppe Groß-, Ein- und Ausfuhr-Handel;

Gesellschaft Deutscher Metallhütten- e. V., Berlin.

und Bergleute

Statistik.

Heutiges Aktienkapital:

nom. RM 4 200 000.– Stammaktien in 6922 Stücken zu je RM 300.– (Nr. 2000 Stücken zu je RM 1000.– (Nr. 1234 Stücken zu je RM 100.— (Nr.

467*

Handbuch der Deutschen Aktiengesellschaften 1936, V.

1– 6922), 6923– 8922), 8923–10156).

7459