ah) Die derzeitige Kapazität (= theor

*

keit) der Gesellschaft wird – gemessen an 1939 – auf 100 %, Derzeitiger Umsatz: Export 75 %, Inland 25 %.

4

7 * * * 7 „ 0 * * 7 0 4 * X * 4 7 „ *

tche Leistungsfählg-

*

* ― 7 =* * = * * *

*