― 8 7ü aM 886 72492% 080.– eine bei demn st111e Reserve dar t Rücksicht auf

7. ste1ten. r 20147

die ungeklärte vernögensla-

Gese 11 Schaft auf = % —

en werden. 1248 15,5 420 15 15 20 E Ön 14 1= %

5 16 1 12

Jan-

= 20

nöchster: niedrigster: „

Tebr. März XPII1

......0 146 1505

.

20 1 20 20 (6,9.)

* *

38 7 7 ir. d. v.-Sekeirer) 16 in %:

Nr. d. Div.-Scheines:

0 0

— * Auf Kapätal

essn9gef an 6. verte-ver 1949