1945 naben keine Vevlapverte: lungen tatt gefunden. Näaghstv3 111ger Divzdendeasehsaaz nr. 4

*

Res atzta . ne Votaerung Tag der Letzben Hvzz 3 Septender 19 3 Apgesehlossen 1m 1 1950.