Nienstöädt N

Niemonn, Hugo, Dr., Assessor, 4 Dösseldorf Geschf: lucena-Kleiderfobrik Ömbf., Dösseldorf, Schodow- straße 79–85 Fabro Kleiderfobrik Gmbfi., Essen

Niemonn, John, Dr., 61 Dormstodt, Hobichweg 6, * 19. 4. 1905 Vorstond: E. Merck AG., Darmstaodt

Niemonn, Kurt, 4803 Amshausen 27 Post Steinhagen (Westf) 10. 5. 1905 in Bielefeld Ausb: Textilfochl. Ausb. Inh: Florex-Werk Niemonn & Harde KG., Steinhogen Florex anct. Epontis, Bischwiller / Fronkreich Niemonn Maschinen KG. Steinhogen Niemann Textil Gmbli., Steinhogen tip-top Expressreinigung, Honnover

666 Zweibrücken, Troutmonnstr. 16, Geschf: Dorndorf-Schöhfobrik mb.. 8 Co., Zweibröcken

Niemonn, Walter, Dr. rer. pol., Dipl.-Kfm., Dir. Vorst: Stödtische Broverel zü Göttingen, 34 Göttingen

Niemonn, Werner, 6 Fronkfurt (Main) Mitgl. d. Dir: Berliner Hondels-Gesellschoft, Fronkfurt (Main), Posffach 3821

Niemonn, Wilhelm Dir: Sonkhous Hermonn Lompe Kommonditgesellschoft, 48 Bielefeld, Postfach 40

Niemetz, Fritz-OÖno, Direktor Vorst (kaufm): Deutsche Industrie-Werke AG., 1 Berlin 20, Freiheit =7

Niemeyer, Adolf D., Direktor, 3 Honnover-Kirchrode, Ostfeldstr. 30 VorstMitgl: Postfach 707 Geschf: Continentol Cooufchouc Compognie Gmbfi., Haonnover Beirdt: Dresdner Bonk AG.

VorstMitgl: Wirtschoftsverbond der deutschen Kaufschok- industrie e. V. (W. d. K.), Fronkfurt (Main) Kuratorium „Wir und die Stroße“, Bonn

Continental Gummi-Werke A&G., 3 Honncyer,

Niemeyer, Bernhurd, Ing., 4441 Riesenbeck / über Rheine (Westf) Geschf. u. PershGes: Westfölische Stahl-Pflug-Fobrik H. Niemeyer Söhne, Riesenbeck 0. Rheine (Westh 2

Niemeyer, Curl, Dipl.-Kfm., 792 Heidenheim (Brenz), Rondstr. 6, 3. 3. 906(

Dir: J. M. Voith Gmbll., Heidenheim

Ak: Gemeinnbtzige Bougesellschoft Heidenheim/Brz. AG., Heidenheim/Brz., Rosensfroße 4

Kreisbovgesellschaft Heidenheim Gmbli., Giengen (Brenz) Konzerthous-Gesellschoft m. b. H., Heidenheim

Vorst: Londesverbond der Betriebskronkenkossen Boden-Wörttemberg, Stuftgart

Niemeyer, Christion, Syndikuos, 2 Homburg 1, Ferdinondstr. 75, 71. 3. 1897 in Homburg Ak: Homburgische Bobkosse AG., Hmburg

Niemeyer, Erich Inh: J. H. Schöfer & Co., 28 Bremen, Fehrfeld 39-41

Niemeyer, Gisbert, 4446 Grovenhorst Post Hörsfel, Hs. Nr. 379 Geschf. u. PershGes: Westfölische Stahl-Pflug-Fobrik H. Niemeyer Söhne, Riesenbeck / öber Rheine (Westf) 2

Niemeyer, Gönther, Rotsherr, 325 Homeln, Osterstr. 19, *3. 4. 1911 in Homeln pershGes: C. W. Niemeyer, Buchdruckerei und Verlog, Haomeln Verleger: Deister- ub. Weserzeitung und Pyrmonter Nochrichten AR: Dimitog, Bonn Beirot: Bundesverbond Deufscher Zeitungsverleger e. V., Bod Godesberg Vorst: Verein Niederdeutscher Zeitungsverleger, Honnover Mitglied der Vollversommlung der Industrie- und Hondels- koammer, Honnover

Niemeyer, H., Dr. juris., 5201 Hoholz (Siegkr), 14. 9. 1928 Vorst: Deutsche Versuchsonsfolt füör Luft- und Raumfahrt e. V. (DVI) Porz-Wohn

= Q Ö0 00 *

7, Steneltstr. 16,

Niemeyer, W., Dipl.-Ingenieor, ――=――――

Ges: Brunotte & Niemeyer, Maschinenfabrik Gmbfl., Honnover

28, peutestr. 7

Niemöhlmonn, Josef, 2 Hamburg 28 Utestr. 7 pershes: Ernst Niemöhlmonn, Reinbek Bez. Homburg

Niemöller, Fritr, Ekkehord,

pershGes: Niemöller & Abel, 483 Öötersloh, Verler Str. 1

Niemöller, Herbert, Dipl.-Ing., 433 Öötersloh, Hohenzollern- straße 470

Geschf: Niemöller & Lötgert, Weberei Ömblfi., Götersloh

Niemöller, Joochim, 483 Götersloh, Hohenzollernstr, 49

Mitinh: Niemöller & tötgert, Mechonische Weberel, Sbterrlob

Niemöller, Rudolf, 483 Sötersloh, Feldsfr. 2 Mitinh: Niemölfer & Lotgert, Mechonische Weberel, Gbtersloh

Niemsch, Oo, 3388 Bad Horzburg, Am Breitenbe 72. 2. 1887 in Bottschow Bez. Fronkfurt (OÖder) Inh: Lonico-Moschinenbov Otto Niemsch K , Braunschweig

Niemsch, Wolfgong, 33 Braunschweig, Broitzemer Str. 26, 9. 8. 1920 in Broonschweig lnh: Lonico-Moschinenbod Otto Niemsch K0 , Brounschweig

Niendorff, A. F., 2408 Klein-Timmendorf, Haupfsfr. 6 ――― Geschf: TW.Hentzen Ömbli., Remscheid TW-AffFco Ömbti., Harksheide, Bez Homburg HTWVerpockung ÖGmbf.., Hei

Nienhaus, Fronz, Dr. rer. pol., Dipl.-Kfm., 1 Berlin 33, Heyden- 8... SstWorst: TEIFFfUNKEN AG., Berlin 10

Nienhaus, Hermonn, 453 [bbenbören (Westf), Kurze Str. 2, *28. 6. 1916 Geschf: Karl Schöäfer & Co., Gmbt., lbbenbören (Westf) Casilith-Baustoff-Gesellschuft mbft., Mettingen (Westf)

Nienheysen, Leo, Wirtschoftspröfer, 43 Essen, Schönleinsfr. 53, 712. 10. 1893 in Rees Vorstond: Westdeutschlond Wirtschoftspröfungs-AGÖ., Essen vVdAk: Gebr. Eicchoff, Moschinenfobrik u. Eisengießerei mbfl., Bochum

Niens, Wolter, Dr. rer. techn., Professer, 1 Berlin 28, Folkentoler Steig 85, 14. 7. 1905 Dir: Allgemeine Flekfrizitäts-Gesellschoft, Berlin 51 Honprofessor on der Technischen Universität Berlin Mitgl. der Deutschen Gesellschaft för gewerbliches Bildungs- wesen e. V., Brounschweig Vors. des Kürotorioms der Staotl. Ingenieurschule BEUfTtI, Berlin des Berufsdusbildungsdusschosses und des Fröfungsomtes der HX, Berlin mehrerer Ausschösse in Verbänden der deutschen Wirtschaft Mitgl. in wissenschafflichen Gesellschoften

Nienstädt, Hons, 28 Bremen, Donondtstr. 26, 13. 4. 1904 Inh: C. Friedrich Nienstädt, Bremen GeschfVorst: Arbeitskreis Freier Sonitär- Röhrenhändler e. V.,

Bonn Vors: V.§. I. Verbond von Fochhöndler-Vereinigungen des sani- ftären installoutions-, Gas- und Wosserleitungsbedarfs e. V.,

Bonn 8 NMicgo Verbond von logerholtenden Großhöndlern des sonitären Wosserleitungsfoches, Bremen e. V.

sWors: Wirtschoftsvereinigong Groß- und Außenhandel NORDSEF

Mitgl: Plenum der Hondelskommer Bremen

789