R

canſa, quid cum ipſo atum eft quam 0 ptimê. Étenim eo tempore 7 eo rerunt fatu vitam cum morte commutarit, gu0 nihil admodum ipſum ad diutius Vizendum boterat inuitare: ita Verò etiam ſanttè pied, mortuus est, Vt non fit dubium, ipſum iam cum omnibus di- lectis Dei frui eterna lætitia, æterna ſapientia, ternog ſplendore at, Veris tate Dei: ſed noſtra potius afficimur orbitate,bunc a noſtya conſuetudine abe duttum auocatumd, eſſe, qui immortali beta inter homines dignus fuiſſet, ſi

“quid tale aut Dei voluntas, aut humas

neæ fortis côditio, ferret aut pateretur. O verè difficilem humanæ Pit æ condis tionem, ò ſeculum infelix atd, calamio toſum, óò fata bominús indicio Verè ini» qua, quibus qui gloriæ Dei, qui publicæ ſaluti, qui communibus omnium com- modis ex animo ſtudent, & quám opti mè